Copyright: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved
Citation: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved


Hiermee worden de frequentie en de maximumsnelheid van de huidige draadloze verbinding weergegeven.


Hiermee wordt de naam van het huidige geselecteerde configuratieprofiel weergegeven.


Hiermee wordt weergegeven of het station is verbonden met het draadloze netwerk.


Hiermee wordt de verzendsnelheid van de huidige verbinding met het stuurprogramma weergegeven.


Hiermee wordt de ontvangstsnelheid van de huidige verbinding met het stuurprogramma weergegeven.


Hiermee wordt de actieve modus van het netwerk weergegeven (infrastructuur of ad-hoc).


Hiermee wordt de beveiligingsmodus van het stuurprogramma weergegeven (Uit, WEP, AES of CKIP).


Hiermee wordt het IP-adres weergegeven dat door het TCP/IP-protocol wordt gebruikt voor deze draadloze kaart.


Hiermee wordt een lijst met geconfigureerde profielen weergegeven. Als u naar een ander profiel wilt schakelen, klikt u op de naam in de lijst met profielen en vervolgens op Activeren.


Hiermee worden de details van het geselecteerde configuratieprofiel weergegeven.


Hiermee wordt de eerste netwerknaam (SSID1) voor het geselecteerde configuratieprofiel weergegeven.


Hiermee wordt de tweede netwerknaam (SSID2) voor het geselecteerde configuratieprofiel weergegeven.


Hiermee wordt de derde netwerknaam (SSID3) voor het geselecteerde configuratieprofiel weergegeven.


Hiermee wordt de soort netwerkverbinding voor het geselecteerde configuratieprofiel weergegeven.


Hiermee wordt het adres van de draadloze kaart voor het geselecteerde configuratieprofiel weergegeven.


Hiermee wordt de beveiligingsmodus voor het geselecteerde configuratieprofiel weergegeven.


Hiermee wordt de standaardsleutel voor het geselecteerde configuratieprofiel weergegeven.


Hiermee wordt de huidige energiebesparingsmodus voor het geselecteerde configuratieprofiel weergegeven.


Klik op deze knop als u een nieuw configuratieprofiel wilt maken en algemene, geavanceerde en beveiligingsgegevens wilt toevoegen.


Klik op deze knop om de gegevens te wijzigen in het geselecteerde configuratieprofiel.


Klik op deze knop om het geselecteerde configuratieprofiel te verwijderen.


Klik op deze knop om de wijzigingen toe te passen op het geselecteerde configuratieprofiel.


Hiermee wordt de naam van de draadloze kaart weergegeven. Dit is de naam die in het besturingssysteem wordt gebruikt.


Hiermee wordt het MAC-adres van de draadloze kaart weergegeven.


Hiermee worden de naam van het stuurprogramma en het pad van de draadloze kaart weergegeven.


Hiermee wordt de stuurprogrammaversie van de draadloze kaart weergegeven.


Hiermee wordt de datum van het stuurprogramma van de draadloze kaart weergegeven.


Hiermee wordt de netwerknaam (SSID) voor het geselecteerde draadloze LAN weergegeven.


Hiermee wordt het MAC-adres (BSSID) weergegeven van het TP waarmee de draadloze kaart is verbonden.


Hiermee wordt de actieve status van de draadloze kaart weergegeven.


Hiermee worden het actieve kanaal en de frequentie voor het station weergegeven.


Hiermee worden de beschikbare TP's en ad-hocnetwerken weergegeven, met de netwerknamen, beveiliging, signaalsterkte, draadloze modus, kanaalnummer en frequentie. Dubbelklik op een beschikbaar netwerk om verbinding te maken als er al een configuratieprofiel is gemaakt of om een configuratieprofiel te maken voor de netwerknaam.


Hier vindt u gegevens voor het aantal verzonden multicast-, broadcast- en unicastframes en voor het totaalaantal verzonden bytes.


Hiermee wordt het aantal verzonden multicastframes weergegeven. Een multicastframe wordt naar meerdere ontvangers verzonden.


Hiermee wordt het aantal verzonden broadcastframes weergegeven. Een broadcastframe wordt verzonden naar alle hosts in een netwerk.


Hiermee wordt het aantal verzonden unicastframes weergegeven. Een unicastframe wordt verzonden naar één ontvanger.


Hiermee wordt het totaalaantal verzonden bytes in alle frames weergegeven.


Hier vindt u gegevens voor het aantal ontvangen multicast-, broadcast- en unicastframes en voor het totaalaantal ontvangen bytes.


Hiermee wordt het aantal ontvangen multicastframes weergegeven. Een multicastframe wordt naar meerdere ontvangers verzonden.


Hiermee wordt het aantal ontvangen broadcastframes weergegeven. Een broadcastframe wordt verzonden naar alle hosts in een netwerk.


Hiermee wordt het aantal ontvangen unicastframes weergegeven. Een unicastframe wordt verzonden naar één ontvanger.


Hiermee wordt het totaalaantal ontvangen bytes in alle frames weergegeven.


Hiermee wordt weergegeven hoe lang de kaart actief is.


Klik op deze knop om alle statistische gegevens op nul te zetten.


Klik op deze knop om de geavanceerde statistische gegevens weer te geven.


Klik op deze knop om informatie over het stuurprogramma weer te geven.


Klik op deze knop om de radiofunctie in of uit te schakelen.


Klik op deze knop om het systeemvakpictogram weer te geven of te verbergen. Het pictogram bevat kleurcodes voor de sterkte van het signaal. Ook wordt de actieve frequentie wordt weergegeven.


Klik op deze knop om de toepassing Site Survey te openen.

In deze toepassing worden de signaalsterkte en de kwaliteit van het signaal naar het TP grafisch weergegeven. Aan de hand van deze gegevens kunt u bepalen of er extra TP's nodig zijn in het netwerk met deze gegevens als u de locatie van de draadloze kaart verandert.


Geef hier de naam van het configuratieprofiel op.


Geef de netwerknamen (SSID's) voor dit configuratieprofiel op. Laat alle SSID's leeg als u verbinding wilt maken met een TP.


Geef hier de eerste SSID voor dit configuratieprofiel op. Laat alle SSID's leeg als u verbinding wilt maken met een TP.


Geef hier de tweede SSID voor dit configuratieprofiel op. Laat alle SSID's leeg als u verbinding wilt maken met een TP.


Geef hier de derde SSID voor dit configuratieprofiel op. Laat alle SSID's leeg als u verbinding wilt maken met een TP.


Geef hier de soort netwerk voor dit configuratieprofiel op.


Geef hier de energiebesparingsmodus op voor dit configuratieprofiel.


Selecteer een keuzerondje om het coderingstype te selecteren.


Selecteer dit keuzerondje om het coderingstype uit te schakelen.


Als u dynamische beveiliging wilt inschakelen, selecteert u het keuzerondje Dynamische beveiliging, selecteert u de gewenste soort beveiliging in de vervolgkeuzelijst en klikt u op Configureren om de door de gebruiker gedefinieerde informatie op te geven.


Selecteer het keuzerondje als u vooraf-gedeelde sleutels wilt opgeven.


Hiermee wordt de methode voor het opgeven van de sleutel weergegeven.


Hiermee wordt weergegeven dat hexadecimale tekens (0-9, A-F) worden gebruikt voor het opgeven van sleutels.


Hiermee wordt weergegeven dat ASCII-tekens (alle beschikbare tekens op het toetsenbord, behalve spaties) worden gebruikt voor het opgeven van sleutels.


Selecteer het keuzerondje Per-User Key om deze sleutel als standaardcodeersleutel in te stellen.


Selecteer het keuzerondje Eerste om deze sleutel als standaardcodeersleutel in te stellen.


Selecteer het keuzerondje Tweede om deze sleutel als standaardcodeersleutel in te stellen.


Selecteer het keuzerondje Derde om deze sleutel als standaardcodeersleutel in te stellen.


Selecteer het keuzerondje Vierde om deze sleutel als standaardcodeersleutel in te stellen.


Geef in dit veld de waarde op voor de codeersleutel per gebruiker.


Geef in dit veld de waarde op voor de eerste codeersleutel.


Geef in dit veld de waarde op voor de tweede codeersleutel.


Geef in dit veld de waarde op voor de derde codeersleutel.


Geef in dit veld de waarde op voor de vierde codeersleutel.


Selecteer de lengte van de codeersleutel per gebruiker in de vervolgkeuzelijst.


Selecteer de lengte van de eerste codeersleutel in de vervolgkeuzelijst.


Selecteer de lengte van de tweede codeersleutel in de vervolgkeuzelijst.


Selecteer de lengte van de derde codeersleutel in de vervolgkeuzelijst.


Selecteer de lengte van de vierde codeersleutel in de vervolgkeuzelijst.


Met dit selectievakje schakelt u LEAP (Lightweight Extensible Authentication Protocol) in.


Klik hier om de gebruikersnaam en het wachtwoord voor LEAP/EAP-FAST op te geven. De naam mag uit maximaal 64 tekens bestaan.


Hier wordt het LEAP/EAP-FAST-wachtwoord opgegeven. Het wachtwoord mag uit maximaal 64 tekens bestaan.


Schakel dit selectievakje in om een draadloos MAC-adres op te geven. Dit adres heeft voorrang op het MAC-adres van de draadloze netwerkkaart.


Geef het adres van de draadloze kaart op in hexadecimale tekens.


Hiermee kunt u de scanmethode van de draadloze kaart selecteren voor het zoeken naar TP's of ad-hocnetwerken.


Selecteer dit keuzerondje om passief scannen te op te geven. Met passief scannen wordt scannen in de modus voor alleen luisteren aangeduid.


Selecteer dit keuzerondje om automatisch scannen te selecteren. Hierbij wordt de landcode gebruikt om te bepalen welke manier van scannen wordt gebruikt, actief of passief.


Geef het energieniveau voor verzenden op in de vervolgkeuzelijst. Het werkelijke energieniveau wordt mogelijk beperkt door voorgeschreven domein- of hardwarebeperkingen.


Geef de draadloze modus op voor de draadloze kaart.


Geef de draadloze modus op waarmee het ad-hocnetwerk begint als er geen ad-hocnetwerk met de huidige naam wordt gevonden.


Schakel dit selectievakje in om de draadloze modus 5 GHz en 54 Mbps te gebruiken met de draadloze kaart.


Schakel dit selectievakje in om de draadloze modus 5 GHz te gebruiken voor de draadloze kaart.


Schakel dit selectievakje in om de draadloze modus 2,4 GHz en 11 Mbps te gebruiken met de draadloze kaart.


Schakel dit selectievakje in om de draadloze modus 5 GHz en 54 Mbps te gebruiken met de draadloze kaart als u een ad-hocnetwerk start.


Schakel dit selectievakje is om de draadloze modus 5 GHz te gebruiken als u een ad-hocnetwerk start.


Schakel dit selectievakje in om de draadloze modus 2,4 GHz en 11 Mbps te gebruiken met de draadloze kaart als u een ad-hocnetwerk start.


Hiermee wordt het energieniveau voor verzenden in mW weergegeven.


Hiermee wordt de naam van het netwerk (SSID) weergegeven waarmee het station is verbonden of mee wordt verbonden.


Hiermee wordt weergegeven of het configuratieprofiel is ingeschakeld voor het Quality of Service-netwerk.


Hiermee wordt het geluidsniveau van de huidige verbinding in dBm weergegeven.


Hiermee wordt de status van de energiebesparingsmodus voor dit configuratieprofiel weergegeven.


Hiermee wordt de frequentie van de huidige verbinding weergegeven.


Klik op deze knop om het dialoogvenster Geavanceerde status te sluiten.


Hiermee worden statistische gegevens over verzenden weergegeven.


Hiermee wordt het aantal bakens dat is verzonden met de draadloze kaart weergegeven.


Hiermee wordt het aantal frames weergegeven dat correct is verzonden met de draadloze kaart.


Hiermee wordt weergegeven hoeveel frames opnieuw zijn verzonden omdat ze niet door het station waren ontvangen.


Hiermee wordt weergegeven hoeveel frames zijn verloren omdat ze niet door het station zijn ontvangen.


Hiermee wordt het aantal RTS-frames (Request to Send) weergegeven dat is verzonden met de draadloze kaart.


Hiermee worden statistische gegevens over ontvangen weergegeven.


Hiermee wordt het aantal bakens weergegeven dat is ontvangen met de draadloze kaart.


Hiermee wordt het aantal frames weergegeven dat is correct is ontvangen met de draadloze kaart.


Hiermee wordt het aantal frames weergegeven dat met fouten is ontvangen met de draadloze kaart.


Hiermee wordt het aantal frames weergegeven dat niet kon worden gedecodeerd met de draadloze kaart.


Hiermee wordt het aantal frames weergegeven dat is geweigerd omdat ze al waren ontvangen.


Hiermee wordt het aantal CTS-frames (Clear to Send) weergegeven dat is ontvangen met de draadloze kaart.


Hiermee wordt het aantal mislukte pogingen tot TP-verificatie weergegeven.


Hiermee wordt het aantal geweigerde pogingen tot TP-verificatie weergegeven.


Klik op deze knop om het dialoogvenster Geavanceerde statistieken te sluiten.


Klik op deze knop om alle statistische gegevens op nul te zetten.


Geef het land op waar de draadloze kaart wordt gebruikt.


Selecteer dit keuzerondje om wereldwijd zwerven in te schakelen zodat alle kanalen passief worden gescand die worden aangegeven als beschikbaar in het voorgeschreven domein.


Klik op deze knop om de wijzigingen in de landcode te activeren.


Klik op deze knop om de landcodeselectie te sluiten.


Hiermee wordt de sterkte van het signaal als percentage of in dB weergegeven.


Klik op deze knop om de signaalsterkte als percentage weer te geven.


Klik op deze knop om de signaalsterkte in dB weer te geven.


Hiermee worden de statistische gegevens weergegeven op basis van het vernieuwingsinterval (relatief) of de totale tijd (cumulatief).


Klik op deze knop om statistische gegevens te verzamelen op basis van het vernieuwingsinterval.


Klik op deze knop om statistische gegevens te verzamelen.


Hiermee wordt het interval voor het verzamelen van statistische gegevens in seconden weergegeven.


Klik op deze knop om de wijzigingen in het dialoogvenster Weergave-instellingen te activeren.


Klik op deze knop om het dialoogvenster Weergave-instellingen te sluiten.


Gebruik het tabblad Algemeen om de netwerknamen en de naam voor een configuratieprofiel aan te passen.


Klik op de knoppen voor hulpmiddelen om de radio in of uit te schakelen, de landcodeselectie te openen en/of het systeemvakpictogram in of uit te schakelen.


Gebruik het tabblad Profielen beheren om nieuwe configuraties toe te voegen, configuraties te wijzigen of te verwijderen of om naar een ander configuratieprofiel te schakelen.


Op het tabblad Diagnostische gegevens worden de statistische gegevens van het stuurprogramma weergegeven.


Selecteer de preamble-modus Alleen lang of Kort & Lang voor 802.11b- en 802.11g-netwerken. Alleen lang wordt gebruikt voor neerwaartse compatibiliteit met oudere draadloze kaarten.


Gebruik deze pagina om de coderingssleutels voor statische codering toe te voegen.


Klik op de knop Vernieuwen om opnieuw te scannen en de lijst met beschikbare TP's en ad-hocnetwerken bij te werken.


Op het tabblad Geavanceerd kunt u geavanceerde instellingen opgeven voor het configuratieprofiel.


Klik op de knop Vooraf-gedeelde sleutels definiëren om het dialoogvenster te openen en de vooraf-gedeelde sleutels op te geven.


Op het tabblad Beveiliging kunt u het coderingstype opgeven en dynamische beveiliging instellen.


Stel de preamble-modus in op Kort & lang, waarmee automatisch de juiste preamble-modus kan worden geselecteerd met de draadloze kaart.


Stel de preamble-modus in op Alleen lang. Deze modus wordt gebruikt voor neerwaartse compatibiliteit met oudere draadloze kaarten.


Selecteer een keuzerondje om een standaardsleutel op te geven. Vul vervolgens het veld in en selecteer een lengte in de vervolgkeuzelijst.


Hiermee worden actuele gegevens over het stuurprogramma weergegeven.


Gebruik het tabblad met de status van WLAN om actuele verbindingsgegevens weer te geven en een lijst met beschikbare TP's en ad-hocnetwerken. In deze lijst kunt u naar een nieuwe verbinding schakelen.


Hiermee worden geavanceerde statistische gegevens voor verzenden en ontvangen weergegeven voor de draadloze kaart.


Hiermee worden geavanceerde gegevens voor de koppeling weergegeven.


Klik op de knop Geavanceerd om geavanceerde gegevens over de koppeling weer te geven.


Gebruik de landcodeselectie om het land te wijzigen waarvoor de draadloze kaart is ingesteld.


Op het tabblad Huidige status worden gegevens over de koppeling weergegeven.


In het vak Info worden de datum van de build en het versienummer van de toepassing weergegeven.


In het vak Instellingen kunt u wijzigen opgeven voor de weergave en het interval voor het verzamelen van gegevens in de cumulatieve modus of de intervalmodus. In de intervalmodus wordt bij nul begonnen bij elke nieuwe meting. Het interval voor het verzamelen van gegevens wordt in seconden weergegeven. U kunt het interval wijzigen door een nieuwe waarde op te geven en of met de pijlen omhoog/omlaag aan de rechterkant. Wanneer u een korter interval opgeeft, wordt er meer CPU-tijd gebruikt. Hiermee wordt de relatieve signaalsterkte als percentage of in decibel (dB) weergegeven.


Klik op de knop Activeren om naar het gemarkeerde TP- of ad-hocnetwerk te schakelen. U kunt ook op de SSID dubbelklikken. Als er geen profiel is gemaakt voor de SSID, wordt er een nieuw profiel geopend met de geselecteerde SSID ingevuld. Geef de profielinstellingen op en klik op OK om het profiel te activeren.


Druk op de knop Activeren om naar het geselecteerde profiel te schakelen. U kunt ook op de profielnaam dubbelklikken.


Hiermee wordt het huidige kanaal weergegeven.


Schakel dit selectievakje in om de draadloze modus 2,4 GHz en 54 Mbps te gebruiken met de draadloze kaart.


Schakel dit selectievakje in om de draadloze modus 2,4 GHz en 54 Mbps te gebruiken met de draadloze kaart als u een ad-hocnetwerk start.


In deze vervolgkeuzelijst kunt u het kanaal selecteren voor het starten van een ad-hocnetwerk.


Geef het LEAP/EAP-FAST-wachtwoord op.


Bevestig het opgegeven LEAP/EAP-FAST-wachtwoord.


Klik hier om LEAP/EAP-FAST-items in te schakelen.


Klik hier om het dialoogvenster Gebruikersgegevens definiëren te wissen en te sluiten.


Klik hier om een lijst van beschikbare TP's en ad-hocnetwerk weer te geven.


Geef de LEAP/EAP-FAST-gebruikersnaam op.


Klik hier om de wijzigingen te activeren in het dialoogvenster Profielen beheren.


Klik hier om de wijzigingen te annuleren en het dialoogvenster Profielen beheren te sluiten.


Klik hier om Zero Configuration uit te schakelen.


Klik hier om Zero Configuration uit te schakelen.


Schakel het selectievakje in als u dit dialoogvenster niet meer wilt weergeven.


Het ACU is tijdens de installatie geselecteerd. Zero Configuration is ook ingeschakeld. Geef op of u het ACU of Zero Configuration wilt gebruiken.


Klik hier om het dialoogvenster Gebruikersgegevens definiëren te wissen en te sluiten.


Geef de netwerknamen (SSID's) voor dit configuratieprofiel op.


Met de volgende keuzerondjes kunt u beveiligingsopties weergeven.


Met de knop Configureren kunt u gebruikersgegevens invoeren voor de opgegeven beveiligingsoptie.


Schakel het selectievakje WPA in en klik op Configureren om gegevens voor Wireless Protected Access op te geven.


Selecteer de gewenste dynamische beveiliging in de vervolgkeuzelijst.


Klik op OK om het WPA-wachtwoord in te schakelen.


Klik hier om de wijzigingen te annuleren en het dialoogvenster te sluiten.


Geef het wachtwoord voor WPA-beveiliging op. Het wachtwoord moet uit minstens acht tekens bestaan.


Gebruik dit dialoogvenster om informatie op te geven over de modus voor dynamische beveiliging.


Geef de gebruikersnaam en het wachtwoord op voor dynamische beveiliging in de beschikbare velden.


Geef de gebruikersnaam op voor dynamische beveiliging in het beschikbare veld.


Geef in dit veld de gebruikersnaam voor dynamische beveiliging op.


Geef het wachtwoord op voor dynamische beveiliging in het beschikbare veld.


Geef in dit veld het wachtwoord op voor dynamische beveiliging.


Geef het wachtwoord voor dynamische beveiliging opnieuw op in het beschikbare veld.


Geef in dit veld het wachtwoord voor dynamische beveiliging opnieuw op.


Selecteer het gewenste certificaat in de vervolgkeuzelijst.


Geef de certificeringsinstantie op voor dit gebied.


Selecteer dit keuzerondje als u een willekeurige certificeringsinstantie wilt gebruiken.


Selecteer dit keuzerondje als u een certificeringsinstantie wilt selecteren in de vervolgkeuzelijst.


Selecteer de gewenste certificeringsinstantie in de vervolgkeuzelijst.


Geef de server-/domeinnaam op voor de RADIUS-server.


Geef de aanmeldingsnaam op voor de RADIUS-server.


Klik hier om de wijzigingen toe te passen op het dialoogvenster Certificaat definiëren.


Klik hier om de wijzigingen te annuleren en het dialoogvenster Certificaat definiëren te sluiten.


Geef de certificeringsinstantie op voor dit gebied.


Selecteer dit keuzerondje als u een willekeurige certificeringsinstantie wilt gebruiken.


Selecteer dit keuzerondje als u een certificeringsinstantie wilt selecteren in de vervolgkeuzelijst.


Selecteer de gewenste certificeringsinstantie in de vervolgkeuzelijst.


Geef de server-/domeinnaam op voor de beveiligingsserver.


Geef de aanmeldingsnaam op voor de beveiligingsserver.


Klik hier om informatie op te geven in het dialoogvenster Gebruikersgegevens definiëren voor de beveiligingsserver.


Klik hier om de wijzigingen toe te passen op het dialoogvenster Certificaat definiëren.


Klik hier om de wijzigingen te annuleren en het dialoogvenster Certificaat definiëren te sluiten.


Geef het WPA-wachtwoord op in dit venster.


Gebruik dit dialoogvenster om informatie op te geven over dynamische beveiliging met TLS.


Klik op Importeren om een configuratieprofiel te importeren. Ga naar de map waarin het profiel is opgeslagen, markeer het profiel en klik op Openen om het profiel te importeren.


Klik op Exporteren om een configuratieprofiel te exporteren. Ga naar de map waarin u het profiel wilt opslaan en klik op Opslaan om het profiel te exporteren.


Klik op Profielvolgorde om de configuratieprofielen te ordenen die in het venster Profielen beheren worden weergegeven. Klik in het venster Beheer van automatische profielselectie desgewenst op Omhoog of Omlaag. Klik vervolgens op OK.


Wanneer automatische profielselectie is ingeschakeld met de optie Automatische profielselectie op het tabblad Profielen beheren, zoekt de clientadapter naar een beschikbaar netwerk. Het profiel met de hoogste prioriteit en met dezelfde SSID als een van de gevonden netwerken, wordt gebruikt om verbinding te maken. Als er geen verbinding kan worden gemaakt, wordt geprobeerd verbinding te maken met het volgende profiel dat overeenkomt met de SSID, enzovoort.


Het hulpprogramma voor probleemoplossing is een optioneel hulpprogramma waarmee configuratieproblemen en koppelingsproblemen met draadloze adapters kunnen worden herkend en opgelost wanneer de adapter zich in de toegangspuntmodus (infrastructuur) bevindt. Dit hulpprogramma is alleen beschikbaar op Mini PCI-oplossingen.


Hiermee wordt de verificatiemethode van de server weergegeven.


Hiermee wordt de verificatiemethode van de server weergegeven.


Hiermee wordt de beveiligingsmodus voor gegevenscodering weergegeven.


Hiermee wordt het verificatietype weergegeven. Met Automatisch wordt de verificatie uitgevoerd met de optie Gedeeld. Als dit mislukt, wordt openbare verificatie gebruikt. Met Openen wordt de verificatie uitgevoerd ongeacht de WEP-instellingen. Hiermee wordt het toegangspunt alleen gekoppeld als de WEP-sleutels van de adapter en het toegangspunt overeenkomen. Met Gedeeld kan de adapter alleen worden gekoppeld aan toegangspunten met dezelfde WEP-sleutel.


Hiermee wordt weergegeven of MIC is ingeschakeld. Met MIC worden bitflip-aanvallen op gecodeerde pakketten afgeweerd.


Hiermee wordt de naam van het gekoppelde toegangspunt weergegeven.


Hiermee wordt het IP-adres van het gekoppelde toegangspunt weergegeven.


Hiermee wordt het MAC-adres van het gekoppelde toegangspunt weergegeven.


Hiermee wordt de huidige signaalsterkte in dBm of als percentage weergegeven.


Hiermee wordt het huidige geluidsniveau (signaalkwaliteit) in dBm of als percentage weergegeven.


Hiermee wordt weergegeven hoe lang de clientadapter stroom heeft ontvangen (in uren:minuten:seconden). Als de adapter meer dan 24 uur ingeschakeld is geweest, wordt de tijd als volgt weergegeven in dagen:uren:minuten:seconden.


Hiermee wordt de indeling 802.11b preamble weergegeven. Geef de preamble-indeling op het tabblad Geavanceerd op.


Hiermee wordt de huidige ontvangstsnelheid in Mbps weergegeven.


Hiermee wordt de huidige verzendsnelheid in Mbps weergegeven.


Hiermee wordt het huidige kanaal weergegeven.


Hiermee wordt de frequentie van het station weergegeven.


Hiermee wordt het aantal verzonden frames weergegeven waarvoor geen bevestiging is vereist.


Hiermee wordt het aantal verzonden frames weergegeven waarvoor een bevestiging is ontvangen.


Hiermee wordt het aantal fouten voor cyclische redundantiecontroles weergegeven dat is ontvangen.


Hiermee wordt het aantal niet-overeenkomende toegangspunten weergegeven.


Hiermee wordt het aantal overdrachtsverschillen weergegeven.


Hiermee wordt het aantal verzonden RTS-frames weergegeven.


Hiermee wordt het aantal verzonden CTS-frames weergegeven.


Hiermee wordt het aantal verzonden NTS-frames weergegeven.


Hiermee wordt het aantal verzonden RTS-frames weergegeven waarvoor een nieuwe poging is ondernomen.


Hiermee wordt het aantal opnieuw verzonden gegevensframes weergegeven.


Hiermee wordt het aantal ontvangen time-outs bij verificatie weergegeven.


Hiermee wordt het aantal ontvangen time-outs van koppelingen weergegeven.


Hiermee wordt het aantal ontvangen standaard-MIC-verificaties weergegeven.


Hiermee wordt het aantal ontvangen standaard-MIC-fouten weergegeven.


Hiermee wordt het aantal ontvangen CKIP MIC-verificaties weergegeven.


Hiermee wordt het aantal ontvangen CKIP MIC-fouten weergegeven.


Hiermee wordt het aantal ontvangen CTS-frames weergegeven.


Hiermee wordt de naam van de clientcomputer weergegeven.


Hiermee wordt het serienummer van de draadloze netwerkadapter weergegeven.


Hiermee wordt de sterkte van het signaal weergegeven.


In dit veld worden de beschikbare profielen weergegeven voor het beheer van automatische profielselectie.


Klik op Toevoegen om een profiel toe te voegen aan de automatische profielselectie. Klik op de knop Profielvolgorde op het tabblad Profielen beheren. Het venster Beheer van automatische profielselectie wordt weergegeven met een lijst van alle gemaakte profielen in het vak Beschikbare profielen. Markeer de profielen die u aan de automatische profielselectie wilt toevoeg en klik op Toevoegen. De profielen worden weergegeven in het vak Automatisch geselecteerde profielen.


In dit veld worden de automatisch geselecteerde profielen weergegeven.


Markeer een beschikbaar profiel of een automatisch geselecteerd profiel en klik op Omhoog om het geselecteerde profiel hoger in de lijst te plaatsen.


Markeer een beschikbaar profiel of een automatisch geselecteerd profiel en klik op Omlaag om het geselecteerde profiel lager in de lijst te plaatsen.


Markeer een beschikbaar profiel of een automatisch geselecteerd profiel en klik op Verwijderen om het geselecteerde profiel uit de lijst te verwijderen.


Klik op OK om de wijzigingen in het venster Beheer van automatische profielselectie te accepteren.


Klik op Annuleren om de wijzigingen in het venster Beheer van automatische profielselectie te annuleren.


Hiermee selecteert u het energieniveau voor verzenden voor 802.11b in mW. Het werkelijke energieniveau wordt mogelijk beperkt door voorgeschreven domein- of hardwarebeperkingen.


Hiermee selecteert u de modus die wordt gebruikt voor het verifiëren van een toegangspunt: Met Automatisch wordt de verificatie uitgevoerd met de optie Gedeeld. Als dit mislukt, wordt openbare verificatie gebruikt. Met Openen wordt de verificatie uitgevoerd ongeacht de WEP-instellingen. Hiermee wordt het toegangspunt alleen gekoppeld als de WEP-sleutels van de adapter en het toegangspunt overeenkomen. Met Gedeeld kan de adapter alleen worden gekoppeld aan toegangspunten met dezelfde WEP-sleutel.


Voor infrastructuurnetwerken (toegangspunt) klikt u op de knop Voorkeurstoegangspunten. U kunt maximaal vier toegangspunten opgeven waarmee de clientadapter verbinding moet maken.


Hieraan wordt de clientcomputer herkend.


Als WEP is ingesteld op Optioneel voor het toegangspunt waaraan de draadloze adapter is gekoppeld en als WEP is ingeschakeld op de clientcomputer, controleert u of Koppeling naar gemengde cellen is ingeschakeld op het tabblad Beveiliging om koppeling toe te staan.


Schakel de functie Tijdelijke gebruikersnaam en tijdelijk wachtwoord gebruiken in door het volgende keuzerondje te selecteren:

Schakel de optie Windows-gebruikersnaam gebruiken in als u de Windows-gebruikersnaam wilt gebruiken als gebruikersnaam voor de verificatie of selecteer Handmatig vragen om gebruikersnaam en -wachtwoord als u zich handmatig wilt aanmelden en het verificatieproces wilt starten.


Schakel de optie Windows-gebruikersnaam gebruiken in als u de Windows-gebruikersnaam wilt gebruiken als gebruikersnaam voor de verificatie.


Selecteer Handmatig vragen om gebruikersnaam en -wachtwoord als u zich handmatig wilt aanmelden en het verificatieproces wilt starten.


Geef de gebruikersnaam, het wachtwoord en het domein op die moeten worden opgeslagen en gebruikt.


Geef de gebruikersnaam op die moet worden opgeslagen en gebruikt.


Geef het wachtwoord voor verificatie op dat moet worden opgeslagen en gebruikt.


Bevestig het wachtwoord dat moet worden opgeslagen en gebruikt voor de verificatie.


Geef de domeinnaam op die moet worden opgeslagen en gebruikt.


Schakel de instelling Windows-aanmeldingsdomein met gebruikersnaam opnemen in om het Windows-aanmeldingsdomein met gebruikersnaam op te geven bij de RADIUS-server. (standaardinstelling)


Desgewenst schakelt u de optie Geen netwerkverbinding tenzij gebruiker is aangemeld in zodat de verbinding met de draadloze adapter wordt verbroken nadat u zich hebt afgemeld.


Geef de time-out voor de verificatie op (tussen 30 en 500 seconden). Hiermee wordt bepaald hoe lang er moet worden gewacht voordat de verificatie wordt gekenmerkt als mislukt en er een foutbericht wordt verzonden. De standaardtime-out is 90 seconden.


Klik op OK om de wijzigingen in het instellingenvenster op te slaan.


Klik op Annuleren om de wijzigingen in het instellingenvenster te annuleren.


Selecteer de juiste netwerkcertificeringsinstantie in de vervolgkeuzelijst.


Schakel de optie Windows-gebruikersnaam gebruiken in als u de Windows-gebruikersnaam wilt gebruiken als EAP-GTC-gebruikersnaam.


Geef een PEAP-gebruikersnaam op in het vak Gebruikersnaam als u een andere gebruikersnaam wilt gebruiken en start de EAP-GTC-verificatie.


Hiermee selecteert u een token als wachtwoord. Wanneer u Token selecteert, wordt er een hardware-apparaat gebruikt of het programma Secure Computing SofToken (versie 1.3 of hoger) zodat er eenmalig een time-out kan worden opgegeven voor de verificatie.


Hiermee selecteert u een statisch wachtwoord.


Klik op Instellingen om een bepaalde server of een domein en aanmeldingsnaam op te geven. Laat het vak voor de servernaam leeg zodat certificaten van meerdere servers kunnen worden geaccepteerd met een certificaat dat is ondertekend door een instantie uit de vervolgkeuzelijst Netwerkcertificeringsinstantie. (aanbevolen) of: Geef de domeinnaam van de server op waarvan een certificaat wordt geaccepteerd.


Bewerk het statische wachtwoord.


Klik op OK om de wijzigingen in het venster met de EAP-GTC-instellingen op te slaan.


Klik op Annuleren om de wijzigingen in het venster met de EAP-GTC-instellingen te annuleren.


Voor infrastructuurnetwerken (toegangspunt) geeft u het MAC-adres op van een toegangspunt en stelt u het in als het eerste toegangspunt waarmee de client verbinding moet maken.


Voor infrastructuurnetwerken (toegangspunt) geeft u het MAC-adres op van een toegangspunt en stelt u het in als het tweede toegangspunt waarmee de client verbinding moet maken.


Voor infrastructuurnetwerken (toegangspunt) geeft u het MAC-adres op van een toegangspunt en stelt u het in als het derde toegangspunt waarmee de client verbinding moet maken.


Voor infrastructuurnetwerken (toegangspunt) geeft u het MAC-adres op van een toegangspunt en stelt u het in als het vierde toegangspunt waarmee de client verbinding moet maken.


Klik op OK om de wijzigingen in het venster Voorkeurstoegangspunten op te slaan.


Klik op Annuleren om de wijzigingen in het venster Voorkeurstoegangspunten te annuleren.


Schakel de optie Windows-gebruikersnaam gebruiken in als u de Windows-gebruikersnaam wilt gebruiken als beveiligingsgebruikersnaam.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 64-bits. Geef voor 64-bits sleutels 10 cijfers op voor hexadecimaal of 5 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 64-bits. Geef voor 64-bits sleutels 10 cijfers op voor hexadecimaal of 5 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 64-bits. Geef voor 64-bits sleutels 10 cijfers op voor hexadecimaal of 5 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 64-bits. Geef voor 64-bits sleutels 10 cijfers op voor hexadecimaal of 5 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 128-bits. Geef voor 128-bits sleutels 26 cijfers op voor hexadecimaal of 13 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 128-bits. Geef voor 128-bits sleutels 26 cijfers op voor hexadecimaal of 13 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 128-bits. Geef voor 128-bits sleutels 26 cijfers op voor hexadecimaal of 13 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 128-bits. Geef voor 128-bits sleutels 26 cijfers op voor hexadecimaal of 13 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 152-bits. Geef voor 152-bits sleutels 32 cijfers op voor hexadecimaal of 16 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 152-bits. Geef voor 152-bits sleutels 32 cijfers op voor hexadecimaal of 16 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 152-bits. Geef voor 152-bits sleutels 32 cijfers op voor hexadecimaal of 16 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Selecteer dit keuzerondje om de lengte van de vooraf-gedeelde sleutels in te stellen op 152-bits. Geef voor 152-bits sleutels 32 cijfers op voor hexadecimaal of 16 ASCII-tekens. Deze lengte moet overeenkomen met de sleutellengte van het toegangspunt.


Geef de LEAP/EAP-FAST-gebruikersnaam op die moet worden opgeslagen en gebruikt.


Geef het LEAP/EAP-FAST-wachtwoord op dat moet worden opgeslagen en gebruikt.


Gebruik het venster met instellingen voor LEAP/EAP-FAST-gebruikersnaam en -wachtwoord om de LEAP-aanmelding in te stellen.


Klik op OK om de wijzigingen in het venster met LEAP/EAP-FAST-instellingen op te slaan.


Klik op Annuleren om de wijzigingen in het venster met LEAP/EAP-FAST-instellingen te annuleren.


Stel de modus die wordt gebruikt voor het verifiëren van een toegangspunt in op Automatisch Met Automatisch wordt de verificatie uitgevoerd met de optie Gedeeld. Als dit mislukt, wordt openbare verificatie gebruikt.


Stel de modus die wordt gebruikt voor het verifiëren van een toegangspunt in op Open Met Openen wordt de verificatie uitgevoerd ongeacht de WEP-instellingen. Hiermee wordt het toegangspunt alleen gekoppeld als de WEP-sleutels van de adapter en het toegangspunt overeenkomen.


Stel de modus die wordt gebruikt voor het verifiëren van een toegangspunt in op Gedeeld Met Gedeeld kan de adapter alleen worden gekoppeld aan toegangspunten met dezelfde WEP-sleutel.


Hiermee selecteert u het energieniveau voor verzenden voor 80211b/g in mW. Het werkelijke energieniveau wordt mogelijk beperkt door voorgeschreven domein- of hardwarebeperkingen.


Hiermee selecteert u het energieniveau voor verzenden voor 802.11b in mW. Het werkelijke energieniveau wordt mogelijk beperkt door voorgeschreven domein- of hardwarebeperkingen.


Hiermee selecteert u het energieniveau voor verzenden voor 80211b/g of 802.11a (in mW). Het werkelijke energieniveau wordt mogelijk beperkt door voorgeschreven domein- of hardwarebeperkingen.


Hiermee worden de beschikbare energieniveaus voor 802.11a weergegeven.


Hiermee wordt de sterkte van het signaal weergegeven.


In de keuzelijst Profielen beheren worden de profielen weergegeven die al zijn gemaakt. Het actieve profiel is gemarkeerd met een pictogram.


Hiermee schakelt u WPA-beveiliging (Wi-Fi Protected Access) in. Selecteer het keuzerondje Beveiliging en selecteer vervolgens het EAP-type in de vervolgkeuzelijst. Klik op Configureren om de opties in te stellen.


Hiermee schakelt u WPA-toegangscodebeveiliging (Wi-Fi Protected Access) in. Selecteer het keuzerondje Beveiliging en klik op Configureren om de opties in te stellen.


Hiermee schakelt u 802.1x-beveiliging in. Selecteer het keuzerondje Beveiliging en selecteer vervolgens het EAP-type in de vervolgkeuzelijst. Klik op Configureren om de opties in te stellen.


Hiermee kunt u vooraf-gedeelde sleutels gebruiken die op het toegangspunt en het station zijn gedefinieerd. Selecteer het keuzerondje Beveiliging en klik op Configureren om de opties in te stellen.


Geen beveiliging (dit wordt afgeraden).


Selecteer de gewenste soort beveiliging en klik op Configureren om de beveiliging in te stellen.


Selecteer WPA-beveiliging (Wi-Fi Protected Access) en typ EAP-type in de vervolgkeuzelijst. Klik op Configureren om de opties in te stellen.


Selecteer 802.1X-beveiliging en typ EAP in de vervolgkeuzelijst. Klik op Configureren om de opties in te stellen.


Laat het vak voor de servernaam leeg zodat certificaten van meerdere servers kunnen worden geaccepteerd met een certificaat dat is ondertekend door een instantie uit de vervolgkeuzelijst Netwerkcertificeringsinstantie. (aanbevolen). Of geef de domeinnaam van de server op waarvan een certificaat wordt geaccepteerd.


Wijzig desgewenst de aanmeldingsnaam.


Met de knop Adaptergegevens hebt u toegang tot algemene informatie over de netwerkinterfacekaart (de draadloze netwerkadapter) en het NDIS-stuurprogramma (Network Driver Interface Specification).


Hiermee worden de beschikbare energieniveaus voor 802.11b/g weergegeven.


Hiermee geeft u het huidige land weer.


Schakel dit selectievakje in om de Super AG-modus te gebruiken voor de draadloze kaart.


Schakel dit selectievakje in om de XR-modus (eXtended Range) te gebruiken voor de draadloze kaart.


Schakel dit selectievakje in om de QoS-modus (WMM) te gebruiken voor de draadloze kaart.


Schakel dit selectievakje in om de computernaam als gebruikersnaam voor de beveiliging te gebruiken.


Schakel dit selectievakje in om de computernaam als gebruikersnaam voor de beveiliging te gebruiken.


Schakel dit selectievakje in om de gebruikersgegevens op te geven.


Geef in dit veld een gebruikersnaam op om een aparte gebruikersnaam te gebruiken en het verificatieproces te starten.


Geef in dit veld een wachtwoord op om een apart wachtwoord te gebruiken en het verificatieproces te starten.


Geef in dit veld het wachtwoord nogmaals op om het aparte wachtwoord te bevestigen en het verificatieproces te starten.


Klik om een nieuwe domeinnaam op te geven voor het accepteren van certificaten.


Geef een nieuwe domeinnaam op waarvan de client certificaten accepteert.


Geef een aanmeldingsnaam op voor het nieuwe domein waarvan de client certificaten accepteert.


Klik op OK om de domeinnaam en aanmeldingsnaam te wijzigen.


Klik op Annuleren om de wijzigingen van de domein- en aanmeldingsnaam te annuleren.


Klik om een nieuwe domeinnaam op te geven voor het accepteren van certificaten.


Geef een wachtwoord op in dit vak als u een ander wachtwoord wilt gebruiken en start de verificatie.


Geef het wachtwoord opnieuw op in dit vak als u een ander wachtwoord wilt gebruiken en start de verificatie.


Schakel dit selectievakje in om automatische PAC (Protected Access Credentials) toe te staan.


Selecteer een PAC-instantie (Protected Access Credential) in de vervolgkeuzelijst.


Klik op de knop Meer selecteren om meer PAC-profielen (Protected Acces Credentials) te importeren.


Klik op de knop Meer selecteren om meer PAC-profielen (Protected Acces Credentials) te importeren.


Markeer een PAC voor EAP-FAST en klik op de knop Verwijderen om het EAP-FAST-profiel te verwijderen.


Het PAC-archief geeft de beschikbare PAC's voor EAP-FAST weer. Gebruik dit venster om PAC's voor EAP-FAST te importeren of te verwijderen.


Selecteer het keuzerondje Openbaar om alleen openbare PAC's voor EAP-FAST weer te geven.


Selecteer het keuzerondje Persoonlijk om alleen persoonlijke PAC's voor EAP-FAST weer te geven.


Klik op OK om alle wijzigingen in dit venster te accepteren.


Klik op Annuleren om het venster te sluiten zonder de wijzigingen op te slaan.


Selecteer deze optie om het systeem automatisch naar de gebruikersnaam en het wachtwoord te laten vragen.


Schakel dit selectievakje in om het profiel in te stellen als systeemprofiel. Een systeemprofiel is toegankelijk voor alle gebruikers. Het kan ook worden gebruikt als sjabloon om meer profielen te maken.


De gebruikersnaam en het wachtwoord gebruiken voor verificatie.


Een certificaat selecteren voor verificatie.


Een certificaat gebruiken voor verificatie.


De draadloze kaart toestaan de frequentie voor hulpdiensten te gebruiken.


Informatie die u kunt toevoegen aan de scanlijst.


Informatie die wordt weergegeven in de scanlijst.


Deze informatie weergeven in de scanlijst.


Deze informatie verwijderen uit de scanlijst.


De geselecteerde kolom omhoog verplaatsen in de scanlijst.


De geselecteerde kolom omlaag verplaatsen in de scanlijst.


De sessie automatisch hervatten na onderbreking [alleen als de verbinding tijdelijk wordt verbroken, niet voor alle situaties voor onderbreken/hervatten].


De tijd die moet verstrijken voordat het groepsbeleid wordt gestart door het Windows-aanmeldingsproces.


De sessie automatisch hervatten na onderbreking [alleen als de verbinding tijdelijk wordt verbroken, niet voor alle situaties voor onderbreken/hervatten].


Als dit selectievakje is ingeschakeld, kunt u de profielinstellingen niet wijzigen. Neem contact op met de systeembeheerder.


Gebruik de Atheros-functie Super A/G. Hiermee worden verschillende technologieën gecombineerd voor maximale doorvoer bij draadloze verbindingen.


Selecteer een of meer PAC-instanties (Protected Access Credential).


Schakel deze optie in om PAC's die tot dezelfde groep behoren, automatisch te selecteren.


Automatische PAC (Protected Access Credentials) toestaan.


Selecteer het EAP-type 802.1X-beveiliging in de vervolgkeuzelijst voor het selecteren van PAC's. Klik op Configureren om de opties in te stellen.


Schakel deze optie in om dezelfde EAP-FAST-verificatie te gebruiken tijdens het automatisch selecteren van de PAC.


Schakel deze optie in om de PAC van de computer te gebruiken voor het aanmelden op het domein.


Selecteer deze optie zodat de verbinding van de draadloze adapter wordt verbroken na het afmelden.


De sessie automatisch hervatten na onderbreking [alleen als de verbinding tijdelijk wordt verbroken, niet voor alle situaties voor onderbreken/hervatten].


Schakel deze optie in om de serververificatie uit te voeren.


Geef de certificeringsinstantie op die moet worden gebruikt.


Gebruik een tijdelijke gebruikersnaam en een tijdelijk wachtwoord om aan te melden. Uw Windows-gebruikersnaam en wachtwoord kunnen worden gevraagd.


Gebruik uw Windows-gebruikersnaam op deze computer als uw gebruikersnaam voor de verificatie.


Selecteer deze optie om het systeem automatisch naar de gebruikersnaam en het wachtwoord te laten vragen.


Aanmelden en het verificatieproces handmatig starten.


Geef de verificatiegebruikersnaam, het wachtwoord en het domein op die moeten worden opgeslagen en gebruikt.


Geef de gebruikersnaam op voor dynamische beveiliging.


Geef het wachtwoord op voor dynamische beveiliging.


Geef het wachtwoord opnieuw op.


Geef de domeinnaam op.


Het Windows-aanmeldingsdomein met gebruikersnaam opgeven bij de RADIUS-server. (Dit is de standaardinstelling.)


Schakel deze optie in om de serververificatie uit te voeren.


Schakel deze optie in om de serververificatie uit te voeren.


Klik op deze knop om de geselecteerde EAP-FAST-verificatiemethode te configureren.


Klik op deze knop om de geselecteerde verificatiemethode voor het selecteren van de PAC te configureren.


Klik op deze knop om de PAC's te beheren en te organiseren


Klik op deze knop om een server of domein en aanmeldingsnaam op te geven.


Klik op deze knop om het dialoogvenster te sluiten nadat u de gebruikersnaam en de wachtwoordinstellingen hebt opgeslagen.


Klik op deze knop om het dialoogvenster te sluiten zonder de gebruikersnaam en de wachtwoordinstellingen op te slaan.


Klik op deze knop om het dialoogvenster te sluiten nadat u de EAP-FAST-instellingen hebt opgeslagen.


Klik op deze knop om het dialoogvenster te sluiten zonder de EAP-FAST-instellingen op te slaan.


Voer de PAC-gegevens (Protected Access Credentials) in.


Geef de gebruikersnaam en het wachtwoord op.


Klik op deze knop om een nieuwe groep te maken.


Klik op deze knop om dit venster te sluiten.


Beheer en organiseer de PAC's via het snelmenu of de opdrachtknoppen hieronder.


Geef de PAC-bestandsnaam met het pad op.


Klik op de knop om naar de map van het gewenste PAC-bestand te bladeren. Klik op de knop Importeren om het geselecteerde bestand te importeren.


Selecteer deze optie om de PAC in het persoonlijke archief te importeren.


Selecteer deze optie om de PAC in het algemene archief te importeren.Klik op deze knop om het importeren van de geselecteerde PAC te starten.Klik op deze knop om dit dialoogvenster te sluiten.Hiermee wordt de PAC-verificatienaam weergegevenHiermee wordt de PAC-verificatie-ID weergegevenHiermee wordt de PAC-naam weergegevenHiermee wordt het PAC-type weergegeven. Dit kan een tunnel-PAC, computer-PAC of gebruikers-PAC zijnHiermee wordt de PAC-vervaldatum weergegevenKlik op de knop om het dialoogvenster te sluitenHiermee wordt het PAC-archieftype weergegeven. Dit kan een Nieuwe PAC, Persoonlijke PAC of Openbare PAC zijnVoer de verificatie altijd opnieuw uit met het certificaat van de gebruiker nadat een gebruiker is aangemeld.


Toont de draadloze frequenties die door de kaart worden ondersteund.


Wijzigt de gegevens van het geselecteerde configuratieprofiel.Druk op deze knop om het geselecteerde configuratieprofiel te verwijderen.


Beperkt de tijd die wordt besteed aan het zoeken van een domeincontroller en geeft de tijd op in seconden in de overeenkomende keuzelijst met invoervak.


Geef het aantal seconden (tot 300) op tot de time-out voor het verificatieproces moet worden geactiveerd wanneer een domeincontroller wordt gezocht.


De draadloze kaart toestaan de draadloze modus 5 GHz en 300 Mbps te gebruiken.


De draadloze kaart toestaan de draadloze modus 2 GHz en 300 Mbps te gebruiken.


Schakelt de draadloze LAN automatisch uit wanneer de LAN-verbinding is ingeschakeld, of schakeld de draadloze LAN in wanneer de LAN-verbinding is uitgeschakeld.


Als dit vakje is aangevinkt, kunnen de energieniveaus voor verzenden niet kunnen worden gewijzigd. Neem contact op met de systeembeheerder voor meer informatie.


Gebruik deze keuzerondjes om het hulpprogramma te kiezen dat het draadloze netwerk moet beheren.


Kies dit om Windows het draadloze netwerk te laten beheren.


Kies dit om de ACU het draadloze netwerk te laten beheren.


Kies dit om een extern hulpprogramma het draadloze netwerk te laten beheren.


Kies het roamingniveau volgens de agressiviteit van het roamen.


Hiermee wordt het extra kanaal weergegeven dat wordt gebruikt in modus 40 MHz.


Hiermee wordt de extra frequentie weergegeven die wordt gebruikt in modus 40 MHz.


Hiermee wordt de 802.11n MIMO-energiebesparingsstatus weergegeven.


Hiermee wordt de breedte van het huidige kanaal weergegeven.


Hiermee wordt de draadloze modus ingesteld op 5 GHz en 300 Mbps bij het starten van een ad-hocnetwork.


Hiermee wordt de draadloze modus ingesteld op 2.4 GHz en 300 Mbps bij het starten van een ad-hocnetwork.


Selecteer het profiel uit de lijst en klik op Test starten om de diagnostische kanaalmodus te starten.


Geeft de status en voortgang van de gevraagde tests weer.


Start de diagnostische kanaalmodus.Stopt de diagnostische kanaalmodus, indien gestart.


Sla de status en voortgang op.Ga naar de map waar u de status naar een bestand wilt opslaan.


Stopt de diagnostische kanaalmodus (indien gestart) en sluit het venster.


Selecteer de SIM-kaart (subscriber identity module) die moet worden gebruikt.


Voer de pincode in die moet worden gebruikt om toegang te krijgen tot de SIM-kaart (subscriber identity module).


Bevestig de pincode die moet worden gebruikt om toegang te krijgen tot de SIM-kaart (subscriber identity module).


Selecteer het EAP-type voor de WPA/WPA2-beveiliging in de vervolgkeuzelijst. Klik op Configureren om de instelling uit te voeren t.


Vernieuw de lijst van SIM-kaarten die in het systeem zijn geplaatst.


Selecteer deze optie om de IMSI van de SIM-kaart als aanmeldingsnaam te gebruiken.