Copyright: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved
Citation: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved


Zeigt die Funkfrequenz der aktuellen Verbindung sowie die maximale Geschwindigkeit an.


Zeigt den derzeit ausgewählten Namen des Konfigurationsprofils an.


Zeigt an, ob die Station mit dem drahtlosen Netzwerk verbunden ist.


Zeigt die Übertragungsrate für die aktuelle Treiberverbindung an.


Zeigt die Empfangsrate für die aktuelle Treiberverbindung an.


Zeigt den Betriebsmodus des Netzwerks an: Infrastruktur oder Ad-Hoc.


Zeigt den vom Treiber verwendeten Sicherheitsmodus an (Aus, WEP, AES oder CKIP).


Zeigt die IP-Adresse an, die das TCP/IP-Protokoll für diesen drahtlosen Adapter verwendet.


Zeigt eine Liste von konfigurierten Profilen an. Um zu einem anderen Profil zu wechseln, klicken Sie auf den entsprechenden Namen in der Profilliste und anschließend auf „Aktivieren“.


Zeigt Details zum ausgewählten Konfigurationsprofils an.


Zeigt den ersten Netzwerknamen (SSID1) für das ausgewählte Konfigurationsprofil an.


Zeigt den zweiten Netzwerknamen (SSID2) für das ausgewählte Konfigurationsprofil an.


Zeigt den dritten Netzwerknamen (SSID3) für das ausgewählte Konfigurationsprofil an.


Zeigt den Netzwerkverbindungstyp des ausgewählten Konfigurationsprofils an.


Zeigt die Adresse des drahtlosen Adapters für das ausgewählte Konfigurationsprofil an.


Zeigt den Sicherheitsmodus des ausgewählten Konfigurationsprofils an.


Zeigt den Standardschlüssel des ausgewählten Konfigurationsprofils an.


Zeigt den aktuellen Energiesparmodus des ausgewählten Konfigurationsprofils an.


Klicken Sie auf diese Schaltfläche, um ein neues Konfigurationsprofil zu erstellen und die allgemeinen, erweiterten und Sicherheitsinformationen hinzuzufügen.


Klicken Sie auf diese Schaltfläche, um Informationen über das derzeit ausgewählte Konfigurationsprofil zu ändern.


Klicken Sie auf diese Schaltfläche, um das derzeit ausgewählte Konfigurationsprofil zu löschen.


Klicken Sie auf diese Schaltfläche, um die Änderungen auf das derzeit ausgewählte Konfigurationsprofil anzuwenden.


Zeigt den Namen des drahtlosen Adapters an. Dabei handelt es sich um den Namen, den das Betriebssystem dem drahtlosen Adapter zugewiesen hat.


Zeigt die MAC-Adresse des drahtlosen Adapters an.


Zeigt den Treibernamen und den Pfad des drahtlosen Adapters an.


Zeigt die Treiberversion des drahtlosen Adapters an.


Zeigt das Erstellungsdatum des Treibers für den drahtlosen Adapter an.


Zeigt den Netzwerknamen (SSID) des ausgewählten Wireless LAN an.


Zeigt die MAC-Adresse (BSSID) des Zugriffpunkts an, mit dem der drahtlose Adapter verbunden ist.


Zeigt den Betriebsstatus des drahtlosen Adapters an.


Zeigt den Betriebskanal und die Frequenz der Station an.


Zeigt die verfügbaren Zugriffspunkte und Ad-Hoc-Netzwerke einschließlich Netzwerknamen, Sicherheit, Empfangsstärke, Funkmodus, Kanalnummer und Frequenz an.  Doppelklicken Sie auf ein verfügbares Netzwerk, um eine Verbindung dazu herzustellen, wenn bereits ein Konfigurationsprofil erstellt wurde, oder um ein Konfigurationsprofil für diesen Netzwerknamen zu erstellen.


Enthält Angaben bezüglich der Anzahl der übertragenen Multicast-, Broadcast- und Unicastframes sowie der Gesamtanzahl von übertragenen Bytes.


Zeigt die Anzahl der übertragenen Multicastframes an.  Multicastframes werden an mehrere Empfänger gesendet.


Zeigt die Anzahl der übertragenen Broadcastframes an.  Broadcastframes werden an alle Hosts eines Netzwerks gesendet.


Zeigt die Anzahl der übertragenen Unicastframes an.  Unicastframes werden nur an einen Empfänger gesendet.


Zeigt die Gesamtanzahl der in allen Frames übertragenen Byte an.


Enthält Messwerte bezüglich der Anzahl der empfangenen Multicast-, Broadcast- und Unicastframes sowie der Gesamtanzahl von empfangenen Byte.


Zeigt die Anzahl der empfangenen Multicastframes an.  Multicastframes werden an mehrere Empfänger gesendet.


Zeigt die Anzahl der empfangenen Broadcastframes an.  Broadcastframes werden an alle Hosts eines Netzwerks gesendet.


Zeigt die Anzahl der empfangenen Unicastframes an.  Unicastframes werden nur an einen Empfänger gesendet.


Zeigt die Gesamtanzahl der mit allen Frames empfangenen Bytes an.


Zeigt die Betriebsdauer des drahtlosen Adapters an.


Klicken Sie auf diese Schaltfläche, um alle Statistiken auf Null zurückzusetzen.


Klicken Sie auf diese Schaltfläche, um erweiterte Statistiken anzuzeigen.


Klicken Sie auf diese Schaltfläche, um Treiberinformationen anzuzeigen.


Klicken Sie auf diese Schaltfläche, um die Funkfunktion zu aktivieren oder zu deaktivieren.


Klicken Sie auf diese Schaltfläche, um das Taskleistensymbol in der Taskleiste des PCs ein- oder auszublenden. Das Taskleistensymbol ändert je nach Empfangsstärke des Signals die Farbe und zeigt zudem die Betriebsfrequenz an.


Klicken Sie auf diese Schaltfläche, um auf die Site Survey-Anwendung zuzugreifen.

Nachdem diese Anwendung initialisiert wurde, zeigt sie eine grafische Darstellung der Empfangsstärke sowie die Qualität der Verbindung zum Zugriffspunkt an. Stellen Sie anhand dieser Angaben fest, ob weitere Zugriffspunkte im Netzwerk erforderlich sind, während Sie die Position des drahtlosen Adapters ändern.


Legen Sie den Namen für dieses Konfigurationsprofil fest.


Legen Sie die Netzwerknamen (SSIDs) für dieses Konfigurationsprofil fest.  Lassen Sie alle SSIDs leer, um Verbindungen zu beliebigen Zugriffspunkten herstellen zu können.


Legen Sie die erste SSID für dieses Konfigurationsprofil fest.  Lassen Sie alle SSIDs leer, um Verbindungen zu beliebigen Zugriffspunkten herstellen zu können.


Legen Sie die zweite SSID für dieses Konfigurationsprofil fest.  Lassen Sie alle SSIDs leer, um Verbindungen zu beliebigen Zugriffspunkten herstellen zu können.


Legen Sie die dritte SSID für dieses Konfigurationsprofil fest.  Lassen Sie alle SSIDs leer, um Verbindungen zu beliebigen Zugriffspunkten herstellen zu können.


Legen Sie den Netzwerktyp für dieses Konfigurationsprofil fest.


Legen Sie den Energiesparmodus für dieses Konfigurationsprofil fest.


Aktivieren Sie ein Optionsfeld, um den Verschlüsselungstyp auszuwählen.


Aktivieren Sie dieses Optionsfeld, um die Verschlüsselung zu deaktivieren.


Zum Aktivieren der dynamischen Sicherheit klicken Sie auf das Optionsfeld „Dynamische Sicherheit“, wählen Sie die gewünschte Sicherheit im Dropdown-Menü aus, und klicken Sie auf „Konfigurieren“, um benutzerdefinierte Informationen einzugeben.


Klicken Sie auf dieses Optionsfeld, um vorinstallierte Schlüssel festzulegen.


Zeigt die Schlüsseleingabemethode an.


Zeigt die Verwendung von Hexadezimalzeichen (0 – 9, A – F) für Schlüsseleinträge an.


Zeigt die Verwendung von ASCII-Textzeichen (alle Tastenzeichen außer Leerzeichen) für Schlüsseleinträge an.


Klicken Sie auf das Optionsfeld „Per-User Key“, um diesen Schlüssel als Standardverschlüsselungsschlüssel festzulegen.


Aktivieren Sie das Optionsfeld „Erster“, um diesen Schlüssel als Standardverschlüsselungsschlüssel festzulegen.


Aktivieren Sie das Optionsfeld „Zweiter“, um diesen Schlüssel als Standardverschlüsselungsschlüssel festzulegen.


Aktivieren Sie das Optionsfeld „Dritter“, um diesen Schlüssel als Standardverschlüsselungsschlüssel festzulegen.


Aktivieren Sie das Optionsfeld „Vierter“, um diesen Schlüssel als Standardverschlüsselungsschlüssel festzulegen.


Geben Sie den Wert für den eindeutigen Verschlüsselungsschlüssel in dieses Feld ein.


Geben Sie den Wert für den ersten Verschlüsselungsschlüssel in dieses Feld ein.


Geben Sie den Wert für den zweiten Verschlüsselungsschlüssel in dieses Feld ein.


Geben Sie den Wert für den dritten Verschlüsselungsschlüssel in dieses Feld ein.


Geben Sie den Wert für den vierten Verschlüsselungsschlüssel in dieses Feld ein.


Wählen Sie die Länge des eindeutigen Verschlüsselungsschlüssels im Dropdown-Menü aus.


Wählen Sie die Länge des ersten Verschlüsselungsschlüssels im Dropdown-Menü aus.


Wählen Sie die Länge des zweiten Verschlüsselungsschlüssels im Dropdown-Menü aus.


Wählen Sie die Länge des dritten Verschlüsselungsschlüssels im Dropdown-Menü aus.


Wählen Sie die Länge des vierten Verschlüsselungsschlüssels im Dropdown-Menü aus.


Aktivieren Sie mit diesem Kontrollkästchen das Lightweight Extensible Authentication Protocol (LEAP).


Klicken Sie hier, um den LEAP/EAP-FAST-Benutzernamen und das Kennwort anzugeben.  Der Name kann bis zu 64 Zeichen lang sein.


Legen Sie das LEAP/EAP-FAST-Kennwort fest.  Das Kennwort kann bis zu 64 Zeichen lang sein.


Geben Sie mithilfe dieses Kontrollkästchens eine MAC-Adresse für den drahtlosen Adapter ein.  Diese Adresse überschreibt die globale MAC-Adresse des drahtlosen Adapters.


Geben Sie die Adresse des drahtlosen Adapters im Hexadezimalformat ein.


Ermöglicht die Auswahl der Scanmethode des drahtlosen Adapters, mit der Zugriffspunkte oder Ad-Hoc-Netzwerke gesucht werden.


Aktivieren Sie dieses Optionsfeld, um das passive Scannen zu aktivieren.  Das passive Scannen gibt an, dass der drahtlose Adapter sich im Nur-Hören-Modus befindet.


Aktivieren Sie dieses Optionsfeld, um das automatische Scannen zu aktivieren.  Der Treiber legt mithilfe des Länderschlüssels fest, welcher Scantyp verwendet wird: aktiv oder passiv.


Legen Sie mithilfe des Dropdown-Menüs den Pegel für die Übertragungsleistung fest.  Die tatsächliche Übertragungsleistung kann durch Überwachungsdomänen oder Hardware-Einschränkungen begrenzt sein.


Wählen Sie den Funkmodus für den drahtlosen Adapter.


Wählen Sie den Funkmodus, in dem das Ad-Hoc-Netzwerk startet, wenn kein Ad-Hoc-Netzwerk mit dem aktuellen Namen gefunden wird.


Lassen Sie mit diesem Kontrollkästchen zu, dass der drahtlose Adapter den Funkmodus 5 GHz, 54 MBit/s verwendet.


Lassen Sie mit diesem Kontrollkästchen zu, dass der drahtlose Adapter den 5-GHz-Funkmodus verwendet.


Lassen Sie mit diesem Kontrollkästchen zu, dass der drahtlose Adapter den Funkmodus 2,4 GHz, 11 MBit/s verwendet.


Stellen Sie mit diesem Kontrollkästchen den Funkmodus auf 5 GHz und 54 MBit/s ein, wenn Sie ein Ad-Hoc-Netzwerk starten.


Stellen Sie mit diesem Kontrollkästchen den Funkmodus auf 5 GHz ein, wenn Sie ein Ad-Hoc-Netzwerk starten.


Stellen Sie mit diesem Kontrollkästchen den Funkmodus auf 2,4 GHz und 11 MBit/s ein, wenn Sie ein Ad-Hoc-Netzwerk starten.


Zeigt den Pegel der Übertragungsleistung in mW an.


Zeigt den Namen des Netzwerks (SSID) an, mit dem die Station verbunden ist oder eine Verbindung herzustellen versucht.


Zeigt an, ob dieses Konfigurationsprofil für die Teilnahme in einem QoS-Netzwerk aktiviert ist.


Zeigt den Geräuschpegel der aktuellen Verbindung in dBm an.


Zeigt den Status des Energiesparmodus für dieses Konfigurationsprofil an.


Zeigt die Frequenz der aktuellen Verbindung an.


Klicken Sie auf diese Schaltfläche, um das Dialogfeld „Erweiterter Status“ zu schließen.


Zeigt Übertragungsstatistiken an.


Zeigt die Anzahl von Signalen an, die vom drahtlosen Adapter übertragen wurden.


Zeigt die Anzahl von Signalen an, die fehlerfrei vom drahtlosen Adapter übertragen wurden.


Zeigt die Anzahl von Frames an, die erneut gesendet wurden, da sie von der Station nicht empfangen werden konnten.


Zeigt die Anzahl von Frames an, die verworfen wurden, da sie nie von der Station empfangen werden konnten.


Zeigt die Anzahl von Request to Send-(RTS)-Frames an, die vom drahtlosen Adapter übertragen wurden.


Zeigt Empfangsstatistiken an.


Zeigt die Anzahl von Signalen an, die vom drahtlosen Adapter empfangen wurden.


Zeigt die Anzahl von Frames an, die fehlerfrei vom drahtlosen Adapter empfangen wurden.


Zeigt die Anzahl von Frames an, die fehlerhaft vom drahtlosen Adapter empfangen wurden.


Zeigt die Anzahl von empfangenen Frames an, die der drahtlose Adapter nicht entschlüsseln konnte.


Zeigt die Anzahl von Frames an, die vom drahtlosen Adapter abgelehnt wurden, da sie bereits zu einem früheren Zeitpunkt empfangen worden waren.


Zeigt die Anzahl von Clear to Send-(CTS)-Frames an, die vom drahtlosen Adapter empfangen wurden.


Zeigt die Anzahl von Zugriffspunkt-Authentifizierungsfehlern an, die vom drahtlosen Adapter empfangen wurden.


Zeigt die Anzahl von Zugriffspunkt-Verbindungszurückweisungen an, die vom drahtlosen Adapter empfangen wurden.


Klicken Sie auf diese Schaltfläche, um das Dialogfeld „Erweiterte Statistik“ zu schließen.


Klicken Sie auf diese Schaltfläche, um alle Statistiken auf Null zurückzusetzen.


Wählen Sie das Land aus, in dem der drahtlose Adapter betrieben wird.


Aktivieren Sie dieses Optionsfeld, um ein weltweites Roaming zu ermöglichen und alle Kanäle passiv zu durchsuchen, die in der entsprechenden Überwachungsdomäne als verfügbar ausgewiesen sind.


Klicken Sie auf diese Schaltfläche, um die Änderungen am Länderschlüssel zu aktivieren.


Klicken Sie auf diese Schaltfläche, um den Länderschlüsselauswahlschalter zu schließen.


Zeigt die Empfangsstärke in Prozent oder dB an.


Klicken Sie auf diese Schaltfläche, um die Empfangsstärke in Prozent anzuzeigen.


Klicken Sie auf diese Schaltfläche, um die Empfangsstärke in dB anzuzeigen.


Zeigt die Statistikdaten auf der Basis des Aktualisierungsintervalls (Relativ) oder auf der Basis der Gesamtzeit (Kumulativ) an.


Klicken Sie auf diese Schaltfläche, um Statistiken auf der Basis des Aktualisierungsintervalls zu erfassen.


Klicken Sie auf diese Schaltfläche, um Statistiken zu erfassen.


Zeigt das Intervall zum Erfassen von relativen Statistiken in Sekunden an.


Klicken Sie auf diese Schaltfläche, um die Änderungen im Dialogfeld „Anzeigeeinstellungen“ zu aktivieren.


Klicken Sie auf diese Schaltfläche, um das Dialogfeld „Anzeigeeinstellungen“ zu schließen.


Konfigurieren Sie mithilfe der Registerkarte „Allgemein“ die Netzwerknamen und den Konfigurationsnamen für ein Konfigurationsprofil.


Klicken Sie auf die Werkzeugschaltflächen, um den Funk zu aktivieren/deaktivieren, den Länderschlüsselauswahlschalter zu öffnen und/oder das Taskleistensymbol zu aktivieren/deaktivieren.


Verwenden Sie die Registerkarte „Profilverwaltung“, um eine neue Konfiguration hinzuzufügen, eine Konfiguration zu ändern oder zu entfernen oder zu einem anderen Konfigurationsprofil zu wechseln.


Die Registerkarte „Diagnose“ zeigt die Treiberstatistiken an.


Wählen Sie den Einleitungsmodus „Nur lang“ oder „Kurz & Lang“ für 802.11b- und 802.11g-Netzwerke.  „Nur lang“ wird für die Rückwärtskompatibilität mit älteren drahtlosen Adaptern verwendet.


Auf dieser Seite können Sie die statischen Verschlüsselungsschlüssel für die Sicherheit hinzufügen.


Klicken Sie auf die Schaltfläche „Aktualisieren“, um erneut nach verfügbaren Zugriffspunkte und Ad-Hoc-Netzwerke zu suchen und die Liste zu aktualisieren.


Legen Sie auf der Registerkarte „Erweitert“ die erweiterten Konfigurationen für das Konfigurationsprofil fest.


Klicken Sie auf die Schaltfläche „Vorinstallierte Schlüssel definieren“, um ein Dialogfeld zu öffnen und die vorinstallierten Schlüssel einzugeben.


Legen Sie auf der Registerkarte „Sicherheit“ den Verschlüsselungstyp fest, und konfigurieren Sie die dynamische Sicherheit.


Legen Sie als Einleitungsmodus „Kurz & Lang“ fest, damit der drahtlose Adapter den Einleitungsmodus wählen kann.


Legen Sie als Einleitungsmodus „Nur lang“ fest.  Dieser Modus wird für die Rückwärtskompatibilität mit älteren drahtlosen Adaptern verwendet.


Aktivieren Sie ein Kontrollkästchen, um einen Standardschlüssel auszuwählen, füllen Sie anschließend das Schlüsselfeld aus, und wählen Sie im Dropdown-Menü eine Länge aus.


Zeigt aktuelle Informationen über den Treiber an.


Zeigen Sie mithilfe der Registerkarte für den WLAN-Status aktuelle Verbindungsinformationen sowie eine Liste verfügbarer Zugriffspunkte und Ad-Hoc-Netzwerke an.  Wechseln Sie zu einer neuen Verbindung in dieser Liste.


Zeigt erweiterte Übertragungs- und Empfangsstatistiken für den drahtlosen Adapter an.


Zeigt erweiterte Informationen über die Verbindung an.


Klicken Sie auf die Schaltfläche „Erweitert“, um erweiterte Informationen über die Verbindung anzuzeigen.


Ändern Sie mithilfe des Länderschlüsselauswahlschalters das Land, für das der drahtlose Adapter konfiguriert wurde.


Die Registerkarte „Aktueller Status“ zeigt Informationen über die Verbindung an.


Das Feld „Info“ zeigt das Erstellungsdatum und die Versionsnummer dieser Anwendung an.


Im Feld für die Einstellungen können Sie die Anzeige oder das Intervall für die Informationserfassung im kumulativen oder Intervallmodus ändern.  Im Intervallmodus werden die Statistiken bei jedem Start eines Messintervalls auf Null gesetzt.  Das Informationserfassungsintervall wird in Sekunden angezeigt.  Ändern Sie das Intervall, indem Sie einen neuen Wert eingeben oder die Auf-/Abwärtspfeile auf der rechten Seite verwenden.  Je kürzer das Intervall ist, desto mehr CPU-Zeit ist erforderlich.  Zeigt die relative Empfangsstärke in Dezibel (dB) oder Prozent an.


Klicken Sie auf die Schaltfläche „Aktivieren“, um zu einem markierten Zugriffspunkt oder Ad-Hoc-Netzwerk zu wechseln.  Sie können auch auf die SSID doppelklicken.  Wenn für diese SSID kein Profil vorhanden ist, wird ein neues Profil geöffnet, in das die SSID bereits eingetragen ist. Nehmen Sie die erforderlichen Profileinstellungen vor, und klicken Sie auf „OK“, um das Profil zu aktivieren.


Klicken Sie auf die Schaltfläche „Aktivieren“, um zum markierten Profil zu wechseln.  Sie können auch auf den Profilnamen doppelklicken.


Zeigt den derzeit ausgewählten Kanal an.


Lassen Sie mit diesem Kontrollkästchen zu, dass der drahtlose Adapter den Funkmodus 2,4 GHz, 54 MBit/s verwendet.


Stellen Sie mit diesem Kontrollkästchen den Funkmodus auf 2,4 GHz und 54 MBit/s ein, wenn Sie ein Ad-Hoc-Netzwerk starten.


Wählen Sie mithilfe dieses Dropdown-Menüs den Kanal zum Starten des Ad-Hoc-Netzwerks.


Geben Sie ein LEAP/EAP-FAST-Kennwort ein.


Bestätigen Sie das eingegebene LEAP/EAP-FAST-Kennwort.


Klicken Sie hier, um LEAP/EAP-FAST-Einträge zu aktivieren.


Klicken Sie hier, um die Eingaben im Dialogfeld „Benutzerdaten definieren“ zu löschen und das Dialogfeld zu schließen.


Klicken Sie hier, um eine Liste der verfügbaren Zugriffspunkte und Ad-Hoc-Netzwerke anzuzeigen.


Geben Sie den LEAP/EAP-FAST-Benutzernamen ein.


Klicken Sie hier, um Änderungen im Dialogfeld „Profilverwaltung“ zu aktivieren.


Klicken Sie hier, um Änderungen zu verwerfen und das Dialogfeld „Profilverwaltung“ zu schließen.


Klicken Sie hier, um die Konfigurationsfreiheit zu deaktivieren.


Klicken Sie hier, um die Konfigurationsfreiheit aktiviert zu lassen.


Aktivieren Sie das Kontrollkästchen, um dieses Dialogfeld in Zukunft nicht mehr anzuzeigen.


Das ACU wurde während des Installationsprozesses ausgewählt. Die Konfigurationsfreiheit ist ebenfalls aktiviert. Wählen Sie zwischen ACU und Konfigurationsfreiheit.


Klicken Sie hier, um die Eingaben im Dialogfeld „Benutzerdaten definieren“ zu löschen und das Dialogfeld zu schließen.


Legen Sie die Netzwerknamen (SSIDs) für dieses Konfigurationsprofil fest.


Legen Sie mithilfe der folgenden Optionsfelder Sicherheitsoptionen fest.


Geben Sie mithilfe der Schaltfläche „Konfigurieren“ Benutzerinformationen für die festgelegte Sicherheitsoption ein.


Aktivieren Sie das Kontrollkästchen „WPA“, und klicken Sie auf „Konfigurieren“, um Informationen für den sicheren drahtlosen Zugriff einzugeben.


Legen Sie mithilfe des Dropdown-Menüs die gewünschte dynamische Sicherheit fest.


Klicken Sie auf „OK“, um die WPA-Passphrase-Sicherheit zu aktivieren.


Klicken Sie hier, um Änderungen zu verwerfen und das Dialogfeld zu schließen.


Geben Sie das Kennwort für die WPA-Sicherheit ein. Das Kennwort muss mindestens acht Zeichen lang sein.


Geben Sie mithilfe dieses Dialogfelds Informationen über den dynamischen Sicherheitsmodus ein.


Geben Sie den Benutzernamen und das Kennwort für dynamische Sicherheit in die entsprechenden Felder ein.


Geben Sie den Benutzernamen für dynamische Sicherheit in das entsprechende Feld ein.


Geben Sie in dieses Feld den Benutzernamen für dynamische Sicherheit ein.


Geben Sie das Kennwort für dynamische Sicherheit in das entsprechende Feld ein.


Geben Sie in dieses Feld das Kennwort für dynamische Sicherheit ein.


Wiederholen Sie das Kennwort für dynamische Sicherheit im entsprechenden Feld.


Wiederholen Sie in diesem Feld das Kennwort für dynamische Sicherheit.


Wählen Sie im Dropdown-Menü das gewünschte Zertifikat aus.


Legen Sie fest, welcher Zertifizierungsbevollmächtigte aus diesem Bereich verwendet werden soll.


Aktivieren Sie dieses Optionsfeld, um einen beliebigen Zertifizierungsbevollmächtigten auszuwählen.


Aktivieren Sie dieses Optionsfeld, um einen Zertifizierungsbevollmächtigten im Dropdown-Menü auszuwählen.


Legen Sie in diesem Dropdown-Menü einen Zertifizierungsbevollmächtigten fest.


Geben Sie den Server-/Domänennamen für den RADIUS-Server ein.


Geben Sie den Anmeldenamen für den RADIUS-Server ein.


Klicken Sie hier, um Änderungen im Dialogfeld „Zertifikat definieren“ zu übernehmen.


Klicken Sie hier, um die Änderungen zu verwerfen und das Dialogfeld „Zertifikat definieren“ zu schließen.


Legen Sie fest, welcher Zertifizierungsbevollmächtigte aus diesem Bereich verwendet werden soll.


Aktivieren Sie dieses Optionsfeld, um einen beliebigen Zertifizierungsbevollmächtigten auszuwählen.


Aktivieren Sie dieses Optionsfeld, um einen Zertifizierungsbevollmächtigten im Dropdown-Menü auszuwählen.


Legen Sie in diesem Dropdown-Menü einen Zertifizierungsbevollmächtigten fest.


Geben Sie den Server-/Domänennamen für den Sicherheitsserver ein.


Geben Sie den Anmeldenamen für den Sicherheitsserver ein.


Klicken Sie hier, um im Dialogfeld „Benutzerdaten definieren“ Informationen für den Sicherheitsserver einzugeben.


Klicken Sie hier, um Änderungen im Dialogfeld „Zertifikat definieren“ zu übernehmen.


Klicken Sie hier, um die Änderungen zu verwerfen und das Dialogfeld „Zertifikat definieren“ zu schließen.


Geben Sie in diesem Dialogfeld die WPA-Passphrase ein.


Geben Sie mithilfe dieses Dialogfelds Informationen über die dynamische TLS-Sicherheit ein.


Klicken Sie auf „Importieren“, um ein Konfigurationsprofil zu importieren.  Markieren Sie das Profil im entsprechenden Verzeichnis, und klicken Sie dann auf „Öffnen“, um das Profil zu importieren.


Klicken Sie auf „Exportieren“, um ein Konfigurationsprofil zu exportieren.  Gehen Sie zu dem Verzeichnis, in dem das Profil gespeichert werden soll, und klicken Sie dann auf „Speichern“, um das Profil zu exportieren.


Klicken Sie auf „Profile sortieren“, um die Reihenfolge der Konfigurationsprofile im Fenster „Profilverwaltung“ festzulegen.  Klicken Sie im Fenster „Automatische Profilauswahlverwaltung“ nach Bedarf auf „Nach oben verschieben“ oder „Nach unten verschieben“, und klicken Sie dann auf „OK“.


Wenn die automatische Profilauswahl auf der Registerkarte „Profilverwaltung“ über das Kontrollkästchen „Profile automatisch wählen“ aktiviert wurde, sucht der Clientadapter nach einem verfügbaren Netzwerk. Für die Netzwerkverbindung wird das Profil mit der höchsten Priorität und derselben SSID wie das gefundene Netzwerk verwendet. Falls die Verbindung fehlschlägt, verwendet der Clientadapter das Profil mit der nächsthöchsten Priorität, dessen SSID identisch ist, usw.


Das Fehlerbehebungsprogramm ist ein optionales Hilfsprogramm, das Probleme mit der Konfiguration des drahtlosen Adapters und der Verknüpfung löst, wenn sich der Adapter im Zugriffspunkt-(Infrastruktur-)modus befindet. Dieses Hilfsprogramm ist nur in Mini PCI-Lösungen verfügbar.


Gibt die serverbasierte Authentifizierungsmethode an.


Gibt die serverbasierte Authentifizierungsmethode an.


Gibt den für die Datenverschlüsselung verwendeten Sicherheitsmodus an.


Gibt den Authentifizierungstyp an. Mit „Automatisch“ versucht der Adapter, eine Authentifizierung im Installiert-Modus durchzuführen. Falls diese fehlschlägt, wechselt er zur offenen Authentifizierung. Mit der offenen Authentifizierung kann ein Adapter die Authentifizierung ungeachtet der WEP-Einstellungen durchführen. Die Verknüpfung mit dem Zugriffspunkt erfolgt nur, wenn der WEP-Schlüssel des Adapters und des Zugriffspunkts übereinstimmt. Im Installiert-Modus kann der Adapter nur Verknüpfungen zu Zugriffspunkten mit demselben WEP-Schlüssel herstellen.


Gibt an, ob MIC aktiviert ist. MIC verhindert Bit-Flip-Attacken auf verschlüsselte Pakete.


Zeigt den Namen für den verknüpften Zugriffspunkt an.


Zeigt die IP-Adresse für den verknüpften Zugriffspunkt an.


Zeigt die MAC-Adresse für den verknüpften Zugriffspunkt an.


Zeigt die aktuelle Empfangsstärke in dBm oder Prozent an.


Zeigt den aktuellen Geräuschpegel (Signalqualität) in dBm oder Prozent an.


Zeigt die Betriebsdauer des Clientadapters an (in Stunden:Minuten:Sekunden). Wird der Adapter länger als 24 Stunden ausgeführt, wird die Dauer in Tage:Stunden:Minuten:Sekunden angezeigt.


Zeigt das 802.11b-Einleitungsformat an. Konfigurieren Sie das Einleitungsformat auf der Registerkarte „Erweitert“.


Zeigt die derzeitige Empfangsrate in Mbit/s an.


Zeigt die aktuelle Übertragungsrate in Mbit/s an.


Zeigt den derzeit angeschlossenen Kanal an.


Zeigt die von der Station verwendete Frequenz an.


Zeigt die Anzahl von übertragenen Frames an, die nicht bestätigt werden müssen.


Zeigt die Anzahl von übertragenen Frames an, die eine Bestätigung erhalten haben.


Zeigt die Anzahl der empfangenen Fehler bei der zyklischen Redundanzprüfung an.


Zeigt die Anzahl der empfangenen Zugriffspunktunstimmigkeiten an.


Zeigt die Anzahl der empfangenen Datenratenunstimmigkeiten an.


Zeigt die Anzahl der übertragenen Request-to-Send-Frames an.


Zeigt die Anzahl der übertragenen Clear-to-Send-Frames an.


Zeigt die Anzahl der übertragenen Nicht-Clear-to-Send-Frames an.


Zeigt die Anzahl der wiederholt übertragenen Request-to-Send-Frames an.


Zeigt die Anzahl der wiederholt übertragenen Datenframes an.


Zeigt die Anzahl der empfangenen Authentifizierungszeitüberschreitungen an.


Zeigt die Anzahl der empfangenen Verbindungszeitüberschreitung an.


Zeigt die Anzahl der empfangenen Standard-MIC-Authentifizierungen an.


Zeigt die Anzahl der empfangenen Standard-MIC-Fehler an.


Zeigt die Anzahl der empfangenen CKIP MIC-Authentifizierungen an.


Zeigt die Anzahl der empfangenen CKIP MIC-Fehler an.


Zeigt die Anzahl der empfangenen CTS-Frames an.


Zeigt den Namen des Clientcomputers an.


Zeigt die Seriennummer des drahtlosen Adapters an.


Zeigt die Empfangsstärke an.


Dieses Feld zeigt die Profile an, die für die automatische Profilauswahlverwaltung verfügbar sind.


Klicken Sie auf „Hinzufügen“, um ein Profil in die automatische Profilauswahl einzubeziehen. Klicken Sie auf der Registerkarte „Profilverwaltung“ auf die Schaltfläche „Profile sortieren“. Das Fenster „Automatische Profilauswahlverwaltung“ wird mit einer Liste aller erstellten Profile im Feld „Verfügbare Profile“ angezeigt.  Markieren Sie die Profile, die der automatischen Profilauswahl hinzugefügt werden sollen, und klicken Sie anschließend auf „Hinzufügen“. Die Profile werden im Feld „Automatisch ausgewählte Profile“ angezeigt.


Dieses Feld zeigt die automatisch ausgewählten Profile an.


Markieren Sie ein verfügbares Profil oder ein automatisch ausgewähltes Profil, und klicken Sie dann auf „Nach oben verschieben“.


Markieren Sie ein verfügbares Profil oder ein automatisch ausgewähltes Profil, und klicken Sie dann auf „Nach unten verschieben“.


Markieren Sie ein verfügbares Profil oder ein automatisch ausgewähltes Profil, und klicken Sie dann auf „Entfernen“, um das Profil in der Liste zu löschen.


Klicken Sie auf „OK“, um Änderungen im Fenster „Automatische Profilauswahlverwaltung“ zu übernehmen.


Klicken Sie auf „Abbrechen“, um Änderungen im Fenster „Automatische Profilauswahlverwaltung“ zu verwerfen.


Wählt den Pegel der Übertragungsleistung für 802.11a in mW an. Die tatsächliche Übertragungsleistung kann durch Überwachungsdomänen oder Hardware-Einschränkungen begrenzt sein.


Wählen Sie den Modus aus, den der drahtlose Adapter für die Authentifizierung an einem Zugriffspunkt verwendet. Mit „Automatisch“ versucht der Adapter, eine Authentifizierung im Installiert-Modus durchzuführen. Falls diese fehlschlägt, wechselt er zur offenen Authentifizierung. Mit der offenen Authentifizierung kann ein Adapter die Authentifizierung ungeachtet der WEP-Einstellungen durchführen. Die Verknüpfung mit dem Zugriffspunkt erfolgt nur, wenn der WEP-Schlüssel des Adapters und des Zugriffspunkts übereinstimmt. Im Installiert-Modus kann der Adapter nur Verknüpfungen zu Zugriffspunkten mit demselben WEP-Schlüssel herstellen.


Klicken Sie bei Infrastruktur-(Zugriffspunkt-)netzwerken auf die Schaltfläche „Bevorzugte Zugriffspunkte“, um bis zu vier Zugriffspunkte festzulegen, zu denen der Clientadapter eine Verknüpfung herstellen soll.


Identifiziert das Clientgerät.


Wenn für den Zugriffspunkt, mit dem der drahtlose Adapter verknüpft ist, das WEP auf „Optional“ eingestellt ist und der Client das WEP aktiviert hat, stellen Sie sicher, dass auf der Registerkarte „Sicherheit“ die Option „Verknüpfung mit gemischten Zellen zulassen“ aktiviert wurde, um die Verknüpfung zuzulassen.


Wählen Sie die Option „Temporären Benutzernamen und Kennwort verwenden“, indem Sie das Optionsfeld aktivieren.

Klicken Sie auf „Windows-Benutzername verwenden“, um den Windows-Benutzernamen als Authentifizierungsbenutzernamen zu verwenden. ODER: Wählen Sie die Option „Benutzernamen und Kennwort manuell anfordern“ aus, um sich manuell anzumelden und den Authentifizierungsprozess zu starten.


Wählen Sie die Option „Windows-Benutzername verwenden“ aus, um den Windows-Benutzernamen als Authentifizierungsbenutzernamen zu verwenden.


Wählen Sie die Option „Benutzernamen und Kennwort manuell anfordern“ aus, um sich manuell anzumelden und den Authentifizierungsprozess zu starten.


Legen Sie hiermit den Authentifizierungsbenutzernamen, das Kennwort und die Domäne fest, die Sie speichern und verwenden möchten.


Legen Sie hiermit den Authentifizierungsbenutzernamen fest, den Sie speichern und verwenden möchten.


Legen Sie hiermit das Authentifizierungskennwort fest, das Sie speichern und verwenden möchten.


Bestätigen Sie das Authentifizierungskennwort, das Sie speichern und verwenden möchten.


Legen Sie hiermit den speziellen Domänennamen fest, den Sie speichern und verwenden möchten.


Aktivieren Sie die Einstellung „Windows-Anmeldedomäne mit Benutzernamen einbeziehen“, um die Windows-Anmeldedomäne und den Benutzernamen an den RADIUS-Server zu übergeben. (Standardeinstellung)


Aktivieren Sie gegebenenfalls die Option „Nur Netzwerkverbindung, wenn Benutzer angemeldet ist“, um zu erzwingen, dass nach dem Abmelden die Verknüpfung zum drahtlosen Adapter aufgehoben wird.


Geben Sie den Wert für die Authentifizierungszeitüberschreitung ein (zwischen 30 und 500 Sekunden), um festzulegen, wie lange gewartet werden soll, bis eine Authentifizierung als fehlgeschlagen deklariert und eine Fehlermeldung gesendet wird.  Die Standardeinstellung ist 90 Sekunden.


Klicken Sie auf „OK“, um Änderungen im Einstellungsfenster zu speichern.


Klicken Sie auf „Abbrechen“, um die Änderungen im Einstellungsfenster zu verwerfen.


Wählen Sie den entsprechenden Netzwerkzertifikat-Bevollmächtigten in der Dropdown-Liste aus.


Aktivieren Sie die Option „Windows-Benutzername verwenden“, um den Windows-Benutzernamen als EAP-GTC-Benutzernamen zu verwenden.


Geben Sie im Feld "Benutzername" einen PEAP-Benutzernamen ein, um einen separaten Benutzernamen zu verwenden, und starten Sie die EAP-GTC-Authentifizierung.


Wählt ein Token als Kennwort aus. Das Token verwendet ein Hardware-Token-Gerät oder das Programm Secure Computing SofToken (Version 1.3 oder höher), um während der Authentifizierung ein einmaliges Kennwort abzurufen und einzugeben.


Wählt ein statisches Kennwort aus.


Klicken Sie auf „Einstellungen“, um einen bestimmten Server oder eine bestimmte Domäne und einen Anmeldenamen festzulegen.  Lassen Sie das Feld für den Servernamen leer, damit der Client ein Zertifikat von einem beliebigen Server akzeptiert, dessen Zertifikat von dem Bevollmächtigten in der Dropdown-Liste für Netzwerkzertifikat-Bevollmächtigte unterschrieben wurde. (Empfohlen) ODER: Geben Sie den Domänennamen des Servers ein, von dem der Client ein Zertifikat akzeptiert.


Bearbeiten Sie das statisches Kennwort.


Klicken Sie auf „OK“, um Änderungen im EAP-GTC-Konfigurationsfenster zu speichern.


Klicken Sie auf „Abbrechen“, um Änderungen im EAP-GTC-Konfigurationsfenster zu verwerfen.


Geben Sie für Infrastruktur-(Zugriffspunkt-)netzwerke die MAC-Adresse eines Zugriffspunkts ein. Legen Sie ihn als den ersten bevorzugten Zugriffspunkt fest, zu dem der Client eine Verknüpfung herstellen soll.


Geben Sie für Infrastruktur-(Zugriffspunkt-)netzwerke die MAC-Adresse eines Zugriffspunkts ein. Legen Sie ihn als den zweiten bevorzugten Zugriffspunkt fest, zu dem der Client eine Verknüpfung herstellen soll.


Geben Sie für Infrastruktur-(Zugriffspunkt-)netzwerke die MAC-Adresse eines Zugriffspunkts ein. Legen Sie ihn als den dritten bevorzugten Zugriffspunkt fest, zu dem der Client eine Verknüpfung herstellen soll.


Geben Sie für Infrastruktur-(Zugriffspunkt-)netzwerke die MAC-Adresse eines Zugriffspunkts ein. Legen Sie ihn als den vierten bevorzugten Zugriffspunkt fest, zu dem der Client eine Verknüpfung herstellen soll.


Klicken Sie auf „OK“, um Änderungen im Fenster „Bevorzugte Zugriffspunkte“ zu speichern.


Klicken Sie auf „Abbrechen“, um Änderungen im Fenster „Bevorzugte Zugriffspunkte“ zu verwerfen.


Klicken Sie auf „Windows-Benutzername verwenden“, um den Windows-Benutzernamen als Sicherheitsbenutzernamen zu verwenden.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 64 Bit fest. Geben Sie für 64-Bit-Schlüssel 10 Stellen für das Hexadezimalformat bzw. 5 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 64 Bit fest. Geben Sie für 64-Bit-Schlüssel 10 Stellen für das Hexadezimalformat bzw. 5 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 64 Bit fest. Geben Sie für 64-Bit-Schlüssel 10 Stellen für das Hexadezimalformat bzw. 5 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 64 Bit fest. Geben Sie für 64-Bit-Schlüssel 10 Stellen für das Hexadezimalformat bzw. 5 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 128 Bit fest. Geben Sie für 128-Bit-Schlüssel 26 Stellen für das Hexadezimalformat bzw. 13 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 128 Bit fest. Geben Sie für 128-Bit-Schlüssel 26 Stellen für das Hexadezimalformat bzw. 13 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 128 Bit fest. Geben Sie für 128-Bit-Schlüssel 26 Stellen für das Hexadezimalformat bzw. 13 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 128 Bit fest. Geben Sie für 128-Bit-Schlüssel 26 Stellen für das Hexadezimalformat bzw. 13 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 152 Bit fest. Geben Sie für 152-Bit-Schlüssel 32 Stellen für das Hexadezimalformat bzw. 16 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 152 Bit fest. Geben Sie für 152-Bit-Schlüssel 32 Stellen für das Hexadezimalformat bzw. 16 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 152 Bit fest. Geben Sie für 152-Bit-Schlüssel 32 Stellen für das Hexadezimalformat bzw. 16 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie mit diesem Optionsfeld für die Länge des vorinstallierten Schlüssels 152 Bit fest. Geben Sie für 152-Bit-Schlüssel 32 Stellen für das Hexadezimalformat bzw. 16 Zeichen für ASCII-Text ein. Die Länge muss der Schlüssellänge des Zugriffpunkts entsprechen.


Legen Sie den LEAP/EAP-FAST-Benutzernamen fest, den Sie speichern und verwenden möchten.


Legen Sie das LEAP/EAP-FAST-Kennwort fest, das Sie speichern und verwenden möchten.


Richten Sie mithilfe des Fensters „LEAP/EAP-FAST-Benutzername- und Kennworteinstellungen“ die LEAP-Anmeldung ein.


Klicken Sie auf „OK“, um Änderungen im Fenster „LEAP/EAP-FAST-Einstellungen“ zu speichern.


Klicken Sie auf „Abbrechen“, um die Änderungen im Fenster „LEAP/EAP-FAST-Einstellungen“ zu verwerfen.


Stellen Sie den Modus, den der drahtlose Adapter für die Authentifizierung an einem Zugriffspunkt verwendet, auf „Automatisch“ ein. Mit „Automatisch“ versucht der Adapter, eine Authentifizierung im Installiert-Modus durchzuführen. Falls diese fehlschlägt, wechselt er zur offenen Authentifizierung.


Stellen Sie den Modus, den der drahtlose Adapter für die Authentifizierung an einem Zugriffspunkt verwendet, auf „Öffnen“ ein. Mit der offenen Authentifizierung kann ein Adapter die Authentifizierung ungeachtet der WEP-Einstellungen durchführen. Die Verknüpfung mit dem Zugriffspunkt erfolgt nur, wenn der WEP-Schlüssel des Adapters und des Zugriffspunkts übereinstimmt.


Stellen Sie den Modus, den der drahtlose Adapter für die Authentifizierung an einem Zugriffspunkt verwendet, auf „Installiert“ ein.  Im Installiert-Modus kann der Adapter nur Verknüpfungen zu Zugriffspunkten mit demselben WEP-Schlüssel herstellen.


Wählt den Pegel der Übertragungsleistung für 80211b/g in mW aus. Die tatsächliche Übertragungsleistung kann durch Überwachungsdomänen oder Hardware-Einschränkungen begrenzt sein.


Wählt den Pegel der Übertragungsleistung für 802.11a in mW an. Die tatsächliche Übertragungsleistung kann durch Überwachungsdomänen oder Hardware-Einschränkungen begrenzt sein.


Wählt den Pegel der Übertragungsleistung für 80211b/g oder 802.11a in mW aus. Die tatsächliche Übertragungsleistung kann durch Überwachungsdomänen oder Hardware-Einschränkungen begrenzt sein.


Zeigt die verfügbaren Leistungspegel für 802.11a an.


Zeigt die Empfangsstärke an.


Das Listenfeld „Profilverwaltung“ zeigt die bereits erstellten Profile an.  Das aktive Profil ist mit einem Symbol gekennzeichnet.


Ermöglicht die Verwendung von Wi-Fi Protected Access-(WPA-)Sicherheit. Aktivieren Sie das Optionsfeld für die Sicherheit, und wählen Sie dann im Dropdown-Menü den EAP-Typ aus.  Klicken Sie auf „Konfigurieren“.


Ermöglicht die Verwendung von Wi-Fi Protected Access-(WPA-)Passphrase-Sicherheit. Aktivieren Sie das Optionsfeld für die Sicherheit, und klicken Sie dann auf „Konfigurieren“.


Aktiviert die Verwendung der 802.1x-Sicherheit. Aktivieren Sie das Optionsfeld für die Sicherheit, und wählen Sie dann im Dropdown-Menü den EAP-Typ aus.  Klicken Sie auf „Konfigurieren“.


Ermöglicht die Verwendung vorinstallierter Schlüssel, die auf dem Zugriffspunkt und auf der Station definiert werden. Aktivieren Sie das Optionsfeld für die Sicherheit, und klicken Sie dann auf „Konfigurieren“.


Keine Sicherheit (nicht empfohlen).


Aktivieren Sie das Optionsfeld für den zu verwendenden Sicherheitstyp, und klicken Sie dann zum Einrichten des Sicherheitstyps auf „Konfigurieren“.


Wählen Sie den EAP-Typ für die Wi-Fi Protected Access-(WPA-)Sicherheit in der Dropdown-Liste aus.  Klicken Sie auf „Konfigurieren“.


Wählen Sie den EAP-Typ für die 802.1X-Sicherheit in der Dropdown-Liste aus.  Klicken Sie auf „Konfigurieren“.


Lassen Sie das Feld für den Servernamen leer, damit der Client ein Zertifikat von einem beliebigen Server akzeptiert, dessen Zertifikat von dem Bevollmächtigten in der Dropdown-Liste für Netzwerkzertifikat-Bevollmächtigte unterschrieben wurde. (empfohlen). Sie können auch den Domänennamen des Servers eingeben, von dem aus der Client ein Zertifikat akzeptiert.


Ändern Sie gegebenenfalls den Anmeldenamen.


Die Schaltfläche „Adapterinformationen“ enthält allgemeine Informationen zur Netzwerkschnittstellenkarte (dem drahtlosen Netzwerkadapter) und dem Treiber für die Netzwerktreiber-Schnittstellenspezifikation (Network Driver Interface Specification, NDIS).


Zeigt die verfügbaren 802.11b/g-Leistungspegel an.


Zeigt den aktuellen Länderstandort.


Lassen Sie mit diesem Kontrollkästchen zu, dass der drahtlose Adapter den Super AG-Modus verwendet.


Lassen Sie mit diesem Kontrollkästchen zu, dass der drahtlose Adapter den eXtended Range-(XR)-Modus verwendet.


Lassen Sie mit diesem Kontrollkästchen zu, dass der drahtlose Adapter den QoS-(WMM)-Modus verwendet.


Verwenden Sie mit diesem Kontrollkästchen den Gerätenamen als Sicherheitsbenutzernamen.


Verwenden Sie mit diesem Kontrollkästchen den Windows-Benutzernamen als Sicherheitsbenutzernamen.


Geben Sie über dieses Kontrollkästchen Benutzerdaten an.


Wenn Sie einen eigenen Benutzernamen verwenden möchten, geben Sie in dieses Feld einen Benutzernamen ein, und beginnen Sie den Authentifizierungsprozess.


Wenn Sie ein eigenes Kennwort verwenden möchten, geben Sie in dieses Feld ein Kennwort ein, und beginnen Sie den Authentifizierungsprozess.


Geben Sie in dieses Feld das Kennwort erneut ein, um es zu bestätigen, und beginnen Sie den Authentifizierungsprozess.


Klicken Sie hier, um einen Namen für die neue Domäne einzugeben, von der der Client ein Zertifikat akzeptiert.


Geben Sie einen Namen für die neue Domäne ein, von der der Client ein Zertifikat akzeptiert.


Geben Sie einen Anmeldenamen für die neue Domäne ein, von der der Client ein Zertifikat akzeptiert.


Klicken Sie auf „OK“, um die Änderungen am Domänen- und Anmeldenamen zu speichern.


Klicken Sie auf „Abbrechen“, um die Änderungen am Domänen- und Anmeldenamen zu verwerfen.


Klicken Sie hier, um einen Namen für die neue Domäne einzugeben, von der der Client ein Zertifikat akzeptiert.


Wenn Sie ein eigenes Kennwort verwenden möchten, geben Sie in dieses Feld ein Kennwort ein, und beginnen Sie den Authentifizierungsprozess.


Geben Sie in dieses Feld das Kennwort erneut ein, um es zu bestätigen, und beginnen Sie den Authentifizierungsprozess.


Lassen Sie über dieses Kontrollkästchen den automatischen Berechtigungsnachweis für geschützten Zugang zu.


Wählen Sie aus der Dropdown-Liste eine Behörde für den Berechtigungsnachweis für geschützten Zugang aus.


Klicken Sie auf die Schaltfläche „Mehr auswählen“, um weitere Berechtigungsnachweisprofile für geschützten Zugang zu importieren.


Klicken Sie auf die Schaltfläche „Importieren“, um einen neuen EAP-FAST-PAC zu suchen und zu importieren.


Markieren Sie einen EAP-FAST-PAC, und klicken Sie auf die Schaltfläche „Löschen“, um ein EAP-FAST-Profil zu löschen.


Die PAC-Speicherliste zeigt die verfügbaren EAP-FAST-PACs. Importieren oder löschen Sie über dieses Fenster EAP-FAST-PACs.


Aktivieren Sie das Optionsfeld „Öffentlich“, um nur öffentliche EAP-FAST-PACs anzuzeigen.


Aktivieren Sie das Optionsfeld „Privat“, um nur private EAP-FAST-PACs anzuzeigen.


Klicken Sie auf „OK“, um alle Änderungen in diesem Fenster zu akzeptieren.


Klicken Sie auf „Abbrechen“, um das Fenster zu schließen und alle Änderungen zu verwerfen.


Damit fordert das System automatisch den Benutzernamen und das Kennwort an.


Legen Sie über dieses Kontrollkästchen das Profil als Systemprofil fest. Auf das Systemprofil können alle Benutzer zugreifen. Es kann außerdem als Vorlage zur Erstellung weiterer Profile verwendet werden.


Zur Authentifizierung Benutzernamen und Kennwort angeben.


Authentifizierungszertifikat auswählen.


Zertifikat zur Authentifizierung verwenden.


Zulassen, dass der drahtlose Adapter das 4,9 GHz-Band für die öffentliche Sicherheitskommunikation verwendet.


Informationen, die Sie zur Scanliste hinzufügen können.


Informationen, die in der Scanliste angezeigt werden.


Diese Informationen in der Scanliste anzeigen.


Diese Informationen aus der Scanliste löschen.


Ausgewählte Spalte auf der Scanliste nach oben verschieben.


Ausgewählte Spalte auf der Scanliste nach unten verschieben.


Sitzung nach Unterbrechung automatisch wiederaufnehmen [nur bei vorübergehender Unterbrechung der Verbindung, nicht über Unterbrechen/Wiederaufnehmen].


Zeitdauer, bis der Windows-Anmeldeprozess die Gruppenrichtlinie startet.


Sitzung nach Unterbrechung automatisch wiederaufnehmen [nur bei vorübergehender Unterbrechung der Verbindung, nicht über Unterbrechen/Wiederaufnehmen]


Wenn dieses Kontrollkästchen aktiviert ist, können Sie in diesem Profil keine Änderungen vornehmen. Wenden Sie sich an Ihren Systemadministrator.


Verwenden Sie die Atheros Super A/G-Funktion, die mehrere Techniken zur Maximierung des drahtlosen Datendurchsatzes kombiniert.


Wählen Sie einen oder mehrere Bevollmächtigte für den Berechtigungsnachweis für den geschützten Zugang (PAC).


Aktivieren Sie diese Option, um automatisch die PACs auszuwählen, die zu derselben Gruppe gehören.


Zulassen von automatisierten Berechtigungsnachweisen für den geschützten Zugang (PAC).


Wählen Sie den EAP-Typ für die 802.1X-Sicherheit in der Dropdown-Liste zur PAC-Bereitstellung aus. Klicken Sie auf „Konfigurieren“.


Aktivieren Sie diese Option, um während der automatischen PAC-Bereitstellung dieselbe EAP-FAST-Authentifizierung zu verwenden.


Aktivieren Sie diese Option, um ein System-PAC für die Domänenanmeldung zu verwenden.


Der Funkadapter unterbricht nach dem Abmelden die Verbindung.


Sitzung nach Unterbrechung automatisch wiederaufnehmen [nur bei vorübergehender Unterbrechung der Verbindung, nicht über Unterbrechen/Wiederaufnehmen].


Aktivieren Sie diese Option, um den Server zu authentifizieren.


Geben Sie einen Zertifikatbevollmächtigten an, der verwendet werden soll.


Verwenden Sie einen temporären Benutzernamen und ein Kennwort zur Anmeldung. Möglicherweise werden Sie zur Eingabe Ihres Windows-Benutzernamens und -Kennworts aufgefordert.


Verwenden Sie Ihren Windows-Benutzernamen zur Authentifizierung.


Das System fordert automatisch den Benutzernamen und das Kennwort an.


Melden Sie sich an, und starten Sie den Authentifizierungsprozess manuell.


Legen Sie den Benutzernamen, das Kennwort und die Domäne zur Authentifizierung fest, den bzw. das bzw. die Sie speichern und verwenden möchten.


Geben Sie den Benutzernamen für dynamische Sicherheit ein.


Geben Sie das Kennwort für die dynamische Sicherheit ein.


Geben Sie das Kennwort erneut ein.


Geben Sie den Domänennamen ein.


Leiten Sie die Windows-Anmeldedomäne und den Benutzernamen an den RADIUS-Server weiter. (Dies ist die Standardeinstellung.)


Aktivieren Sie diese Option, um den Server zu authentifizieren.


Aktivieren Sie diese Option, um den Server zu authentifizieren.


Klicken Sie auf diese Schaltfläche, um die ausgewählte EAP-FAST-Authentifizierungsmethode zu konfigurieren.


Klicken Sie auf diese Schaltfläche, um die ausgewählte PAC-Bereitstellungs-Authentifizierungsmethode zu konfigurieren.


Klicken Sie auf diese Schaltfläche, um die PACs zu verwalten und anzuordnen.


Klicken Sie auf diese Schaltfläche, um Server oder Domäne und den Anmeldenamen festzulegen.


Klicken Sie auf diese Schaltfläche, um das Dialogfeld nach dem Speichern der Einstellungen für Benutzername und Kennwort zu schließen.


Klicken Sie auf diese Schaltfläche, um das Dialogfeld zu schließen, ohne die Einstellungen für Benutzername und Kennwort zu speichern.


Klicken Sie auf diese Schaltfläche, um das Dialogfeld nach dem Speichern der EAP-FAST-Einstellungen zu schließen.


Klicken Sie auf diese Schaltfläche, um das Dialogfeld zu schließen, ohne die EAP-FAST-Einstellungen zu speichern.


Geben Sie Informationen für den Berechtigungsnachweis für geschützten Zugang (PAC) ein.


Geben Sie Informationen für Benutzernamen und Kennwort ein.


Klicken Sie auf diese Schaltfläche, um eine neue Gruppe zu erstellen.


Klicken Sie auf diese Schaltfläche, um dieses Fenster zu schließen.


Verwalten und organisieren Sie die PACs über das Popup-Menü oder unten angegebene Befehlsschaltflächen.


Geben Sie den PAC-Dateinamen mit dem dazugehörigen Pfad ein.


Klicken Sie auf die Schaltfläche, um zum Verzeichnis mit der gewünschten PAC-Datei zu blättern. Klicken Sie auf die Importschaltfläche, um die gewünschte Datei zu importieren.


Wählen Sie diese Option, um den PAC in den privaten Speicher zu importieren.


Wählen Sie diese Option, um den PAC in den globalen Speicher zu importieren.Klicken Sie auf diese Schaltfläche, um mit dem Import des gewählten PAC zu beginnen.


Klicken Sie auf diese Schaltfläche, um dieses Dialogfeld zu schließen.Zeigt den Namen des PAC-Bevollmächtigten an.


Zeigt die ID des PAC-Bevollmächtigten an.


Zeigt den PAC-Namen an.


Zeigt den PAC-Typ an.


 Es kann ein Tunnel-PAC, System-PAC oder ein Benutzer-PAC sein.


Zeigt das PAC-Ablaufdatum an.


Klicken Sie auf diese Schaltfläche, um das Dialogfeld zu schließen.Zeigt den PAC-Speichertyp an.


 Es kann ein neuer PAC, ein privater PAC oder ein öffentlicher PAC sein.


Führen Sie nach der Anmeldung eines Benutzers immer eine erneute Authentifizierung mit dem Zertifikat des Benutzers durch.


Zeigt die Wireless-Bänder an, die von der Karte unterstützt werden.


Ändert die Informationen des ausgewählten Konfigurationsprofils.


Drücken Sie diese Taste, um das ausgewählte Konfigurationsprofil zu entfernen.


Begrenzt die Zeitspanne für die Suche nach einem Domänencontroller und gibt diese Zeitspanne in das entsprechende Kombinationsfeld ein.


Geben Sie die Anzahl von Sekunden (bis zu 300) ein, nach deren Ablauf bei der Suche nach einem Domänencontroller eine Zeitüberschreitung beim Authentifizierungsprozess auftreten sollte.


Ermöglicht dem drahtlosen Adapter die Verwendung des Funkmodus mit 5 GHz- und 300 MBit/s.


Ermöglicht dem drahtlosen Adapter die Verwendung des Funkmodus mit 2 GHz- und 300 MBit/s.


Das WLAN wird automatisch deaktiviert, wenn eine LAN-Verbindung hergestellt wird, bzw. das WLAN wird automatisch aktiviert, wenn eine LAN-Verbindung getrennt wird.


Wenn dieses Kontrollkästchen aktiviert ist, können die Pegel der Übertragungsleistung nicht geändert werden. Wenden Sie sich an Ihren Systemadministrator.


Verwenden Sie diese Optionsfelder, um das Programm für die Steuerung des drahtlosen Netzwerks auszuwählen.


Wählen, um Windows zu erlauben, das drahtlose Netzwerk zu steuern..


Wählen, um dem Atheros-Clienthilfsprogramm zu erlauben, das drahtlose Netzwerk zu steuern.


Wählen, um einem Drittanbieter-Tool zu erlauben, das drahtlose Netzwerk zu steuern.


Wählen Sie die an die Roaming-Aggressivität angepasste Roaming-Stufe aus.


Zeigt den im 40 MHz-Modus verwendeten zusätzlichen Kanal an.


Zeigt die im 40 MHz-Modus verwendete zusätzliche Frequenz an.


Zeigt den 802.11n MIMO-Energiesparstatus an.


Zeigt die Breite des aktuellen Kanals an.


Gibt beim Starten eines Ad-hoc-Netzwerks den Drahtlosmodus mit 5 GHz and 300 Mbit/s an.


Gibt beim Starten eines Ad-hoc-Netzwerks den Drahtlosmodus mit 2.4 GHz and 300 Mbit/s an.


Wählen Sie in der Liste das Profil aus, um den diagnostischen Kanalmodus zu starten.


Zeigt Status und Fortschritt der angeforderten Tests an.


Startet den diagnostischen Kanalmodus. Stoppt den diagnostischen Kanalmodus, falls dieser bereits gestartet wurde.


Status und Fortschritt speichern. Navigieren Sie zu dem Verzeichnis, in das der Status einer Datei gespeichert werden soll.


Stoppt den diagnostischen Kanalmodus (falls dieser bereits gestartet wurde), und schließt das Fenster.


Wählen Sie die SIM-Karte aus, die verwendet werden soll.


Geben Sie die PIN-Nummer für den Zugang zur SIM-Karte ein.


Geben Sie die PIN-Nummer für den Zugang zur SIM-Karte erneut ein l.


Wählen Sie den WPA/WPA2-Sicherheits-EAP-Typ aus der Dropdown-Liste aus. Klicken Sie zum Einrichten auf „Konfigurieren“.


Aktualisieren Sie die Liste der SIM-Karten, die im System eingesetzt sind.


Wählen Sie diese Option aus, um die IMSI der SIM-Karte als Anmeldenamen zu verwenden.