Copyright: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved
Citation: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved


Εμφανίζει τη συχνότητα και τη μέγιστη ταχύτητα της τρέχουσας σύνδεσης ασύρματης επικοινωνίας.


Εμφανίζει το όνομα προφίλ της τρέχουσας επιλεγμένης ρύθμισης παραμέτρων.


Εμφανίζει κατά πόσον ο σταθμός είναι συνδεδεμένος στο ασύρματο δίκτυο.


Εμφανίζει την ταχύτητα αποστολής της τρέχουσας σύνδεσης προγράμματος οδήγησης.


Εμφανίζει την ταχύτητα λήψης της τρέχουσας σύνδεσης προγράμματος οδήγησης.


Εμφανίζει τον τρόπο λειτουργίας του δικτύου. Εάν είναι τρόπος λειτουργίας υποδομής, συνδέεται σε σημείο πρόσβασης. Εάν είναι τρόπος λειτουργίας ειδικού δικτύου, συνδέεται σε άλλο υπολογιστή πελάτη.


Εμφανίζει τον τρόπο λειτουργίας ασφαλείας που χρησιμοποιεί το πρόγραμμα οδήγησης (WEP, AES, CKIP ή χωρίς).


Εμφανίζει τη διεύθυνση IP που χρησιμοποιεί το πρωτόκολλο TCP/IP για αυτήν την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει μια λίστα προφίλ των οποίων οι παράμετροι έχουν ρυθμιστεί. Για να αλλάξετε το τρέχον προφίλ με άλλο, κάντε κλικ στο όνομα που βρίσκεται στη λίστα Προφίλ και κατόπιν κάντε κλικ στο κουμπί Ενεργοποίηση.


Εμφανίζει λεπτομέρειες σχετικά με το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει το πρώτο όνομα δικτύου (SSID1) για το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει το δεύτερο όνομα δικτύου (SSID2) για το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει το τρίτο όνομα δικτύου (SSID3) για το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει τον τύπο σύνδεσης δικτύου για το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει τη διεύθυνση της κάρτας ασύρματης επικοινωνίας για το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει τον τρόπο λειτουργίας ασφαλείας που έχει καθοριστεί στο επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει το προεπιλεγμένο κλειδί για το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει τον τρέχοντα τρόπο λειτουργίας εξοικονόμησης ρεύματος για το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Δημιουργήστε ένα νέο προφίλ ρύθμισης παραμέτρων και προσθέστε τα γενικά στοιχεία, τα στοιχεία ασφαλείας και τα στοιχεία για προχωρημένους που του αντιστοιχούν.


Πληροφορίες σχετικά με το τρέχον προφίλ ρύθμισης παραμέτρων.


Διαγράψτε το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εφαρμόστε τις αλλαγές που κάνατε στο τρέχον επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Εμφανίζει το όνομα της κάρτας ασύρματης επικοινωνίας. Αυτό είναι το όνομα που το λειτουργικό σύστημα έχει εκχωρήσει στην κάρτα ασύρματης επικοινωνίας.


Εμφανίζει τη διεύθυνση MAC της κάρτας ασύρματης επικοινωνίας.


Εμφανίζει το όνομα και τη διαδρομή του προγράμματος οδήγησης της κάρτας ασύρματης επικοινωνίας.


Εμφανίζει την έκδοση του προγράμματος οδήγησης της κάρτας ασύρματης επικοινωνίας.


Εμφανίζει την ημερομηνία δημιουργίας του προγράμματος οδήγησης της κάρτας ασύρματης επικοινωνίας.


Εμφανίζει το όνομα δικτύου (SSID) του επιλεγμένου ασύρματου LAN.


Εμφανίζει τη διεύθυνση MAC (BSSID) του σημείου πρόσβασης με το οποίο είναι συνδεδεμένη η κάρτα ασύρματης επικοινωνίας.


Εμφανίζει την κατάσταση λειτουργίας της κάρτας ασύρματης επικοινωνίας.


Εμφανίζει το κανάλι και τη συχνότητα λειτουργίας του σταθμού.


Εμφανίζει τα διαθέσιμα σημεία πρόσβασης και ειδικά δίκτυα, καθορίζοντας τα ονόματα δικτύου, την ασφάλεια, την ισχύ σήματος, τον τρόπο λειτουργίας ασύρματης επικοινωνίας, τον αριθμό καναλιού και τη συχνότητα. Κάντε διπλό κλικ πάνω σε ένα διαθέσιμο δίκτυο για να συνδεθείτε με αυτό, εάν υπάρχει προφίλ ρύθμισης παραμέτρων που έχει ήδη δημιουργηθεί, ή για να δημιουργήσετε ένα προφίλ ρύθμισης παραμέτρων για το συγκεκριμένο όνομα δικτύου.


Παρέχει μετρήσεις για τον αριθμό των πλαισίων πολλαπλής, ευρείας και μονής διανομής καθώς και για το συνολικό αριθμό byte που έχουν αποσταλεί.


Εμφανίζει τον αριθμό των πλαισίων πολλαπλής διανομής που έχουν αποσταλεί. Κάθε πλαίσιο πολλαπλής διανομής αποστέλλεται σε περισσότερους από έναν παραλήπτες.


Εμφανίζει τον αριθμό των πλαισίων ευρείας διανομής που έχουν αποσταλεί. Κάθε πλαίσιο ευρείας διανομής αποστέλλεται σε όλους τους κεντρικούς υπολογιστές ενός δικτύου.


Εμφανίζει τον αριθμό των πλαισίων μονής διανομής που έχουν αποσταλεί. Κάθε πλαίσιο μονής διανομής αποστέλλεται σε έναν και μοναδικό παραλήπτη.


Εμφανίζει το συνολικό αριθμό των byte που έχουν αποσταλεί, σε όλα τα πλαίσια.


Παρέχει μετρήσεις για τον αριθμό των πλαισίων πολλαπλής, ευρείας και μονής διανομής, καθώς και για το συνολικό αριθμό των byte που έχουν ληφθεί.


Εμφανίζει τον αριθμό των πλαισίων πολλαπλής διανομής που έχουν ληφθεί. Κάθε πλαίσιο πολλαπλής διανομής αποστέλλεται σε περισσότερους από έναν παραλήπτες.


Εμφανίζει τον αριθμό των πλαισίων ευρείας διανομής που έχουν ληφθεί. Κάθε πλαίσιο ευρείας διανομής αποστέλλεται σε όλους τους κεντρικούς υπολογιστές ενός δικτύου.


Εμφανίζει τον αριθμό των πλαισίων μονής διανομής που έχουν ληφθεί. Κάθε πλαίσιο μονής διανομής αποστέλλεται σε έναν και μοναδικό παραλήπτη.


Εμφανίζει τον συνολικό αριθμό των byte που έχουν ληφθεί, σε όλα τα πλαίσια.


Εμφανίζει τον συνολικό χρόνο λειτουργίας της κάρτας ασύρματης επικοινωνίας.


Μηδενίζει όλα τα στατιστικά στοιχεία.


Εμφανίζει τα στατιστικά στοιχεία για προχωρημένους.


Εμφανίζει πληροφορίες σχετικά με το πρόγραμμα οδήγησης.


Ενεργοποιεί η απενεργοποιεί τη λειτουργία ραδιοεπικοινωνίας.


Πραγματοποιεί εμφάνιση ή απόκρυψη του εικονιδίου που βρίσκεται στη γραμμή εργασιών του υπολογιστή. Το εικονίδιο στη γραμμή εργασιών είναι χρωματισμένο ανάλογα με την ισχύ του σήματος. Εμφανίζει, επίσης, τη συχνότητα λειτουργίας και άλλες πληροφορίες σχετικά με τη σύνδεσή σας.


Προσπελάστε την εφαρμογή Site Survey (Έρευνα τοποθεσίας). Η εφαρμογή αυτή εμφανίζει μια γραφική αναπαράσταση της ισχύος του σήματος και της ποιότητας της σύνδεσής σας σε σημείο πρόσβασης. Εάν μετακινείστε στο δίκτυο, μπορείτε να χρησιμοποιήσετε αυτές τις πληροφορίες για να διαπιστώσετε εάν υπάρχει ανάγκη για επιπλέον σημεία πρόσβασης.


Καθορίζει το όνομα αυτού του προφίλ ρύθμισης παραμέτρων.


Καθορίζει τα ονόματα δικτύου (SSID) αυτού του προφίλ ρύθμισης παραμέτρων. Για να επιτρέψετε τη σύνδεση σε οποιοδήποτε σημείο πρόσβασης, αφήστε όλα τα SSID κενά.


Καθορίζει το πρώτο SSID αυτού του προφίλ ρύθμισης παραμέτρων. Για να επιτρέψετε τη σύνδεση σε οποιοδήποτε σημείο πρόσβασης, αφήστε όλα τα SSID κενά.


Καθορίζει το δεύτερο SSID αυτού του προφίλ ρύθμισης παραμέτρων. Για να επιτρέψετε τη σύνδεση σε οποιοδήποτε σημείο πρόσβασης, αφήστε όλα τα SSID κενά.


Καθορίζει το τρίτο SSID αυτού του προφίλ ρύθμισης παραμέτρων. Για να επιτρέψετε τη σύνδεση σε οποιοδήποτε σημείο πρόσβασης, αφήστε όλα τα SSID κενά.


Καθορίζει τον τύπο δικτύου αυτού του προφίλ ρύθμισης παραμέτρων.


Καθορίζει τον τρόπο λειτουργίας εξοικονόμησης ρεύματος αυτού του προφίλ ρύθμισης παραμέτρων.


Επιλέξτε τον τύπο κρυπτογράφησης.


Απενεργοποιήστε την κρυπτογράφηση.


Για να ενεργοποιήσετε τη δυναμική ασφάλεια, κάντε κλικ στο Δυναμική ασφάλεια, επιλέξτε την επιθυμητή ασφάλεια μέσα από το αναπτυσσόμενο μενού και, τέλος, κάντε κλικ στο Ρύθμιση παραμέτρων για να εισαγάγετε τα στοιχεία που καθορίσατε.


Καθορίστε ήδη κοινόχρηστα κλειδιά.


Εμφανίζει τη μέθοδο εισαγωγής κλειδιού.


Χρησιμοποιήστε δεκαεξαδικούς χαρακτήρες (0-9, A-F) για την εισαγωγή του κλειδιού.


Χρησιμοποιήστε χαρακτήρες κειμένου ASCII (περιλαμβάνουν όλους τους χαρακτήρες του πληκτρολογίου εκτός από τα διαστήματα) για την εισαγωγή του κλειδιού.Ορίστε το ως το προεπιλεγμένο κλειδί κρυπτογράφησης.


Ορίστε αυτό το κλειδί ως το προεπιλεγμένο κλειδί κρυπτογράφησης.


Ορίστε αυτό το κλειδί ως το προεπιλεγμένο κλειδί κρυπτογράφησης.


Ορίστε αυτό το κλειδί ως το προεπιλεγμένο κλειδί κρυπτογράφησης.


Ορίστε αυτό το κλειδί ως το προεπιλεγμένο κλειδί κρυπτογράφησης.


Εισαγάγετε την τιμή για το κλειδί κρυπτογράφησης ανά χρήστη.


Εισαγάγετε την τιμή για το πρώτο κλειδί κρυπτογράφησης.


Εισαγάγετε την τιμή για το δεύτερο κλειδί κρυπτογράφησης.


Εισαγάγετε την τιμή για το τρίτο κλειδί κρυπτογράφησης.


Εισαγάγετε την τιμή για το τέταρτο κλειδί κρυπτογράφησης.


Επιλέξτε το μήκος του κλειδιού κρυπτογράφησης ανά χρήστη, μέσα από το αναπτυσσόμενο μενού.


Επιλέξτε το μήκος του πρώτου κλειδιού κρυπτογράφησης, μέσα από το αναπτυσσόμενο μενού.


Επιλέξτε το μήκος του δεύτερου κλειδιού κρυπτογράφησης, μέσα από το αναπτυσσόμενο μενού.


Επιλέξτε το μήκος του τρίτου κλειδιού κρυπτογράφησης, μέσα από το αναπτυσσόμενο μενού.


Επιλέξτε το μήκος του τέταρτου κλειδιού κρυπτογράφησης, μέσα από το αναπτυσσόμενο μενού.


Ενεργοποιήστε το πρωτόκολλο LEAP.


Καθορίστε το όνομα χρήστη και τον κωδικό πρόσβασης LEAP/EAP-FAST. Το όνομα αυτό μπορεί να έχει μήκος μέχρι 64 χαρακτήρες.


Καθορίζει τον κωδικό πρόσβασης LEAP/EAP-FAST. Ο κωδικός πρόσβασης μπορεί να έχει μήκος μέχρι 64 χαρακτήρες.


Εισαγάγετε μια διεύθυνση MAC για ασύρματη επικοινωνία. Η διεύθυνση αυτή παρακάμπτει την καθολική διεύθυνση MAC της κάρτας ασύρματης επικοινωνίας.


Πληκτρολογήστε τη διεύθυνση της κάρτας ασύρματης επικοινωνίας σε δεκαεξαδική μορφή.


Επιτρέπει την επιλογή της μεθόδου σάρωσης της κάρτας ασύρματης επικοινωνίας που χρησιμοποιείται για τον εντοπισμό σημείων πρόσβασης ή ειδικών δικτύων.


Πραγματοποιήστε παθητική σάρωση για σημεία πρόσβασης. Με την παθητική σάρωση, η κάρτα ασύρματης επικοινωνίας βρίσκεται σε τρόπο λειτουργίας ακρόασης μόνον.


Πραγματοποιήστε αυτόματη σάρωση για σημεία πρόσβασης. Το πρόγραμμα οδήγησης χρησιμοποιεί τον κωδικό χώρας για να προσδιορίσει τον τύπο σάρωσης, δηλ. ενεργητική ή παθητική, που θα χρησιμοποιήσει.


Καθορίζει τη στάθμη ισχύος αποστολής μέσα από το αναπτυσσόμενο μενού. Η πραγματική ισχύς αποστολής ενδέχεται να περιορίζεται από κανονιστικούς, τομεακούς ή υλικούς περιορισμούς.


Επιλέξτε τον τρόπο λειτουργίας ασύρματης επικοινωνίας της κάρτας ασύρματης επικοινωνίας.


Επιλέξτε τον τρόπο λειτουργίας ασύρματης επικοινωνίας με την οποία εκκινείται το ειδικό δίκτυο, εάν δε βρεθεί ειδικό δίκτυο με το τρέχον όνομα.


Επιτρέψτε στην κάρτα ασύρματης επικοινωνίας να χρησιμοποιεί τον τρόπο λειτουργίας ασύρματης επικοινωνίας στα 5 GHz και στα 54 Mbps.


Επιτρέψτε στην κάρτα ασύρματης επικοινωνίας να χρησιμοποιεί τον τρόπο λειτουργίας ασύρματης επικοινωνίας στα 5 GHz.


Επιτρέψτε στην κάρτα ασύρματης επικοινωνίας να χρησιμοποιεί τον τρόπο λειτουργίας ασύρματης επικοινωνίας στα 2.4 GHz και στα 11 Mbps.


Καθορίστε τη λειτουργία ασύρματης επικοινωνίας στα 5 GHz και στα 54 Mbps κατά την έναρξη της λειτουργίας ειδικού δικτύου.


Καθορίστε τη λειτουργία ασύρματης επικοινωνίας στα 5 GHz κατά την έναρξη της λειτουργίας ειδικού δικτύου.


Καθορίστε τη λειτουργία ασύρματης επικοινωνίας στα 2.4 GHz και στα 11 Mbps κατά την έναρξη της λειτουργίας ειδικού δικτύου.


Εμφανίζει τη στάθμη ισχύος αποστολής, σε mW.


Εμφανίζει το όνομα του δικτύου (SSID) με το οποίο είναι συνδεδεμένος ή επιχειρεί να συνδεθεί ο σταθμός.


Εμφανίζει κατά πόσον αυτό το προφίλ ρύθμισης παραμέτρων μπορεί να συμμετέχει σε δίκτυο QOS (Quality of Service - Ποιότητα υπηρεσίας).


Εμφανίζει τη στάθμη θορύβου της τρέχουσας σύνδεσης, σε dBm.


Εμφανίζει την κατάσταση του τρόπου λειτουργίας εξοικονόμησης ρεύματος αυτού του προφίλ ρύθμισης παραμέτρων.


Εμφανίζει τη συχνότητα της τρέχουσας σύνδεσης.


Κλείστε το πλαίσιο διαλόγου.


Παρέχει στατιστικά στοιχεία για τις αποστολές.


Εμφανίζει τον αριθμό προειδοποιητικών σημάτων (“beacon”) που απεστάλησαν από την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει τον αριθμό των πλαισίων που απεστάλησαν σωστά από την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει τον αριθμό των πλαισίων που απεστάλησαν με επαναπροσπάθειες, επειδή τα πλαίσια που λαμβάνονταν από το σταθμό δεν ήταν επιτυχή.


Εμφανίζει τον αριθμό των πλαισίων που απορρίφθηκαν, διότι δεν ελήφθησαν ποτέ επιτυχώς από το σταθμό λήψης.


Εμφανίζει τον αριθμό των πλαισίων αιτήματος για αποστολή (Request To Send, RTS) που απεστάλησαν από την κάρτα ασύρματης επικοινωνίας.


Παρέχει στατιστικά στοιχεία για τις λήψεις.


Εμφανίζει τον αριθμό προειδοποιητικών σημάτων (“beacon”) που ελήφθησαν από την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει τον αριθμό των πλαισίων που ελήφθησαν σωστά από την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει τον αριθμό των πλαισίων που ελήφθησαν με σφάλματα από την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει τον αριθμό των ληφθέντων πλαισίων, τα οποία η κάρτα ασύρματης επικοινωνίας δεν κατάφερε να αποκρυπτογραφήσει επιτυχώς.


Καθορίζει τον αριθμό των πλαισίων που απορρίφθηκαν από την κάρτα ασύρματης επικοινωνίας, διότι είχε ήδη ληφθεί ένα διπλότυπο πλαίσιο.


Καθορίζει τον αριθμό των πλαισίων άδειας για αποστολή (Clear To Send, CTS) που ελήφθησαν από την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει τον αριθμό αποτυχιών ελέγχου ταυτότητας σημείου πρόσβασης, που ελήφθησαν από την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει τον αριθμό απορρίψεων συσχέτισης σημείου πρόσβασης που ελήφθησαν από την κάρτα ασύρματης επικοινωνίας.


κλείστε το πλαίσιο διαλόγου.


μηδενίστε όλα τα στατιστικά στοιχεία.


Επιλέγει τη χώρα στην οποία λειτουργεί η κάρτα ασύρματης επικοινωνίας.


Δώστε τη δυνατότητα στη διεθνή περιαγωγή να σαρώνει παθητικά όλα τα κανάλια που δηλώνονται ως διαθέσιμα στον αντίστοιχο κανονιστικό τομέα.


Ενεργοποιήστε τις αλλαγές στον κωδικό χώρας.


Τερματίστε και κλείστε την εφαρμογή επιλογής κωδικού χώρας.


Εμφανίζει την ισχύ του σήματος είτε σε μορφή ποσοστού είτε σε ντεσιμπέλ dBm.


Εμφανίζει την ισχύ του σήματος με μορφή ποσοστού.


Εμφανίζει την ισχύ του σήματος σε ντεσιμπέλ.


Εμφανίζει τα δεδομένα στατιστικών στοιχείων με βάση το Διάστημα ανανέωσης (Σχετικά) ή με βάση το συνολικό χρόνο (Αθροιστικά).


Συλλέγει στατιστικά στοιχεία με βάση το Διάστημα ανανέωσης.


Αθροιστική συλλογή στατιστικών στοιχείων.


Εμφανίζει το χρονικό διάστημα, σε δευτερόλεπτα, που χρησιμοποιείται για τη συλλογή σχετικών στατιστικών στοιχείων.


Ενεργοποιεί τις αλλαγές στο πλαίσιο διαλόγου Ρυθμίσεις οθόνης.


Τερματίζει τη λειτουργία και κλείνει το πλαίσιο διαλόγου Ρυθμίσεις οθόνης.


Χρησιμοποιήστε την καρτέλα Γενικά για να ρυθμίσετε τις παραμέτρους των ονομάτων δικτύου και του ονόματος ρύθμισης παραμέτρων κάποιου προφίλ ρύθμισης παραμέτρων.


Χρησιμοποιήστε τα κουμπιά εργαλείων για να ενεργοποιήσετε ή να απενεργοποιήσετε τη λειτουργία ραδιοεπικοινωνίας, να ανοίξετε την εφαρμογή επιλογής κωδικού χώρας ή/και να ενεργοποιήσετε/απενεργοποιήσετε την εμφάνιση του εικονιδίου στη γραμμή εργασιών.


Χρησιμοποιήστε την καρτέλα Διαχείριση προφίλ για να προσθέσετε καινούργια ρύθμιση παραμέτρων, να τροποποιήσετε μια ρύθμιση παραμέτρων, να καταργήσετε μια ρύθμιση παραμέτρων ή να ενεργοποιήσετε κάποιο άλλο προφίλ ρύθμισης παραμέτρων.


Η καρτέλα Διαγνωστικά εμφανίζει τα στατιστικά στοιχεία του προγράμματος οδήγησης.


Επιλέξτε τον τρόπο λειτουργίας προοιμίου Μακρύ μόνον ή Βραχύ & μακρύ, για τα δίκτυα 802.11b και 802.11g. Η επιλογή Μακρύ μόνο χρησιμοποιείται για προς τα πίσω συμβατότητα με παλαιότερες κάρτες ασύρματης επικοινωνίας.


Χρησιμοποιήστε τη σελίδα αυτή για να προσθέσετε τα κλειδιά κρυπτογράφησης στατικής ασφάλειας.


Σάρωση και ανανέωση της λίστας διαθέσιμων σημείων πρόσβασης και ειδικών δικτύων.


Χρησιμοποιήστε την καρτέλα Για προχωρημένους, για να καθορίσετε τις ρυθμίσεις παραμέτρων για προχωρημένους για το προφίλ ρύθμισης παραμέτρων.


Ανοίξτε ένα παράθυρο διαλόγου και εισαγάγετε τα ήδη καθορισμένα κλειδιά.


Χρησιμοποιήστε την καρτέλα Ασφάλεια για να καθορίσετε τον τύπο κρυπτογράφησης και να ρυθμίσετε τις παραμέτρους της δυναμικής ασφάλειας.


Δώστε τη δυνατότητα στην κάρτα ασύρματης επικοινωνίας να πραγματοποιεί εναλλαγή μεταξύ των λειτουργιών Βραχύ και Μακρύ προοίμιο.


Ρυθμίζει τον τρόπο λειτουργίας προοιμίου ως Μακρύ μόνο. Αυτός ο τρόπος λειτουργίας χρησιμοποιείται για προς τα πίσω συμβατότητα με παλαιότερες κάρτες ασύρματης επικοινωνίας.


Επιλέξτε ένα προεπιλεγμένο κλειδί και, στη συνέχεια, συμπληρώστε το πεδίο κλειδιού και επιλέξτε ένα μήκος μέσα από το αναπτυσσόμενο μενού.


Εμφανίζει τα τρέχοντα στοιχεία για το πρόγραμμα οδήγησης.


Χρησιμοποιήστε την καρτέλα κατάστασης του WLAN για να προβάλετε τα τρέχοντα στοιχεία σύνδεσης, καθώς και μια λίστα διαθέσιμων σημείων πρόσβασης και ειδικών δικτύων. Μέσα από τη λίστα αυτή, μπορείτε να μεταβείτε σε νέα σύνδεση.


Εμφανίζει στατιστικά στοιχεία για προχωρημένους, για τις αποστολές και τις λήψεις, για την κάρτα ασύρματης επικοινωνίας.


Εμφανίζει στοιχεία για προχωρημένους, σχετικά με τη σύνδεση.


Εμφανίζει στοιχεία για προχωρημένους, σχετικά με τη σύνδεση.


Χρησιμοποιήστε την εφαρμογή επιλογής κωδικού χώρας για να αλλάξετε τη χώρα για την οποία είναι ρυθμισμένη η κάρτα ασύρματης επικοινωνίας.


Η καρτέλα Τρέχουσα κατάσταση εμφανίζει στοιχεία σχετικά με τη σύνδεση.


Το πλαίσιο Πληροφορίες εμφανίζει την ημερομηνία δόμησης (build) και τον αριθμό έκδοσης της εφαρμογής αυτής.


Το πλαίσιο Ρυθμίσεις επιτρέπει την αλλαγή του χρονικού διαστήματος εμφάνισης και συλλογής στοιχείων σε τρόπο λειτουργίας αθροιστικά ή κατά διαστήματα. Σε τρόπο λειτουργίας κατά διαστήματα, τα στατιστικά στοιχεία μηδενίζονται κατά την έναρξη κάθε χρονικού διαστήματος μέτρησης. Το χρονικό διάστημα συλλογής στοιχείων εμφανίζεται σε δευτερόλεπτα. Μπορείτε να αλλάξετε το χρονικό διάστημα, πληκτρολογώντας τη νέα τιμή ή χρησιμοποιώντας τα βέλη επάνω/κάτω που υπάρχουν στα δεξιά. Η μείωση του χρονικού διαστήματος επιβαρύνει περισσότερο τον επεξεργαστή. Η σχετική ισχύς του σήματος εμφανίζεται είτε σε ντεσιμπέλ (dB) είτε με τη μορφή ποσοστού.


Πραγματοποιήστε μετάβαση σε επισημασμένο σημείο πρόσβασης ή σε ειδικό δίκτυο. Εναλλακτικά, κάντε διπλό κλικ στο SSID. Εάν δεν υπάρχει προφίλ για το συγκεκριμένο SSID, ανοίγει νέο προφίλ με το επιλεγμένο SSID συμπληρωμένο. Συμπληρώστε τις ρυθμίσεις του προφίλ και κατόπιν κάντε κλικ στο κουμπί OK για να ενεργοποιήσετε το προφίλ.


Κάντε κλικ στο κουμπί Ενεργοποίηση για να μεταβείτε στο επιλεγμένο προφίλ. Εναλλακτικά, κάντε διπλό κλικ στο όνομα προφίλ.


Εμφανίζει το τρέχον επιλεγμένο κανάλι.


Επιτρέψτε στην κάρτα ασύρματης επικοινωνίας να χρησιμοποιεί τον τρόπο λειτουργίας ασύρματης επικοινωνίας στα 2.4 GHz και στα 54 Mbps.


Καθορίστε τη λειτουργία ασύρματης επικοινωνίας στα 2.4 GHz και στα 54 Mbps κατά την έναρξη της λειτουργίας ειδικού δικτύου.


Καθορίστε το κανάλι στο οποίο θα γίνει η εκκίνηση της λειτουργίας του ειδικού δικτύου.


Πληκτρολογήστε τον κωδικό πρόσβασης LEAP/EAP-FAST.


Επιβεβαιώστε τον κωδικό πρόσβασης LEAP/EAP-FAST που πληκτρολογήσατε.


Ενεργοποιήστε τις καταχωρήσεις LEAP/EAP-FAST.


Διαγράψτε τυχόν καταχωρήσεις που πραγματοποιήσατε και κλείστε το παράθυρο διαλόγου Καθορισμός στοιχείων χρήστη.


Εμφανίστε μια λίστα διαθέσιμων σημείων πρόσβασης και ειδικών δικτύων.


Εισαγάγετε το όνομα χρήστη LEAP/EAP-FAST.


Ενεργοποιήστε τη δυνατότητα αλλαγών στο παράθυρο διαλόγου Διαχείριση προφίλ.


Ακυρώστε τυχόν αλλαγές που κάνατε και κλείστε το παράθυρο διαλόγου Διαχείριση προφίλ.


Απενεργοποιήστε την αρχική ρύθμιση παραμέτρων.


Διατηρήστε ενεργοποιημένη την αρχική ρύθμιση παραμέτρων.


Να μην εμφανιστεί ξανά αυτό το παράθυρο διαλόγου.


Το ACU είχε επιλεγεί κατά τη διάρκεια της διαδικασίας εγκατάστασης. Η αρχική ρύθμιση παραμέτρων είναι επίσης ενεργοποιημένη. Επιλέξτε κατά πόσον θα χρησιμοποιηθεί το ACU ή η αρχική ρύθμιση παραμέτρων.


Διαγράψτε τυχόν καταχωρήσεις που πραγματοποιήσατε και κλείστε το παράθυρο διαλόγου Καθορισμός στοιχείων χρήστη.


Καθορίζει τα ονόματα δικτύου (SSID) αυτού του προφίλ ρύθμισης παραμέτρων.


Χρησιμοποιήστε τα παρακάτω κουμπιά επιλογής για να καθορίσετε τις δυνατές επιλογές ασφαλείας.


Χρησιμοποιήστε το κουμπί Ρύθμιση παραμέτρων για να εισαγάγετε τα στοιχεία χρήστη για την καθορισμένη δυνατή επιλογή ασφαλείας.


Επιλέξτε το πλαίσιο ελέγχου WPA και κατόπιν κάντε κλικ στο κουμπί Ρύθμιση παραμέτρων για να εισαγάγετε τα στοιχεία της προστατευμένης ασύρματης πρόσβασης.


Καθορίζει την επιθυμητή δυναμική ασφάλεια μέσα από το αναπτυσσόμενο μενού.


Ενεργοποιήστε τη φράση πρόσβασης WPA.


 Ακυρώστε τις αλλαγές και κλείστε το παράθυρο διαλόγου.


Πληκτρολογήστε τον κωδικό πρόσβασης για την ασφάλεια WPA. Το ελάχιστο αποδεκτό μήκος του κωδικού πρόσβασης είναι 8 χαρακτήρες.


Χρησιμοποιήστε αυτό το παράθυρο διαλόγου για να εισαγάγετε στοιχεία σχετικά με τον τρόπο λειτουργίας δυναμικής ασφάλειας.


Πληκτρολογήστε το όνομα χρήστη και τον κωδικό πρόσβασης για τη δυναμική ασφάλεια, στα παρεχόμενα πεδία εισαγωγής δεδομένων.


Πληκτρολογήστε το όνομα χρήστη για τη δυναμική ασφάλεια, στο παρεχόμενο πεδίο εισαγωγής δεδομένων.


Εισαγάγετε το όνομα χρήστη για δυναμική ασφάλεια.


Πληκτρολογήστε τον κωδικό πρόσβασης για δυναμική ασφάλεια, στο παρεχόμενο πεδίο εισαγωγής δεδομένων.


Εισαγάγετε τον κωδικό πρόσβασης για δυναμική ασφάλεια.


Πληκτρολογήστε ξανά τον κωδικό πρόσβασης για δυναμική ασφάλεια, στο παρεχόμενο πεδίο εισαγωγής δεδομένων.


Πληκτρολογήστε ξανά τον κωδικό πρόσβασης για δυναμική ασφάλεια.


Επιλέξτε το επιθυμητό πιστοποιητικό μέσα από το αναπτυσσόμενο μενού.


Καθορίστε το φορέα πιστοποίησης που θα χρησιμοποιηθεί, μέσα από την περιοχή αυτή.


Χρησιμοποιήστε οποιοδήποτε φορέα πιστοποίησης.


Καθορίστε το φορέα πιστοποίησης που θα χρησιμοποιηθεί από το αναπτυσσόμενο μενού.


Καθορίστε το φορέα πιστοποίησης που θα χρησιμοποιηθεί.


Πληκτρολογήστε το όνομα διακομιστή/τομέα για το διακομιστή RADIUS.


Πληκτρολογήστε το όνομα έναρξης σύνδεσης για το διακομιστή RADIUS.


Ενεργοποιήστε τις αλλαγές που κάνατε στο παράθυρο διαλόγου Καθορισμός πιστοποιητικού.


Ακυρώστε τυχόν αλλαγές που κάνατε και κλείστε το παράθυρο διαλόγου Καθορισμός πιστοποιητικού.


Καθορίστε το φορέα πιστοποίησης που θα χρησιμοποιηθεί, μέσα από την περιοχή αυτή.


Χρησιμοποιήστε οποιονδήποτε φορέα πιστοποίησης.


Καθορίστε το φορέα πιστοποίησης που θα χρησιμοποιηθεί από το αναπτυσσόμενο μενού.


Καθορίστε το φορέα πιστοποίησης που θα χρησιμοποιηθεί.


Πληκτρολογήστε το όνομα διακομιστή/τομέα για το διακομιστή ασφαλείας.


Πληκτρολογήστε το όνομα έναρξης σύνδεσης για το διακομιστή ασφαλείας.


Εισάγετε στοιχεία στο παράθυρο διαλόγου Καθορισμός στοιχείων χρήστη, για το διακομιστή ασφάλειας.


Ενεργοποιήστε τις αλλαγές που κάνατε στο παράθυρο διαλόγου Καθορισμός πιστοποιητικού.


Ακυρώστε τις αλλαγές που κάνατε και κλείστε το παράθυρο διαλόγου Καθορισμός πιστοποιητικού.


Χρησιμοποιήστε αυτό το παράθυρο διαλόγου για να πληκτρολογήσετε τη φράση πρόσβασης του WPA.


Χρησιμοποιήστε αυτό το παράθυρο διαλόγου για να εισαγάγετε στοιχεία σχετικά με τη δυναμική ασφάλεια TLS.


Εισαγάγετε ένα προφίλ ρύθμισης παραμέτρων. Περιηγηθείτε μέχρι τον κατάλογο στον οποίο βρίσκεται το προφίλ, επισημάνετε το προφίλ και κατόπιν κάντε κλικ στο κουμπί Άνοιγμα για να εισαγάγετε το προφίλ.


Πραγματοποιήστε εξαγωγή ενός προφίλ ρύθμισης παραμέτρων. Περιηγηθείτε μέχρι τον κατάλογο στον οποίο θέλετε να αποθηκεύσετε το προφίλ και κατόπιν κάντε κλικ στο κουμπί Αποθήκευση για να εξαγάγετε το προφίλ.


Καθορίστε τη σειρά με την οποία εμφανίζονται τα προφίλ ρύθμισης παραμέτρων στο παράθυρο Διαχείριση προφίλ. Στο παράθυρο Διαχείριση αυτόματης επιλογής προφίλ, κάντε κλικ στο κουμπί Μετακίνηση προς τα επάνω ή στο κουμπί Μετακίνηση προς τα κάτω, ανάλογα, και κατόπιν κάντε κλικ στο κουμπί OK.


Εάν ενεργοποιήσετε την αυτόματη επιλογή προφίλ, τότε χρησιμοποιείται το προφίλ με την μεγαλύτερη προτεραιότητα και το ίδιο SSID καθώς ένα από τα δίκτυα που έχουν ήδη εντοπιστεί είναι εκείνο που χρησιμοποιείται για τη σύνδεση στο δίκτυο. Εάν η σύνδεση αποτύχει, ο προσαρμογέας πελάτη δοκιμάζει το προφίλ με την αμέσως μικρότερη προτεραιότητα που συμφωνεί με το SSID κ.ο.κ.


Η Αντιμετώπιση προβλημάτων είναι ένα προαιρετικό βοηθητικό πρόγραμμα αντιμετώπισης προβλημάτων που εντοπίζει και επιλύει προβλήματα ρύθμισης παραμέτρων και συσχέτισης του προσαρμογέα ασύρματης επικοινωνίας, όταν ο προσαρμογέας βρίσκεται σε τρόπο λειτουργίας σημείου πρόσβασης (υποδομή). Αυτό το βοηθητικό πρόγραμμα διατίθεται μόνο σε λύσεις Mini PCI.


Υποδηλώνει τη μέθοδο ελέγχου ταυτότητας στο διακομιστή.


Υποδηλώνει τη μέθοδο ελέγχου ταυτότητας στο διακομιστή.


Υποδηλώνει τον τρόπο λειτουργίας ασφαλείας που χρησιμοποιείται για την κρυπτογράφηση δεδομένων.


Υποδηλώνει τον τύπο ελέγχου ταυτότητας. Στη λειτουργία Αυτόματο, ο προσαρμογέας επιχειρεί έλεγχο ταυτότητας με τη βοήθεια της λειτουργίας Κοινόχρηστο, αλλά μεταβαίνει σε ανοικτό έλεγχο ταυτότητας εάν αποτύχει. Στη λειτουργία Ανοικτό, ο προσαρμογέας επιχειρεί έλεγχο ταυτότητας ανεξάρτητα από τις ρυθμίσεις WEP. (Θα πραγματοποιηθεί συσχετισμός με το σημείο πρόσβασης εάν τα κλειδιά WEP του προσαρμογέα και του σημείου πρόσβασης αντιστοιχούν.) Η λειτουργία Κοινόχρηστο επιτρέπει στον προσαρμογέα να συσχετιστεί μόνο με σημεία πρόσβασης που διαθέτουν το ίδιο κλειδί WEP.


Υποδηλώνει κατά πόσον το MIC είναι ενεργοποιημένο. Το MIC αποτρέπει τυχόν επιθέσεις τύπου “bit-flip” (αναστροφή δυφίου) σε κρυπτογραφημένα πακέτα.


Εμφανίζει το όνομα του συσχετισμένου σημείου πρόσβασης.


Εμφανίζει τη διεύθυνση IP του συσχετισμένου σημείου πρόσβασης.


Εμφανίζει τη διεύθυνση MAC του συσχετισμένου σημείου πρόσβασης.


Εμφανίζει την τρέχουσα ισχύ του σήματος είτε σε ντεσιμπέλ (dBm) είτε με τη μορφή ποσοστού.


Εμφανίζει την τρέχουσα στάθμη θορύβου (ποιότητα σήματος) είτε σε ντεσιμπέλ (dBm) είτε με τη μορφή ποσοστού.


Δείχνει το χρόνο κατά τον οποίο ο προσαρμογέας πελάτη τροφοδοτείται με ρεύμα (σε ώρες:λεπτά:δευτερόλεπτα). Εάν ο προσαρμογέας παραμείνει σε λειτουργία για περισσότερες από 24 ώρες, η ένδειξη είναι σε ημέρες:ώρες:λεπτά:δευτερόλεπτα.


Εμφανίζει τη μορφή προοιμίου για το 802.11b Μπορείτε να ρυθμίσετε τις παραμέτρους της μορφής προοιμίου στην καρτέλα Για προχωρημένους


Εμφανίζει την τρέχουσα ταχύτητα λήψης, σε Mbps.


Εμφανίζει την τρέχουσα ταχύτητα αποστολής, σε Mbps.


Εμφανίζει το τρέχον συνδεδεμένο κανάλι.


Εμφανίζει τη συχνότητα που χρησιμοποιεί ο σταθμός.


Εμφανίζει τον αριθμό των πλαισίων που απεστάλησαν, για τα οποία δεν απαιτείται αναγνώριση.


Εμφανίζει τον αριθμό των πλαισίων που απεστάλησαν, για τα οποία ελήφθη αναγνώριση.


Εμφανίζει τον αριθμό των σφαλμάτων CRC (Cyclic Redundancy Check, κυκλικός έλεγχος πλεονασμού) που ελήφθησαν.


Εμφανίζει τον αριθμό ασυμφωνιών σημείου πρόσβασης που ελήφθησαν.


Εμφανίζει τον αριθμό ασυμφωνιών ταχύτητας διαμεταγωγής δεδομένων που ελήφθησαν.


Εμφανίζει τον αριθμό των πλαισίων αιτήματος για αποστολή (Request-To-Send, RTS) που απεστάλησαν.


Εμφανίζει τον αριθμό των πλαισίων άδειας για αποστολή (Clear-To-Send, CTS) που απεστάλησαν.


Εμφανίζει τον αριθμό των πλαισίων μη άδειας για αποστολή (not Clear-To-Send, not CTS) που απεστάλησαν.


Εμφανίζει τον αριθμό των πλαισίων αιτήματος για αποστολή (Request-To-Send, RTS) με νέες προσπάθειες που απεστάλησαν.


Εμφανίζει τον αριθμό των πλαισίων δεδομένων με νέες προσπάθειες, που απεστάλησαν.


Εμφανίζει τον αριθμό των χρονικών ορίων ελέγχου ταυτότητας που ελήφθησαν.


Εμφανίζει τον αριθμό των χρονικών ορίων συσχέτισης που ελήφθησαν.


Εμφανίζει τον αριθμό των ελέγχων ταυτότητας τυπικού MIC που ελήφθησαν.


Εμφανίζει τον αριθμό των σφαλμάτων τυπικού MIC που ελήφθησαν.


Εμφανίζει τον αριθμό των ελέγχων ταυτότητας CKIP MIC που ελήφθησαν.


Εμφανίζει τον αριθμό των σφαλμάτων CKIP MIC που ελήφθησαν.


Εμφανίζει τον αριθμό των πλαισίων άδειας για αποστολή (Clear-To-Send, CTS) που ελήφθησαν.


Εμφανίζει το όνομα του υπολογιστή-πελάτη.


Εμφανίζει το σειριακό αριθμό του προσαρμογέα ασύρματης επικοινωνίας.


Εμφανίζει την ισχύ του σήματος.


Εμφανίζει τα διαθέσιμα προφίλ για διαχείριση αυτόματης επιλογής προφίλ.


Εισαγάγετε προφίλ στην αυτόματη επιλογή προφίλ: Στην καρτέλα Διαχείριση προφίλ, κάντε κλικ στο Κατάταξη προφίλ. Εμφανίζεται το παράθυρο Διαχείριση αυτόματης επιλογής προφίλ, το οποίο περιλαμβάνει μια λίστα με όλα τα δημιουργημένα προφίλ στο πλαίσιο Διαθέσιμα προφίλ. Επισημάνετε τα προφίλ γα να τα προσθέσετε στη λειτουργία αυτόματης επιλογής προφίλ και, στη συνέχεια, κάντε κλικ στην επιλογή Προσθήκη. Τα προφίλ εμφανίζονται στο πλαίσιο Αυτόματα επιλεγόμενα προφίλ.


Έτσι, τα προφίλ αυτά θα εμφανιστούν στο πλαίσιο Αυτόματα επιλεγόμενα προφίλ.


Το πεδίο αυτό εμφανίζει τα αυτόματα επιλεγόμενα προφίλ. Επισημάνετε ένα διαθέσιμο προφίλ ή ένα αυτόματα επιλεγόμενο προφίλ και κατόπιν κάντε κλικ στο κουμπί Μετακίνηση προς τα επάνω για να μετακινήσετε το επιλεγμένο προφίλ υψηλότερα στην κατάταξη της λίστας.


Επισημάνετε ένα διαθέσιμο προφίλ ή ένα αυτόματα επιλεγόμενο προφίλ και κατόπιν κάντε κλικ στο κουμπί Μετακίνηση προς τα κάτω για να μετακινήσετε το επιλεγμένο προφίλ χαμηλότερα στην κατάταξη της λίστας.


Επισημάνετε ένα διαθέσιμο προφίλ ή ένα αυτόματα επιλεγόμενο προφίλ και κατόπιν κάντε κλικ στο κουμπί Κατάργηση για να διαγράψετε το επιλεγμένο προφίλ από τη λίστα.


Αποδεχθείτε τις αλλαγές που κάνατε στο παράθυρο Διαχείριση αυτόματης επιλογής προφίλ.


Ακυρώστε τις αλλαγές που κάνατε στο παράθυρο Διαχείριση αυτόματης επιλογής προφίλ.


Επιλέγει τη στάθμη ισχύος αποστολής για το 802.11a, σε mW. Η πραγματική ισχύς αποστολής ενδέχεται να περιορίζεται από κανονιστικούς, τομεακούς ή υλικούς περιορισμούς.


Επιλέγει τον τρόπο λειτουργίας που θα χρησιμοποιεί ο προσαρμογέας ασύρματης επικοινωνίας για τον έλεγχο ταυτότητας ενός σημείου πρόσβασης: Στην τιμή Αυτόματο, ο προσαρμογέας επιχειρεί έλεγχο ταυτότητας με τη βοήθεια κοινόχρηστου, αλλά μεταβαίνει σε ανοικτό έλεγχο ταυτότητας εάν το κοινόχρηστο αποτύχει. Στην τιμή Ανοικτό, ο προσαρμογέας επιχειρεί έλεγχο ταυτότητας ανεξάρτητα από τις ρυθμίσεις WEP που χρησιμοποιεί. Συσχέτιση με το σημείο πρόσβασης γίνεται μόνον εάν τα κλειδιά WEP τόσο στον προσαρμογέα όσο και στο σημείο πρόσβασης συμφωνούν μεταξύ τους. Στην τιμή Κοινόχρηστο, ο προσαρμογέας συσχετίζεται με σημεία πρόσβασης που διαθέτουν το ίδιο κλειδί WEP.


Για δίκτυα υποδομής (με σημείο πρόσβασης), καθορίστε μέχρι και τέσσερα σημεία πρόσβασης με τα οποία ο προσαρμογέας πελάτη θα επιχειρήσει να συσχετιστεί.


Αναγνωρίζει τον υπολογιστή-πελάτη.


Εάν το σημείο πρόσβασης, με το οποίο έχει συσχετιστεί ο προσαρμογέας ασύρματης επικοινωνίας, έχει το WEP ρυθμισμένο στη θέση Προαιρετικό και ο πελάτης έχει το WEP ενεργοποιημένο, βεβαιωθείτε ότι το πλαίσιο ελέγχου Να επιτρέπεται η συσχέτιση με μικτά κελιά στην καρτέλα Ασφάλεια είναι επιλεγμένο, για να επιτρέπεται η συσχέτιση.


Χρησιμοποιήστε προσωρινό όνομα χρήστη και κωδικό πρόσβασης για να συνδεθείτε. Ενδέχεται να σας ζητηθεί το όνομα χρήστη και ο κωδικός πρόσβασης των Windows.


Χρησιμοποιήστε το όνομα χρήστη Windows που χρησιμοποιείτε σε αυτό τον υπολογιστή, ως όνομα χρήστη για τον έλεγχο ταυτότητας.


Συνδεθείτε και πραγματοποιήστε έναρξη της διαδικασίας ελέγχου ταυτότητας με μη αυτόματο τρόπο.


Καθορίστε το όνομα χρήστη, τον κωδικό πρόσβασης και τον τομέα για τον έλεγχο ταυτότητας, προς αποθήκευση και χρήση.


Καθορίστε το όνομα χρήστη για τον έλεγχο ταυτότητας, προς αποθήκευση και χρήση.


Καθορίστε τον κωδικό πρόσβασης για τον έλεγχο ταυτότητας, προς αποθήκευση και χρήση.


Επιβεβαιώστε τον κωδικό πρόσβασης για τον έλεγχο ταυτότητας, προς αποθήκευση και χρήση.


Επιλέξτε το συγκεκριμένο όνομα τομέα, προς αποθήκευση και χρήση.


Μεταβιβάστε τον τομέα σύνδεσης και όνομα χρήστη των Windows στο διακομιστή RADIUS. (Αυτή είναι η προεπιλεγμένη ρύθμιση.)


Επιβάλλετε στον προσαρμογέα ασύρματου δικτύου να τερματίζει τη συσχέτιση μετά τον τερματισμό της σύνδεσης.


Καθορίστε το χρονικό διάστημα (μεταξύ 30 και 500 δευτερολέπτων) αναμονής πριν δηλωθεί ο έλεγχος ταυτότητας ως εσφαλμένος και γίνει αποστολή μηνύματος σφάλματος. Η προεπιλεγμένη τιμή είναι 90 δευτερόλεπτα.


Αποθηκεύστε τις αλλαγές που κάνατε στο παράθυρο Ρυθμίσεις.


Ακυρώστε τις αλλαγές που κάνατε στο παράθυρο Ρυθμίσεις.


Επιλέξτε τον κατάλληλο φορέα πιστοποίησης δικτύου μέσα από την αναπτυσσόμενη λίστα.


Χρησιμοποιήστε το όνομα χρήστη Windows που χρησιμοποιείτε σε αυτό τον υπολογιστή, ως όνομα χρήστη EPA-GTC.


Πληκτρολογήστε ένα όνομα χρήστη PEAP στο πεδίο Όνομα χρήστη, για χρήση ξεχωριστού ονόματος χρήστη και πραγματοποιήστε έναρξη της διαδικασίας ελέγχου ταυτότητας EAP-GTC.


Επιλέξτε Διακριτικό ως κωδικό πρόσβασης. Σημειώνεται ότι, με το Διακριτικό, χρησιμοποιείται μια συσκευή υλικού ως διακριτικό ή το πρόγραμμα Secure Computing SofToken (έκδοση 1.3 ή μεταγενέστερο) για τη λήψη και εισαγωγή ενός κωδικού πρόσβασης που ισχύει για μία μόνο φορά, κατά τη διάρκεια του ελέγχου ταυτότητας.


Επιλέγει ένα στατικό κωδικό πρόσβασης.


Καθορίστε ένα συγκεκριμένο διακομιστή ή τομέα και όνομα έναρξης σύνδεσης. Αφήστε το πεδίο ονόματος διακομιστή κενό (συνιστάται), προκειμένου ο πελάτης να αποδεχθεί ένα πιστοποιητικό από οποιονδήποτε διακομιστή με πιστοποιητικό υπογεγραμμένο από το φορέα που περιλαμβάνεται στη λίστα φορέων πιστοποίησης δικτύου. Διαφορετικά, εισαγάγετε το όνομα τομέα του διακομιστή από τον οποίο ο πελάτης θα αποδέχεται πιστοποιητικά.


Πραγματοποιήστε επεξεργασία του στατικού κωδικού πρόσβασης.


Αποθηκεύστε τις αλλαγές που έγιναν στο παράθυρο ρύθμισης παραμέτρων EAP-GTC.


Ακυρώστε τις αλλαγές που έγιναν στο παράθυρο ρύθμισης παραμέτρων EAP-GTC.


Εισαγάγετε τη διεύθυνση MAC του σημείου πρόσβασης με τον οποίο πρέπει να προσπαθήσει πρώτα να συσχετιστεί ο πελάτης.


Εισαγάγετε τη διεύθυνση MAC του σημείου πρόσβασης με τον οποίο πρέπει να προσπαθήσει να συσχετιστεί ο πελάτης με τη δεύτερη προσπάθεια.


Εισαγάγετε τη διεύθυνση MAC του σημείου πρόσβασης με τον οποίο πρέπει να προσπαθήσει να συσχετιστεί ο πελάτης με την τρίτη προσπάθεια.


Εισαγάγετε τη διεύθυνση MAC του σημείου πρόσβασης με τον οποίο πρέπει να προσπαθήσει να συσχετιστεί ο πελάτης με την τέταρτη προσπάθεια.


Αποθηκεύστε τις αλλαγές που κάνατε στο παράθυρο Προτιμώμενα σημεία πρόσβασης.


Ακυρώστε τις αλλαγές που κάνατε στο παράθυρο Προτιμώμενα σημεία πρόσβασης.


Χρησιμοποιήστε το όνομα χρήστη των Windows ως όνομα χρήστη για την ασφάλεια.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 64 bit. Για τα κλειδιά των 64 bit, πληκτρολογήστε 10 ψηφία σε δεκαεξαδική μορφή ή 5 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 64 bit. Για τα κλειδιά των 64 bit, πληκτρολογήστε 10 ψηφία σε δεκαεξαδική μορφή ή 5 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 64 bit. Για τα κλειδιά των 64 bit, πληκτρολογήστε 10 ψηφία σε δεκαεξαδική μορφή ή 5 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 64 bit. Για τα κλειδιά των 64 bit, πληκτρολογήστε 10 ψηφία σε δεκαεξαδική μορφή ή 5 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 128 bit. Για τα κλειδιά των 128 bit, πληκτρολογήστε 26 ψηφία σε δεκαεξαδική μορφή ή 13 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 128 bit. Για τα κλειδιά των 128 bit, πληκτρολογήστε 26 ψηφία σε δεκαεξαδική μορφή ή 13 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 128 bit. Για τα κλειδιά των 128 bit, πληκτρολογήστε 26 ψηφία σε δεκαεξαδική μορφή ή 13 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 128 bit. Για τα κλειδιά των 128 bit, πληκτρολογήστε 26 ψηφία σε δεκαεξαδική μορφή ή 13 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 152 bit. Για τα κλειδιά των 152 bit, πληκτρολογήστε 32 ψηφία σε δεκαεξαδική μορφή ή 16 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 152 bit. Για τα κλειδιά των 152 bit, πληκτρολογήστε 32 ψηφία σε δεκαεξαδική μορφή ή 16 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 152 bit. Για τα κλειδιά των 152 bit, πληκτρολογήστε 32 ψηφία σε δεκαεξαδική μορφή ή 16 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Ορίστε το μήκος του ήδη κοινόχρηστου κλειδιού σε 152 bit. Για τα κλειδιά των 152 bit, πληκτρολογήστε 32 ψηφία σε δεκαεξαδική μορφή ή 16 χαρακτήρες ASCII. Το μήκος πρέπει να συμφωνεί με το μήκος κλειδιού στο σημείο πρόσβασης.


Καθορίζει το όνομα χρήστη του LEAP/EAP-FAST, προς αποθήκευση και χρήση.


Καθορίζει τον κωδικό πρόσβασης του LEAP/EAP-FAST, προς αποθήκευση και χρήση.


Χρησιμοποιήστε το παράθυρο εισαγωγής ονόματος χρήστη και κωδικού πρόσβασης του LEAP/EAP-FAST για να ρυθμίσετε τις παραμέτρους έναρξης σύνδεσης LEAP.


Αποθηκεύστε τις αλλαγές που κάνατε στο παράθυρο Ρυθμίσεις LEAP/EAP-FAST.


Ακυρώστε τις αλλαγές που κάνατε στο παράθυρο Ρυθμίσεις LEAP/EAP-FAST.


Στη λειτουργία Αυτόματο, ο προσαρμογέας ασύρματου δικτύου επιχειρεί έλεγχο ταυτότητας με τη βοήθεια της λειτουργίας Κοινόχρηστο, αλλά μεταβαίνει σε ανοικτό έλεγχο ταυτότητας εάν η λειτουργία Κοινόχρηστο αποτύχει.


Στη λειτουργία Ανοικτό, ο προσαρμογέας ασύρματου δικτύου επιχειρεί την πραγματοποίηση ελέγχου ταυτότητας ανεξάρτητα από τις ρυθμίσεις WEP. Συσχέτιση με το σημείο πρόσβασης γίνεται μόνον εάν τα κλειδιά WEP τόσο στον προσαρμογέα όσο και στο σημείο πρόσβασης συμφωνούν μεταξύ τους.


Στη λειτουργία Κοινόχρηστο, ο προσαρμογέας ασύρματου δικτύου συσχετίζεται μόνο με σημεία πρόσβασης που διαθέτουν το ίδιο κλειδί WEP.


Επιλέξτε τη στάθμη ισχύος αποστολής για το 80211b/g, σε mW. Η πραγματική ισχύς αποστολής ενδέχεται να περιορίζεται από κανονιστικούς, τομεακούς ή υλικούς περιορισμούς.


Επιλέξτε τη στάθμη ισχύος αποστολής για το 802.11a, σε mW. Η πραγματική ισχύς αποστολής ενδέχεται να περιορίζεται από κανονιστικούς, τομεακούς ή υλικούς περιορισμούς.


Επιλέξτε τη στάθμη ισχύος αποστολής για το 802.11b/g ή 802.11a, σε mW. Η πραγματική ισχύς αποστολής ενδέχεται να περιορίζεται από κανονιστικούς, τομεακούς ή υλικούς περιορισμούς.


Εμφανίζει τις διαθέσιμες στάθμες ισχύος για το 802.11a.


Εμφανίζει την ισχύ του σήματος.


Εμφανίζει τα προφίλ που έχουν ήδη δημιουργηθεί. Το ενεργό προφίλ υποδεικνύεται από ένα εικονίδιο.


Ενεργοποιεί τη χρήση ασφάλειας WPA (Wi-Fi Protected Access). Στη συνέχεια, επιλέξτε ένα τύπο EAP από το αναπτυσσόμενο μενού και κάντε κλικ στο Ρύθμιση παραμέτρων για να τον ρυθμίσετε.


Ενεργοποιεί τη χρήση της ασφάλειας WPA (Wi-Fi Protected Access) μέσω φράσης πρόσβασης. Στη συνέχεια, κάντε κλικ στο κουμπί Ρύθμιση παραμέτρων, για να κάνετε τις επιθυμητές ρυθμίσεις.


Ενεργοποιεί τη χρήση της ασφάλειας 802.1x Στη συνέχεια, επιλέξτε τύπο EAP από το αναπτυσσόμενο μενού και κάντε κλικ στο Ρύθμιση παραμέτρων για να τον ρυθμίσετε.


Ενεργοποιεί τη χρήση ήδη κοινόχρηστων κλειδιών τα οποία έχουν οριστεί τόσο στο σημείο πρόσβασης όσο και στο σταθμό. Στη συνέχεια, κάντε κλικ στο κουμπί Ρύθμιση παραμέτρων, για να κάνετε τις επιθυμητές ρυθμίσεις.


Καμία ασφάλεια (δε συνιστάται).


Επιλέξτε τύπο ασφαλείας που θέλετε και, στη συνέχεια, κάντε κλικ στο κουμπί Ρύθμιση παραμέτρων για να ρυθμίσετε τον τύπο ασφαλείας.


Επιλέξτε τον τύπο EAP ασφαλείας του Wi-Fi Protected Access (WPA), από την αναπτυσσόμενη λίστα. Κάντε κλικ στο Ρύθμιση παραμέτρων, για να κάνετε τις επιθυμητές ρυθμίσεις.


Από το αναπτυσσόμενο μενού, επιλέξτε τον τύπο EAP ασφαλείας του 802.1X Κάντε κλικ στο Ρύθμιση παραμέτρων, για να κάνετε τις επιθυμητές ρυθμίσεις.


Προκειμένου ο πελάτης να αποδεχθεί ένα πιστοποιητικό από οποιονδήποτε διακομιστή με πιστοποιητικό υπογεγραμμένο από το φορέα που περιλαμβάνεται στην αναπτυσσόμενη λίστα φορέων πιστοποίησης δικτύου, αφήστε το πεδίο ονόματος διακομιστή κενό (συνιστάται). Διαφορετικά, εισαγάγετε το όνομα τομέα του διακομιστή από τον οποίο θα αποδέχεστε πιστοποιητικά.


Αλλάξτε το όνομα έναρξης σύνδεσης, εάν χρειάζεται.


Το κουμπί Στοιχεία προσαρμογέα παρέχει γενικές πληροφορίες σχετικά με την κάρτα διασύνδεσης δικτύου (δηλ. τον προσαρμογέα ασύρματου δικτύου) και το πρόγραμμα οδήγησης NDIS (Network Driver Interface Specification, Προδιαγραφή διασύνδεσης προγράμματος οδήγησης δικτύου).


Εμφανίζει τις διαθέσιμες στάθμες ισχύος για το 802.11b/g.


Εμφανίζει την τρέχουσα χώρα λειτουργίας.


Να επιτρέπεται η χρήση της λειτουργίας Super A/G από την κάρτα ασύρματης επικοινωνίας.


Να επιτρέπεται στην κάρτα ασύρματης επικοινωνίας να χρησιμοποιεί τον τρόπο λειτουργίας Extended Range (XR).


Να επιτρέπεται στην κάρτα ασύρματης λειτουργίας η μεγιστοποίηση της ποιότητας υπηρεσιών (QoS) δίνοντας διαφορετικό επίπεδο προτεραιότητας σε κάθε τύπο διακίνησης δεδομένων μέσω δικτύου.


Χρησιμοποιήστε το όνομα του υπολογιστή ως το όνομα χρήση για την ασφάλεια.


Χρησιμοποιήστε το όνομα χρήστη των Windows ως όνομα χρήστη για την ασφάλεια.


Καθορίστε τα δικά σας στοιχεία χρήστη.


Εισαγάγετε ένα όνομα χρήστη για να ξεκινήσει η διαδικασία ελέγχου ταυτότητας.


Εισαγάγετε έναν κωδικό πρόσβασης για να ξεκινήσει η διαδικασία ελέγχου ταυτότητας.


Επαναπληκτρολογήστε τον κωδικό πρόσβασης για να τον επιβεβαιώσετε.


Πληκτρολογήστε ένα νέο όνομα τομέα από τον οποίο ο πελάτης θα αποδέχεται πιστοποιητικά.


Πληκτρολογήστε ένα νέο όνομα τομέα από τον οποίο ο πελάτης θα αποδέχεται πιστοποιητικά.


Πληκτρολογήστε ένα όνομα έναρξης σύνδεσης με το νέο τομέα από τον οποίο ο πελάτης θα αποδέχεται πιστοποιητικά.


Πραγματοποιήστε αλλαγές στο όνομα τομέα και στο όνομα έναρξης σύνδεσης.


Ακυρώστε αλλαγές που τυχόν πραγματοποιήσατε στο όνομα τομέα και στο όνομα έναρξης σύνδεσης.


Πληκτρολογήστε ένα νέο όνομα τομέα από τον οποίο ο πελάτης θα αποδέχεται πιστοποιητικά.


Εισαγάγετε έναν κωδικό πρόσβασης για να ξεκινήσει η διαδικασία ελέγχου ταυτότητας.


Πληκτρολογήστε ξανά τον κωδικό πρόσβασης για να τον επιβεβαιώσετε.


Να επιτραπεί η χρήση αυτοματοποιημένων διαπιστευτηρίων προστατευόμενης πρόσβασης (PAC).


Επιλέξτε φορέα PAC.


Εισαγάγετε περισσότερα προφίλ PAC.


Εντοπίστε και εισαγάγετε κάποιο καινούργιο PAC για EAP-FAST.


Επισημάνετε ένα PAC για EAP-FAST και κάντε κλικ στο Διαγραφή για να διαγράψετε το προφίλ EAP-FAST.


Η λίστα αποθήκευσης PAC εμφανίζει τα διαθέσιμα PAC για EAP-FAST. Χρησιμοποιήστε το παράθυρο αυτό για να εισαγάγετε ή να διαγράψετε PAC για EAP-FAST.


Να εμφανίζονται μόνο δημόσια PAC για EAP-FAST.


Να εμφανίζονται μόνο ιδιωτικά PAC για EAP-FAST.


Αποδεχτείτε όλες τις αλλαγές που κάνατε στο παράθυρο αυτό.


Κλείστε αυτό το παράθυρο χωρίς να αποδεχτείτε τις αλλαγές που πραγματοποιήσατε.


Ρυθμίστε το σύστημα ώστε να ζητάει αυτόματα όνομα χρήστη και κωδικό πρόσβασης.


Ρυθμίστε το προφίλ ώστε να είναι διαθέσιμο σε όλους τους χρήστες. Μπορείτε, επίσης, να το χρησιμοποιήσετε ως πρότυπο για τη δημιουργία περισσότερων προφίλ.


Εμφανίζει τις διαθέσιμες κάρτες SIM. Επιλέξτε Οποιαδήποτε κάρτα SIM για να χρησιμοποιήσετε οποιαδήποτε από τις διαθέσιμες κάρτες SIM.


Εισαγάγετε αριθμό PIN γα να αποκτήσετε πρόσβαση σε κάρτα SIM.


Πληκτρολογήστε ξανά τον αριθμό PIN για να αποκτήσετε πρόσβαση στην κάρτα SIM.


Εισαγάγετε το όνομα έναρξης σύνδεσης.


Η λίστα καρτών SIM εμφανίζει τις διαθέσιμες κάρτες SIM. Επιλέξτε Οποιαδήποτε κάρτα SIM για να χρησιμοποιήσετε οποιαδήποτε από τις διαθέσιμες κάρτες SIM.


Εισαγάγετε αριθμό PIN γα να αποκτήσετε πρόσβαση σε κάρτα SIM.


Πληκτρολογήστε ξανά τον αριθμό PIN για να αποκτήσετε πρόσβαση στην κάρτα SIM.


Χρησιμοποιήστε το όνομα χρήστη και τον κωδικό πρόσβασης για να πραγματοποιήσετε έλεγχο ταυτότητας.


Επιλέξτε το πιστοποιητικό που θα χρησιμοποιηθεί για τον έλεγχο ταυτότητας.


Χρησιμοποιήστε κάποιο πιστοποιητικό για τον έλεγχο ταυτότητας.


Να επιτρέπεται στην κάρτα ασύρματης επικοινωνίας να χρησιμοποιεί τη ζώνη Public Safety Band στα 4.9 GHz.


Πληροφορίες που μπορείτε να προσθέσετε στη λίστα σάρωσης.


Πληροφορίες που εμφανίζονται στη λίστα σάρωσης.


Δείτε αυτές τις πληροφορίες στη λίστα σάρωσης.


Καταργήστε αυτές τις πληροφορίες από τη λίστα σάρωσης.


Μετακινήστε την επιλεγμένη στήλη της λίστας σάρωσης προς τα επάνω.


Μετακινήστε την επιλεγμένη στήλη της λίστας σάρωσης προς τα κάτω.


Πραγματοποιήστε αυτόματη συνέχιση της περιόδου λειτουργίας μετά την προσωρινή διακοπή [μόνο σε περίπτωση προσωρινής απώλειας της σύνδεσης, όχι σε περίπτωση διακοπής/επαναφοράς].


Χρόνος που παρέρχεται πριν η έναρξη σύνδεσης των Windows πραγματοποιήσει εκκίνηση της πολιτικής ομάδας.


Πραγματοποιήστε αυτόματη συνέχιση της περιόδου λειτουργίας μετά την προσωρινή διακοπή [μόνο σε περίπτωση προσωρινής απώλειας της σύνδεσης, όχι σε περίπτωση διακοπής/επαναφοράς].


Εάν αυτό το πλαίσιο είναι επιλεγμένο, δεν θα μπορείτε να αλλάξετε τις ρυθμίσεις αυτού του προφίλ. Επικοινωνήστε με το διαχειριστή του συστήματός σας.


Χρησιμοποιήστε τη λειτουργία Super A/G του Atheros, η οποία συνδυάζει διάφορες τεχνικές για τη μεγιστοποίηση της ασύρματης διακίνησης δεδομένων.


Από το αναπτυσσόμενο μενού, επιλέξτε τον τύπο EAP ασφαλείας του 802.1X Κάντε κλικ στο Ρύθμιση παραμέτρων, για να κάνετε τις επιθυμητές ρυθμίσεις.


Επιλέξτε έναν ή περισσότερους φορείς PAC.


Επιλέξτε το για να γίνεται αυτόματη επιλογή των PAC που ανήκουν στην ίδια ομάδα.


Να επιτραπεί η χρήση αυτοματοποιημένων διαπιστευτηρίων προστατευόμενης πρόσβασης (PAC).


Από το αναπτυσσόμενο μενού, επιλέξτε τον τύπο EAP ασφαλείας του 802.1X, για μεταβίβαση ρυθμίσεων PAC. Κάντε κλικ στο Ρύθμιση παραμέτρων, για να κάνετε τις επιθυμητές ρυθμίσεις.


Επιλέξτε αυτό το πλαίσιο για να χρησιμοποιήσετε τον έλεγχο ταυτότητας EAP-FAST κατά τη μεταβίβαση ρυθμίσεων PAC.


Επιλέξτε το για να χρησιμοποιήσετε PAC από υπολογιστή για σύνδεση με τομέα.


Επιβάλλετε στον προσαρμογέα ασύρματου δικτύου να τερματίζει τη συσχέτιση μετά τον τερματισμό της σύνδεσης.


Πραγματοποιήστε αυτόματη συνέχιση της περιόδου λειτουργίας μετά την προσωρινή διακοπή [μόνο σε περίπτωση προσωρινής απώλειας της σύνδεσης, όχι σε περίπτωση διακοπής/επαναφοράς].


Επιλέξτε το για να πραγματοποιήσετε έλεγχο της ταυτότητας του διακομιστή.


Καθορίστε το φορέα πιστοποίησης που θα χρησιμοποιηθεί.


Χρησιμοποιήστε προσωρινό όνομα χρήστη και κωδικό πρόσβασης για να συνδεθείτε. Ενδέχεται να σας ζητηθεί το όνομα χρήστη και ο κωδικός πρόσβασης των Windows.


Χρησιμοποιήστε το όνομα χρήστη Windows που χρησιμοποιείτε σε αυτό τον υπολογιστή, ως όνομα χρήστη για τον έλεγχο ταυτότητας.


Κάντε το σύστημα να προτρέπει αυτόματα για όνομα χρήστη και κωδικό πρόσβασης.


Συνδεθείτε και πραγματοποιήστε έναρξη της διαδικασίας ελέγχου ταυτότητας με μη αυτόματο τρόπο.


Καθορίστε το όνομα χρήστη, τον κωδικό πρόσβασης και τον τομέα για τον έλεγχο ταυτότητας, προς αποθήκευση και χρήση.


Εισαγάγετε το όνομα χρήστη για δυναμική ασφάλεια.


Εισαγάγετε τον κωδικό πρόσβασης για δυναμική ασφάλεια.


Πληκτρολογήστε ξανά τον κωδικό πρόσβασης.


Εισαγάγετε το όνομα τομέα.


Μεταβιβάστε τον τομέα σύνδεσης και όνομα χρήστη των Windows στο διακομιστή RADIUS. (Αυτή είναι η προεπιλεγμένη ρύθμιση.)


Επιλέξτε το για να πραγματοποιήσετε έλεγχο της ταυτότητας του διακομιστή.


Επιλέξτε το για να πραγματοποιήσετε έλεγχο της ταυτότητας του διακομιστή.


Κάντε κλικ σε αυτό το κουμπί για να πραγματοποιήσετε ρύθμιση παραμέτρων της επιλεγμένης μεθόδου ελέγχου ταυτότητας EAP-FAST


Κάντε κλικ σε αυτό το κουμπί για να πραγματοποιήσετε ρύθμιση παραμέτρων της επιλεγμένης μεθόδου ελέγχου ταυτότητας για μεταβίβαση ρυθμίσεων PAC


Κάντε κλικ σε αυτό το κουμπί για να διαχειριστείτε και να οργανώσετε τα αρχεία PAC


Κάντε κλικ σε αυτό το κουμπί για να ορίσετε το διακομιστή ή τον τομέα και το όνομα έναρξης σύνδεσης.


Κάντε κλικ σε αυτό το κουμπί για να κλείσετε το παράθυρο διαλόγου αφού αποθηκεύσετε τις ρυθμίσεις του ονόματος χρήστη και κωδικού πρόσβασης.


Κάντε κλικ σε αυτό το κουμπί για να κλείσετε το παράθυρο διαλόγου χωρίς να αποθηκεύσετε τις ρυθμίσεις του ονόματος χρήστη και κωδικού πρόσβασης.


Κάντε κλικ σε αυτό το κουμπί για να κλείσετε το παράθυρο διαλόγου αφού αποθηκεύσετε τις ρυθμίσεις EAP-FAST.


Κάντε κλικ σε αυτό το κουμπί για να κλείσετε το παράθυρο διαλόγου χωρίς να αποθηκεύσετε τις ρυθμίσεις EAP-FAST.


Εισαγάγετε τα στοιχεία PAC.


Πληκτρολογήστε τα στοιχεία του ονόματος χρήστη και του κωδικού πρόσβασης.


Κάντε κλικ σε αυτό το κουμπί για να δημιουργήσετε μια νέα ομάδα.


Κάντε κλικ σε αυτό το κουμπί για να κλείσετε αυτό το παράθυρο.


Διαχειριστείτε και οργανώστε τα αρχεία PAC μέσω του αναδυόμενου μενού ή των παρακάτω κουμπιών εντολών.


Εισαγάγετε το όνομα και τη διαδρομή του αρχείου PAC.


Κάντε κλικ στο κουμπί για να πραγματοποιήσετε περιήγηση στον κατάλογο του αρχείου PAC που επιθυμείτε. Κάντε κλικ στο κουμπί Εισαγωγή για να εισαγάγετε το επιλεγμένο αρχείο.


Ενεργοποιήστε αυτή την επιλογή για να πραγματοποιήσετε εισαγωγή αρχείου PAC στον αποθηκευτικό χώρο ιδιωτικού PAC


Ενεργοποιήστε αυτή την επιλογή για να πραγματοποιήσετε εισαγωγή αρχείου PAC στο αποθηκευτικό χώρο συνολικών PAC


Κάντε κλικ σε αυτό το κουμπί για να ξεκινήσετε την εισαγωγή των επιλεγμένων αρχείων PAC.


Κάντε κλικ σε αυτό το κουμπί για να κλείσετε αυτό το παράθυρο.


Εμφανίζει το όνομα φορέα του αρχείου PAC


Εμφανίζει την ταυτότητα του φορέα του αρχείου PAC


Εμφανίζει το όνομα του αρχείου PAC


Εμφανίζει τον τύπο του αρχείου PAC Μπορεί να είναι αρχείο PAC τύπου “σήραγγας”, αρχείο PAC από υπολογιστή ή αρχείο PAC χρήστη


Εμφανίζει την ημερομηνία λήξης του αρχείου PAC


Κάντε κλικ στο κουμπί για να κλείσετε το παράθυρο.


Εμφανίζει τον τύπο του χώρου αποθήκευσης PAC. Μπορεί να είναι Νέο PAC, Ιδιωτικό PAC ή Δημόσιο PAC


Να γίνεται πάντα επανάληψη του ελέγχου ταυτότητας του πιστοποιητικού χρήστη μετά τη σύνδεση του χρήστη.


Εμφανίζει τις ζώνες ασύρματης επικοινωνίας που υποστηρίζονται από την κάρτα.


Τροποποιεί τα επιλεγμένα στοιχεία του προφίλ ρύθμισης παραμέτρων.


Πατήστε για να καταργήσετε το επιλεγμένο προφίλ ρύθμισης παραμέτρων.


Περιορίζει το χρόνο που απαιτείται για τον εντοπισμό ελεγκτή τομέα και καταχωρεί τον χρόνο σε δευτερόλεπτα στο αντίστοιχο σύνθετο πλαίσιο.


Εισαγάγετε τον αριθμό των δευτερολέπτων (έως και 300) που αποτελούν το χρονικό όριο της διαδικασίας ελέγχου ταυτότητας, κατά την προσπάθεια εύρεσης ελεγκτή τομέα.


Χρησιμοποιήστε αυτό το πλαίσιο ελέγχου για να επιτρέψετε στην κάρτα ασύρματης επικοινωνίας να χρησιμοποιεί τον τρόπο λειτουργίας ασύρματης επικοινωνίας στα 5 GHz και στα 300 Mbps.


Χρησιμοποιήστε αυτό το πλαίσιο ελέγχου για να επιτρέψετε στην κάρτα ασύρματης επικοινωνίας να χρησιμοποιεί τον τρόπο λειτουργίας ασύρματης επικοινωνίας στα 2 GHz και στα 300 Mbps.


Απενεργοποιεί αυτόματα το ασύρματο LAN εάν είστε ήδη συνδεδεμένοι σε ενσύρματο LAN ή ενεργοποιεί το ασύρματο LAN μόλις αποσυνδεθείτε από το ενσύρματο LAN.


Εάν επιλέξετε το συγκεκριμένο πλαίσιο, η στάθμη ισχύος αποστολής δεν μπορεί να αλλάξει. Επικοινωνήστε με το διαχειριστή του συστήματός σας.


Χρησιμοποιήστε αυτά τα κουμπιά επιλογής για να επιλέξετε το βοηθητικό πρόγραμμα που θα ελέγχει το ασύρματο δίκτυο.


Επιλέξτε αυτό για να δώσετε τον έλεγχο του ασύρματου δικτύου στα Windows.


Επιλέξτε αυτό για να δώσετε τον έλεγχο του ασύρματου δικτύου στο ACU.


Επιλέξτε αυτό για να έχει κάποιο εργαλείο τρίτου κατασκευαστή τον έλεγχο του ασύρματου δικτύου.


Επιλέξτε το επίπεδο περιαγωγής ώστε να ταιριάζει με τον τρόπο που χρησιμοποιείτε τη λειτουργία περιαγωγής.


Εμφανίζει το επιπλέον κανάλι που χρησιμοποιείται σε λειτουργία 40 MHz.


Εμφανίζει την επιπλέον συχνότητα που χρησιμοποιείται σε λειτουργία 40 MHz.


Εμφανίζει την κατάσταση εξοικονόμησης ενέργειας 802.11n MIMO.


Εμφανίζει το εύρος του τρέχοντος καναλιού.


Ορίζει τη λειτουργία ασύρματου δικτύου στα 5 GHz και 300 Mbps όταν γίνεται έναρξη ενός δικτύου ad hoc.


Ορίζει τη λειτουργία ασύρματου δικτύου στα 2,4 GHz και 300 Mbps όταν γίνεται έναρξη ενός δικτύου ad hoc.


Επιλέξτε το προφίλ από τη λίστα για να πραγματοποιήσετε εκκίνηση της λειτουργίας διαγνωστικού ελέγχου καναλιού.


Εμφανίζει την κατάσταση και πρόοδο των δοκιμών των οποίων έχει ζητηθεί η πραγματοποίηση.


Πραγματοποιεί εκκίνηση της λειτουργίας διαγνωστικού ελέγχου καναλιού. Πραγματοποιεί διακοπή της λειτουργίας διαγνωστικού ελέγχου καναλιού, εάν έχει ήδη ξεκινήσει.


Αποθηκεύστε την κατάσταση και την πρόοδο. Πραγματοποιήστε περιήγηση στον κατάλογο για να αποθηκεύσετε την κατάσταση σε αρχείο.


Διακόπτει τη λειτουργία διαγνωστικού ελέγχου καναλιού (εάν έχει ξεκινήσεις) και κλείνει το παράθυρο.


Επιλέξτε την κάρτα SIM που θα χρησιμοποιήσετε.


Εισαγάγετε τον αριθμό PIN που χρησιμοποιείται για πρόσβαση στην κάρτα SIM.


Εισαγάγετε ξανά τον αριθμό PIN που χρησιμοποιείται για πρόσβαση στην κάρτα SIM.


Επιλέξτε τον τύπο ΕΑΡ ασφάλειας WPA/WPA2 από την αναπτυσσόμενη λίστα. Click Configure to set up.


Ανανεώστε τη λίστα με τις κάρτες SIM που έχουν εισαχθεί στο σύστημα.


Επιλέξτε αυτή τη ρύθμιση για να χρησιμοποιήσετε το IMSI της κάρτας SIM ως όνομα έναρξης σύνδεσης.