Copyright: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved
Citation: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved


Wyświetla bieżącą częstotliwość i maksymalną szybkość połączenia bezprzewodowego.


Wyświetla aktualnie wybraną nazwę profilu konfiguracji.


Wyświetla informację, czy stacja jest połączona z siecią bezprzewodową.


Wyświetla szybkość wysyłania dla połączenia przy użyciu bieżącego sterownika.


Wyświetla szybkość odbierania dla połączenia przy użyciu bieżącego sterownika.


Wyświetla tryb działania sieci: infrastruktury lub ad hoc.


Wyświetla tryb zabezpieczeń używanych przez sterownik (Wyłączone, WEP, AES lub CKIP).


Wyświetla adres IP, który jest wykorzystywany przez protokół TCP/IP dla karty sieci bezprzewodowej.


Wyświetla listę skonfigurowanych profili. Aby zmienić profil na inny, wybierz odpowiednią nazwę na liście Profile, a następnie kliknij przycisk Uruchom.


Wyświetla informacje szczegółowe dotyczące wybranego profilu konfiguracji.


Wyświetla pierwszą nazwę sieciową (SSID1) dla wybranego profilu konfiguracji.


Wyświetla drugą nazwę sieciową (SSID2) dla wybranego profilu konfiguracji.


Wyświetla trzecią nazwę sieciową (SSID3) dla wybranego profilu konfiguracji.


Wyświetla typ połączenia sieciowego dla wybranego profilu konfiguracji.


Wyświetla adres karty sieci bezprzewodowej dla wybranego profilu konfiguracji.


Wyświetla tryb zabezpieczeń ustawiony w wybranym profilu konfiguracji.


Wyświetla domyślny klucz dla wybranego profilu konfiguracji.


Wyświetla bieżący tryb oszczędzania energii dla wybranego profilu konfiguracji.


Kliknij przycisk, aby utworzyć nowy profil konfiguracji i dodać do niego informacje ogólne, zaawansowane oraz dotyczące zabezpieczeń.


Kliknij przycisk, aby zmodyfikować informacje na temat aktualnie wybranego profilu konfiguracji.


Kliknij przycisk, aby usunąć aktualnie wybrany profil konfiguracji.


Kliknij przycisk, aby zastosować zmiany wprowadzone w aktualnie wybranym profilu konfiguracji.


Wyświetla nazwę karty sieci bezprzewodowej. Jest to nazwa przypisana do karty sieci bezprzewodowej przez system operacyjny.


Wyświetla adres MAC karty sieci bezprzewodowej.


Wyświetla nazwę sterownika oraz ścieżkę karty sieci bezprzewodowej.


Wyświetla wersję sterownika karty sieci bezprzewodowej.


Wyświetla datę utworzenia sterownika karty sieci bezprzewodowej.


Wyświetla nazwę sieciową (SSID) dla wybranej bezprzewodowej sieci LAN.


Wyświetla adres MAC (BSSID) punktu dostępu, z którym połączona jest karta sieci bezprzewodowej.


Wyświetla stan działania karty sieci bezprzewodowej.


Wyświetla kanał operacyjny oraz częstotliwość stacji.


Wyświetla dostępne punkty dostępu i sieci ad hoc, określając nazwy sieciowe, zabezpieczenia, siłę sygnału, tryb bezprzewodowy, numer kanału oraz częstotliwość. Kliknij dwukrotnie ikonę dostępnej sieci, aby się z nią połączyć, jeśli profil konfiguracji jest już utworzony, lub aby utworzyć profil konfiguracji dla danej nazwy sieciowej.


Dostarcza dane dotyczące liczby wysłanych ramek multiemisji, emisji i emisji pojedynczej oraz całkowitej liczby wysłanych bajtów.


Wyświetla liczbę wysłanych ramek multiemisji. Ramka multiemisji jest wysyłana do wielu odbiorców.


Wyświetla liczbę wysłanych ramek emisji. Ramka emisji jest wysyłana do wszystkich hostów w sieci.


Wyświetla liczbę wysłanych ramek emisji pojedynczej. Ramka emisji pojedynczej jest wysyłana do jednego odbiorcy.


Wyświetla całkowitą liczbę wysłanych bajtów we wszystkich ramkach.


Dostarcza dane dotyczące liczby odebranych ramek multiemisji, emisji i emisji pojedynczej oraz całkowitej liczby odebranych bajtów.


Wyświetla liczbę odebranych ramek multiemisji. Ramka multiemisji jest wysyłana do wielu odbiorców.


Wyświetla liczbę odebranych ramek emisji. Ramka emisji jest wysyłana do wszystkich hostów w sieci.


Wyświetla liczbę odebranych ramek emisji pojedynczej. Ramka emisji pojedynczej jest wysyłana do jednego odbiorcy.


Wyświetla całkowitą liczbę odebranych bajtów we wszystkich ramkach.


Wyświetla czas działania karty sieci bezprzewodowej.


Kliknij przycisk, aby wyzerować wszystkie statystyki.


Kliknij przycisk, aby wyświetlić statystyki zaawansowane.


Kliknij przycisk, aby wyświetlić informacje o sterowniku.


Kliknij przycisk, aby włączyć lub wyłączyć funkcję sygnału radiowego.


Kliknij przycisk, aby wyświetlić lub ukryć ikonę umieszczoną na pasku zadań komputera. W zależności od siły sygnału zmieniany jest kolor ikony na pasku. Ikona ta wskazuje również używaną częstotliwość.


Kliknij przycisk, aby uzyskać dostęp do aplikacji Site Survey.

Aplikacja ta po włączeniu wyświetla graficzne odwzorowanie siły i jakości sygnału połączenia do punktu dostępu. Korzystając z pomiarów wykonywanych podczas zmiany lokalizacji karty sieci bezprzewodowej, określ potrzebę zastosowania dodatkowych punktów dostępu w danej sieci.


Określ nazwę profilu konfiguracji.


Określ nazwy sieciowe (SSID) dla profilu konfiguracji. Pozostaw wszystkie pola SSID puste, aby umożliwić połączenie z dowolnym punktem dostępu.


Określ pierwszy identyfikator SSID dla profilu konfiguracji. Pozostaw wszystkie pola SSID puste, aby umożliwić połączenie z dowolnym punktem dostępu.


Określ drugi identyfikator SSID dla profilu konfiguracji. Pozostaw wszystkie pola SSID puste, aby umożliwić połączenie z dowolnym punktem dostępu.


Określ trzeci identyfikator SSID dla profilu konfiguracji. Pozostaw wszystkie pola SSID puste, aby umożliwić połączenie z dowolnym punktem dostępu.


Określ typ sieci dla profilu konfiguracji.


Określ tryb oszczędzania energii dla profilu konfiguracji.


Kliknij przycisk radiowy, aby wybrać typ szyfrowania.


Kliknij przycisk radiowy, aby wyłączyć szyfrowanie.


W celu włączenia zabezpieczeń dynamicznych kliknij przycisk radiowy Zabezpieczenia dynamiczne, z menu rozwijanego wybierz żądane zabezpieczenia, a następnie kliknij przycisk Konfiguruj, aby wprowadzić informacje zdefiniowane przez użytkownika.


Kliknij dany przycisk radiowy, aby określić wstępnie udostępnione klucze.


Wyświetla metodę wprowadzania klucza.


Wyświetla wykorzystanie znaków szesnastkowych (0–9, A–F) przy wprowadzaniu klucza.


Wyświetla wykorzystanie tekstowych znaków ASCII (wszystkie znaki na klawiaturze poza spacją) przy wprowadzaniu klucza.


Kliknij przycisk radiowy Per-User Key, aby ustawić daną opcję jako domyślny klucz szyfrowania.


Kliknij przycisk radiowy Pierwszy, aby ustawić tę opcję jako domyślny klucz szyfrowania.


Kliknij przycisk radiowy Drugi, aby ustawić tę opcję jako domyślny klucz szyfrowania.


Kliknij przycisk radiowy Trzeci, aby ustawić tę opcję jako domyślny klucz szyfrowania.


Kliknij przycisk radiowy Czwarty, aby ustawić tę opcję jako domyślny klucz szyfrowania.


Wprowadź w tym polu wartość klucza szyfrowania dla użytkownika.


Wprowadź w tym polu wartość pierwszego klucza szyfrowania.


Wprowadź w tym polu wartość drugiego klucza szyfrowania.


Wprowadź w tym polu wartość trzeciego klucza szyfrowania.


Wprowadź w tym polu wartość czwartego klucza szyfrowania.


Wybierz z menu rozwijanego długość klucza szyfrowania dla użytkownika.


Wybierz z menu rozwijanego długość pierwszego klucza szyfrowania.


Wybierz z menu rozwijanego długość drugiego klucza szyfrowania.


Wybierz z menu rozwijanego długość trzeciego klucza szyfrowania.


Wybierz z menu rozwijanego długość czwartego klucza szyfrowania.


Użyj pola wyboru, aby zastosować protokół LEAP (Lightweight Extensible Authentication Protocol).


Kliknij, aby określić nazwę użytkownika i hasło dla protokołu LEAP/EAP-FAST. Nazwa nie może składać się z więcej niż 64 znaków.


Określa hasło dla protokołu LEAP/EAP-FAST. Hasło nie może składać się z więcej niż 64 znaków.


Użyj pola wyboru, aby wprowadzić adres MAC karty sieci bezprzewodowej. Adres ten zastępuje globalny adres MAC karty sieci bezprzewodowej.


Wprowadź adres karty sieci bezprzewodowej przy użyciu liczb szesnastkowych.


Umożliwia wybór metody skanowania kart sieci bezprzewodowych używanej do lokalizowania punktów dostępu lub sieci ad hoc.


Kliknij przycisk radiowy, aby wybrać skanowanie pasywne. Skanowanie pasywne oznacza, że karta sieci bezprzewodowa jest w trybie tylko nasłuchiwania.


Kliknij przycisk radiowy, aby wybrać skanowanie automatyczne. Przy użyciu kodu kraju sterownik określa, którego typu skanowania należy użyć — aktywnego czy pasywnego.


Przy użyciu menu rozwijanego określ poziom mocy transmisji. Bieżąca moc transmisji może być ograniczona przepisami lub ograniczeniami sprzętowymi.


Wybierz tryb bezprzewodowy dla karty sieci bezprzewodowej.


Wybierz tryb bezprzewodowy, w którym uruchomiona zostanie sieć ad hoc, jeśli nie zostanie znaleziona żadna sieć ad hoc o podanej nazwie.


Użyj pola wyboru, aby umożliwić użycie przez kartę sieci bezprzewodowej trybu bezprzewodowego 5 GHz i 54 Mb/s.


Użyj pola wyboru, aby umożliwić użycie przez kartę sieci bezprzewodowej trybu bezprzewodowego 5 GHz.


Użyj pola wyboru, aby umożliwić użycie przez kartę sieci bezprzewodowej trybu bezprzewodowego 2,4 GHz i 11 Mb/s.


Użyj pola wyboru, aby dla trybu bezprzewodowego wykorzystywanego podczas uruchamiania sieci ad hoc wybrać ustawienie 5 GHz i 54 Mb/s.


Użyj pola wyboru, aby dla trybu bezprzewodowego wykorzystywanego podczas uruchamiania sieci ad hoc wybrać ustawienie 5 GHz.


Użyj pola wyboru, aby dla trybu bezprzewodowego wykorzystywanego podczas uruchamiania sieci ad hoc wybrać ustawienie 2,4 GHz i 11 Mb/s.


Wyświetla wartość poziomu mocy transmisji w mW.


Wyświetla nazwę sieci (SSID), z którą stacja jest połączona lub próbuje nawiązać połączenie.


Wyświetla informację, czy profil konfiguracji może być wykorzystywany przez sieci oferujące mechanizmy QoS (Quality of Service).


Wyświetla poziom szumu aktualnego połączenia w dBm.


Wyświetla stan trybu oszczędzania energii dla profilu konfiguracji.


Wyświetla częstotliwość aktualnego połączenia.


Kliknij przycisk, aby zamknąć okno dialogowe Zaawansowany stan łącza.


Zapewnia statystyki wysyłania.


Wyświetla liczbę sygnałów nawigacyjnych wysłanych przez kartę sieci bezprzewodowej.


Wyświetla liczbę ramek poprawnie wysłanych przez kartę sieci bezprzewodowej.


Wyświetla liczbę ramek wysłanych ponownie z powodu niepowodzenia przy odbiorze ramek przez stację.


Wyświetla liczbę ramek odrzuconych, ponieważ nie zostały nigdy pomyślnie odebrane przez stację odbiorczą.


Wyświetla liczbę ramek RTS (Request To Send) wysłanych przez kartę sieci bezprzewodowej.


Zapewnia statystyki odbierania.


Wyświetla liczbę sygnałów nawigacyjnych odebranych przez kartę sieci bezprzewodowej.


Wyświetla liczbę ramek poprawnie odebranych przez kartę sieci bezprzewodowej.


Wyświetla liczbę ramek odebranych przez kartę sieci bezprzewodowej z błędami.


Wyświetla liczbę ramek odebranych, które nie zostały pomyślnie odszyfrowane przez kartę sieci bezprzewodowej.


Określa liczbę ramek odrzuconych przez kartę sieci bezprzewodowej w powodu odebrania duplikatu ramki.


Określa liczbę ramek CTS (Clear To Send) odebranych przez kartę sieci bezprzewodowej.


Wyświetla liczbę błędów uwierzytelniania punktu dostępu odebranych przed kartę sieci bezprzewodowej.


Wyświetla liczbę odrzuconych skojarzeń z punktem dostępu odebranych przed kartę sieci bezprzewodowej.


Kliknij przycisk, aby zamknąć okno dialogowe Zaawansowane statystyki.


Kliknij przycisk, aby wyzerować wszystkie statystyki.


Wybierz kraj, w którym ma działać karta sieci bezprzewodowej.


Kliknij przycisk radiowy, aby włączyć funkcję roamingu w celu pasywnego skanowania wszystkich kanałów określonych jako dostępne zgodnie z odpowiednimi obowiązującymi przepisami.


Kliknij przycisk, aby zastosować zmiany kodu kraju.


Kliknij przycisk, aby zakończyć i zamknąć narzędzie służące do wyboru kodu kraju.


Wyświetla siłę sygnału w procentach lub w dB.


Kliknij przycisk, aby wyświetlić siłę sygnału w procentach.


Kliknij przycisk, aby wyświetlić siłę sygnału w dB.


Wyświetla dane statystyczne oparte na parametrze Interwał odświeżania (Względny) lub na całkowitym czasie trwania (Kumulowany).


Kliknij przycisk, aby gromadzić statystyki oparte na parametrze Interwał odświeżania.


Kliknij przycisk, aby gromadzić statystyki.


Wyświetla w sekundach interwał gromadzenia statystyk względnych.


Kliknij przycisk, aby umożliwić zmiany w oknie dialogowych Ustawienia ekranu.


Kliknij przycisk, aby zakończyć i zamknąć okno dialogowe Ustawienia ekranu.


Użyj karty Ogólne, aby skonfigurować nazwy sieciowe oraz nazwę konfiguracji dla profilu konfiguracji.


Kliknij przyciski narzędzi, aby włączyć/wyłączyć sygnał radiowy, otworzyć Narzędzie służące do wyboru kodu kraju i/lub włączyć/wyłączyć ikonę na pasku.


Użyj karty Zarządzanie profilami, aby dodać nową konfigurację, zmodyfikować lub usunąć konfigurację bądź zmienić profil konfiguracji.


Karta Diagnostyka przedstawia statystyki sterownika.


Wybierz tryb preambuły Tylko długa albo Długa i krótka dla sieci 802.11b i 802.11g. Opcja Tylko długa jest używana w celu zapewnienia wstecznej zgodności ze starszymi kartami sieci bezprzewodowej.


Użyj tej strony, aby dodać klucze szyfrowania zabezpieczeń statycznych.


Kliknij przycisk Odśwież, aby ponownie przeskanować i odświeżyć listę dostępnych punktów dostępu i sieci ad hoc.


Użyj karty Zaawansowane, aby ustawić zaawansowane parametry konfiguracji dla profilu konfiguracji.


Kliknij przycisk Definiuj wstępnie udostępnione klucze, aby otworzyć okno dialogowe i wprowadzić wstępnie udostępnione klucze.


Użyj karty Zabezpieczenia, aby ustawić typ szyfrowania i skonfigurować zabezpieczenia dynamiczne.


Ustaw tryb preambuły na Krótka i długa, aby karta sieci bezprzewodowej mogą wybrać, której preambuły ma użyć.


Ustaw tryb preambuły na Tylko długa. Tryb ten jest używany w celu zapewnienia wstecznej zgodności ze starszymi kartami sieci bezprzewodowej.


Wybierz przycisk radiowy, aby wybrać klucz domyślny, a następnie wypełnij pole klucza i wybierz z menu rozwijanego odpowiednią długość.


Wyświetla aktualne informacje na temat sterownika.


Użyj karty Stan sieci WLAN do przeglądania informacji dotyczących aktualnego połączenia oraz listy dostępnych punktów dostępu i sieci ad hoc. Przełącz na nowe połączenie z danej listy.


Wyświetla zaawansowane statystyki wysyłania i odbierania dotyczące karty sieci bezprzewodowej.


Wyświetla zaawansowane informacje na temat łącza.


Kliknij kartę Zaawansowane, aby przejrzeć zaawansowane informacje na temat łącza.


Użyj Narzędzia służącego do wyboru kodu kraju do zmiany ustawienia karty sieci bezprzewodowej dotyczącego kraju.


Na karcie Bieżący stan wyświetlane są informacje dotyczące łącza.


W oknie Informacje wyświetlana jest data kompilacji i numer wersji aplikacji.


Okno Ustawienia umożliwia wprowadzanie zmian w ustawieniach ekranu oraz interwału gromadzenia informacji w trybie kumulowanym lub trybie z przerwami. W trybie z przerwami statystyki są zerowane na początku każdego interwału między pomiarami. Interwał gromadzenia informacji jest wyświetlany w sekundach. Zmień interwał, wprowadzając nową wartość lub używając strzałek w górę/w dół znajdujących się po prawej stronie. Skrócenie interwału powoduje większe użycie czasu procesora. Wyświetla względną siłę sygnału w decybelach (dB) lub w procentach.


Kliknij przycisk Uruchom, aby przełączyć się na wyróżniony punkt dostępu lub sieć ad hoc. Innym sposobem jest dwukrotne kliknięcie identyfikatora SSID. Jeśli nie istnieje żaden profil dla danego identyfikatora SSID, otwarty zostaje nowy profil o wybranym identyfikatorze SSID. Aby uruchomić profil, zakończ ustawienia profilu i naciśnij przycisk OK.


Naciśnij przycisk Uruchom, aby przełączyć się do wybranego profilu. Innym sposobem jest dwukrotne kliknięcie nazwy profilu.


Wyświetla aktualnie wybrany kanał.


Użyj pola wyboru, aby umożliwić użycie przez kartę sieci bezprzewodowej trybu bezprzewodowego 2,4 GHz i 54 Mb/s.


Użyj pola wyboru, aby dla trybu bezprzewodowego wykorzystywanego podczas uruchamiania sieci ad hoc wybrać ustawienie 2,4 GHz i 54 Mb/s.


Użyj menu rozwijanego w celu wybrania kanału uruchamiającego sieć ad hoc.


Wprowadź hasło dla protokołu LEAP/EAP-FAST.


Potwierdź wprowadzone hasło dla protokołu LEAP/EAP-FAST.


Kliknij, aby uruchomić wpisy protokołu LEAP/EAP-FAST.


Kliknij, aby wyczyścić i zamknąć okno dialogowe Definiowanie informacji o użytkowniku.


Kliknij, aby wyświetlić listę dostępnych punktów dostępu i sieci ad hoc.


Wprowadź nazwę użytkownika dla protokołu LEAP/EAP-FAST.


Kliknij, aby zastosować zmiany wprowadzone w oknie dialogowym Zarządzanie profilami.


Kliknij, aby anulować zmiany i zamknąć okno dialogowe Zarządzanie profilami.


Kliknij, aby wyłączyć opcję Konfiguracja zerowa.


Kliknij, aby pozostawić włączoną opcję Konfiguracja zerowa.


Kliknij pole wyboru, aby wyłączyć wyświetlanie tego okna dialogowego w przyszłości.


Podczas procesu instalacji wybrano program ACU. Opcja Konfiguracja zerowa jest także włączona. Wybierz, czy używany ma być program ACU czy opcja Konfiguracja zerowa.


Kliknij, aby wyczyścić i zamknąć okno dialogowe Definiowanie informacji o użytkowniku.


Określ nazwy sieciowe (SSID) dla profilu konfiguracji.


Użyj następujących przycisków radiowych w celu określenia opcji zabezpieczeń.


Użyj przycisku Konfiguruj w celu wprowadzenia informacji dotyczących użytkownika dla określonej opcji zabezpieczeń.


Zaznacz pole wyboru WPA i kliknij przycisk Konfiguruj, aby wprowadzić informacje dotyczące zabezpieczeń sieci bezprzewodowej.


Wybierz z menu rozwijanego żądane zabezpieczenia dynamiczne.


Kliknij przycisk OK, aby włączyć hasło WPA.


Kliknij, aby anulować zmiany i zamknąć okno dialogowe.


Wprowadź hasło dla zabezpieczeń WPA. Hasło nie może składać się z mniej niż ośmiu znaków.


Użyj pola dialogowego w celu wprowadzenia informacji dotyczących trybu zabezpieczeń dynamicznych.


Wprowadź w wyświetlonych polach nazwę użytkownika i hasło dla zabezpieczeń dynamicznych.


Wprowadź w wyświetlonym polu nazwę użytkownika dla zabezpieczeń dynamicznych.


Użyj tego pola w celu wprowadzenia nazwy użytkownika dla zabezpieczeń dynamicznych.


Wprowadź w wyświetlonym polu hasło dla zabezpieczeń dynamicznych.


Użyj tego pola w celu wprowadzenia hasła dla zabezpieczeń dynamicznych.


Wprowadź ponownie w wyświetlonym polu hasło dla zabezpieczeń dynamicznych.


Użyj tego pola w celu ponownego wprowadzenia hasła dla zabezpieczeń dynamicznych.


Wybierz z listy rozwijanej żądany certyfikat.


Określ w danym obszarze urząd certyfikacji.


Kliknij przycisk radiowy, aby skorzystać z dowolnego urzędu certyfikacji.


Kliknij przycisk radiowy w celu określenia urzędu certyfikacji, który ma być używany z menu podręcznego.


Użyj menu podręcznego, aby określić wykorzystywany urząd certyfikacji.


Wprowadź nazwę serwera/domeny dla serwera RADIUS.


Wprowadź nazwę logowania dla serwera RADIUS.


Kliknij, aby zastosować zmiany wprowadzone w oknie Definiowanie certyfikatu.


Kliknij, aby anulować zmiany i zamknąć okno Definiowanie certyfikatu.


Określ w danym obszarze urząd certyfikacji.


Kliknij przycisk radiowy, aby skorzystać z dowolnego urzędu certyfikacji.


Kliknij przycisk radiowy w celu określenia urzędu certyfikacji, który ma być używany z menu podręcznego.


Użyj menu podręcznego, aby określić wykorzystywany urząd certyfikacji.


Wprowadź nazwę serwera/domeny dla serwera zabezpieczeń.


Wprowadź nazwę logowania dla serwera zabezpieczeń.


Kliknij, aby wprowadzić informacje w oknie Definiowanie informacji o użytkowniku dla serwera zabezpieczeń.


Kliknij, aby zastosować zmiany wprowadzone w oknie Definiowanie certyfikatu.


Kliknij, aby anulować zmiany i zamknąć okno Definiowanie certyfikatu.


Użyj okna dialogowego do wprowadzenia hasła WPA.


Użyj pola dialogowego w celu wprowadzenia informacji dotyczących zabezpieczeń dynamicznych TLS.


Kliknij przycisk Importuj, aby zaimportować profil konfiguracji. Przejdź do katalogu, w którym zlokalizowany jest profil, wyróżnij profil, a następnie kliknij przycisk Otwórz, aby go zaimportować.


Kliknij przycisk Eksportuj, aby wyeksportować profil konfiguracji. Przejdź do katalogu, w którym profil ma zostać zapisany, a następnie kliknij przycisk Zapisz, aby go wyeksportować.


Kliknij przycisk Uporządkuj, aby uporządkować profile konfiguracji wyświetlane w oknie Zarządzanie profilami. W oknie Zarządzanie automatycznym wyborem profili kliknij odpowiednio przycisk Przenieś w górę lub Przenieś w dół, a następnie kliknij przycisk OK.


Po włączeniu funkcji automatycznego wyboru profili poprzez zaznaczenie pola Automatyczny wybór profili na karcie Zarządzanie profilami karta sieciowa klienta wykonuje skanowanie w poszukiwaniu dostępnej sieci. Do podłączenia się do sieci wykorzystany zostaje profil o najwyższym priorytecie oraz o takim samym identyfikatorze SSID, jak odnalezionych sieci. Jeśli podłączenie się nie powiedzie, karta sieciowa klienta próbuje podłączyć się do sieci przy użyciu następnego profilu o najwyższym priorytecie i pasującym identyfikatorze SSID, i tak dalej.


Narzędzie rozwiązywania problemów jest opcjonalnym narzędziem służącym do identyfikacji i rozwiązywania problemów związanych z konfiguracją i skojarzeniami karty sieci bezprzewodowej, gdy karta sieciowa jest w trybie z punktem dostępu (infrastruktury). Narzędzie to jest dostępne jedynie w przypadku rozwiązań Mini PCI.


Wskazuje metodę uwierzytelniania za pomocą serwera.


Wskazuje metodę uwierzytelniania za pomocą serwera.


Wskazuje tryb zabezpieczeń wykorzystywany do szyfrowania danych.


Wskazuje typ uwierzytelniania. W trybie Automatyczny karta sieciowa dokonuje uwierzytelniania przy użyciu trybu udostępnionego, ale w przypadku niepowodzenia zostaje przełączona w tryb uwierzytelniania otwartego. Tryb Otwarty umożliwia przeprowadzenie próby uwierzytelniania przez kartę sieciową bez względu na ustawienia klucza WEP. Karta zostanie skojarzona z punktem dostępu tylko, jeśli klucze WEP zarówno karty sieciowej, jak i punktu dostępu pasują do siebie. Tryb Udostępniony umożliwia jedynie skojarzenia z tymi punktami dostępu, które mają taki sam klucz WEP.


Wskazuje, czy włączona jest funkcja MIC. Funkcja MIC zapobiega atakom typu bit-flip na szyfrowane pakiety.


Wyświetla nazwę skojarzonego punktu dostępu.


Wyświetla adres IP skojarzonego punktu dostępu.


Wyświetla adres MAC skojarzonego punktu dostępu.


Wyświetla bieżącą siłę sygnału w dBm lub w procentach.


Wyświetla bieżący poziom szumu (jakość sygnału) w dBm lub w procentach.


Przedstawia, jak długo zasilana była karta sieciowa klienta (w formacie godziny:minuty:sekundy). Jeśli karta działa dłużej niż 24 godziny, czas aktywności wyświetlany jest w formacie dni:godziny:minuty:sekundy.


Wyświetla format preambuły 802.11b. Skonfiguruj format preambuły na karcie Zaawansowane.


Przedstawia bieżącą szybkość odbierania w Mb/s.


Przedstawia bieżącą szybkość wysyłania w Mb/s.


Przedstawia aktualnie podłączony kanał.


Przedstawia częstotliwość wykorzystywaną przez stację.


Wyświetla liczbę wysłanych ramek nie wymagających potwierdzenia.


Wyświetla liczbę wysłanych ramek, które zostały potwierdzone.


Wyświetla liczbę odebranych błędów CRC.


Wyświetla liczbę odebranych niezgodności punktu dostępu.


Wyświetla liczbę odebranych niezgodności szybkości danych.


Wyświetla liczbę wysłanych ramek RTS (Request To Send).


Wyświetla liczbę wysłanych ramek CTS (Clear To Send).


Wyświetla liczbę wysłanych ramek nie będących ramkami CTS (Clear To Send).


Wyświetla liczbę ponownie wysłanych ramek RTS (Request To Send).


Wyświetla liczbę ponownie wysłanych ramek danych.


Wyświetla liczbę odebranych limitów czasu uwierzytelniania.


Wyświetla liczbę odebranych limitów czasu skojarzeń.


Wyświetla liczbę odebranych standardowych uwierzytelnień MIC.


Wyświetla liczbę odebranych standardowych błędów testu MIC.


Wyświetla liczbę odebranych uwierzytelnień CKIP MIC.


Wyświetla liczbę odebranych błędów testu CKIP MIC.


Wyświetla liczbę odebranych ramek CTS.


Wyświetla nazwę komputera klienta.


Wyświetla numer seryjny karty sieci bezprzewodowej.


Wyświetla siłę sygnału.


W danym polu wyświetlane są dostępne profile dla funkcji zarządzania automatycznym wyborem profili.


Kliknij przycisk Dodaj, aby dołączyć profil do automatycznego wyboru profili. Na karcie Zarządzanie profilami kliknij przycisk Uporządkuj profile. Wyświetlone zostanie okno Zarządzanie automatycznym wyborem profili zawierające w polu Dostępne profile listę wszystkich utworzonych profili. Wyróżnij profile, które mają zostać dodane do automatycznego wyboru profili, a następnie kliknij przycisk Dodaj. Profile zostaną wyświetlone w polu Profile wybrane automatycznie.


W tym polu wyświetlone są profile wybrane automatycznie.


Wyróżnij dostępny profil lub profil wybrany automatycznie, a następnie kliknij przycisk Przenieś w górę, aby przenieść wybrany profil na wyższą pozycję na liście.


Wyróżnij dostępny profil lub profil wybrany automatycznie, a następnie kliknij przycisk Przenieś w dół, aby przenieść wybrany profil na niższą pozycję na liście.


Wyróżnij dostępny profil lub profil wybrany automatycznie, a następnie kliknij przycisk Usuń, aby usunąć profil wybrany z listy.


Kliknij przycisk OK, aby zaakceptować zmiany wprowadzone w oknie Zarządzanie automatycznym wyborem profili.


Kliknij przycisk Anuluj, aby anulować zmiany wprowadzone w oknie Zarządzanie automatycznym wyborem profili.


Wybiera wartość poziomu mocy transmisji dla protokołu 802.11a w mW. Bieżąca moc transmisji może być ograniczona przepisami lub ograniczeniami sprzętowymi.


Określa, jaki tryb zostanie użyty przez kartę sieci bezprzewodowej do uwierzytelnienia punktu dostępu: W trybie Automatyczny karta sieciowa dokonuje uwierzytelniania przy użyciu trybu udostępnionego, ale w przypadku niepowodzenia zostaje przełączona w tryb uwierzytelniania otwartego. Tryb Otwarty umożliwia przeprowadzenie próby uwierzytelniania przez kartę sieciową bez względu na ustawienia klucza WEP. Karta zostanie skojarzona z punktem dostępu tylko, jeśli klucze WEP zarówno karty sieciowej, jak i punktu dostępu pasują do siebie. Tryb Udostępniony umożliwia jedynie skojarzenie z tymi punktami dostępu, które mają taki sam klucz WEP.


W przypadku sieci infrastruktury (z punktem dostępu) kliknij przycisk Preferowane punkty dostępu, aby wybrać do czterech punktów dostępu, z którymi karta sieciowa klienta ma podjąć próbę skojarzenia.


Identyfikuje komputer klienta.


Jeśli dla punktu dostępu, z którym skojarzona jest karta sieci bezprzewodowej, dla klucza WEP ustawiona jest wartość Opcjonalny oraz na komputerze klienta uruchomiony jest klucz WEP, upewnij się, czy zaznaczona została znajdująca się na karcie Zabezpieczenia opcja Pozwól na skojarzenie z komórkami mieszanymi umożliwiająca skojarzenie.


Wybierz opcję Użyj tymczasowej nazwy użytkownika i hasła, zaznaczając przycisk radiowy:

Wybierz opcję Użyj nazwy użytkownika systemu Windows, aby jako nazwy użytkownika uwierzytelniania użyć nazwy użytkownika systemu Windows. LUB: Zaznacz opcję Ręcznie monituj o nazwę użytkownika i hasło, aby ręcznie się zalogować i rozpocząć proces uwierzytelniania.


Wybierz opcję Użyj nazwy użytkownika systemu Windows, aby jako nazwy użytkownika uwierzytelniania użyć nazwy użytkownika systemu Windows.


Wybierz opcję Ręcznie monituj o nazwę użytkownika i hasło, aby ręcznie się zalogować i rozpocząć proces uwierzytelniania.


Wybierz w celu określenia nazwy użytkownika, hasła oraz domeny uwierzytelniania, które zostaną zapisane i będą stosowane.


Wybierz w celu określenia nazwy użytkownika uwierzytelniania, która zostanie zapisana i będzie stosowana.


Wybierz w celu określenia hasła uwierzytelniania, które zostanie zapisane i będzie stosowane.


Potwierdź hasło uwierzytelniania, które zostanie zapisane i będzie stosowane.


Wybierz określoną nazwę domeny do zapisania i zastosowania.


Wybierz ustawienie Dołącz domenę logowania systemu Windows z nazwą użytkownika, aby przekazać serwerowi RADIUS domenę logowania systemu Windows oraz nazwę użytkownika. (ustawienie domyślne)


W razie potrzeby wybierz opcję Brak połączenia sieciowego do momentu zalogowania się, aby wymusić usunięcie skojarzenia karty sieci bezprzewodowej po wylogowaniu się.


Wprowadź limit czasu uwierzytelniania (pomiędzy 30 a 500 sekund), aby określić okres oczekiwania, po jakim proces uwierzytelniania stwierdzi niepowodzenie uwierzytelnienia i wyśle komunikat o błędzie. Domyślną wartością jest 90 sekund.


Kliknij przycisk OK, aby zapisać zmiany wprowadzone w oknie ustawień.


Kliknij przycisk Anuluj, aby anulować zmiany wprowadzone w oknie ustawień.


Wybierz z listy rozwijanej odpowiedni urząd certyfikacji sieciowej.


Zaznacz opcję Użyj nazwy użytkownika systemu Windows, aby użyć nazwy użytkownika systemu Windows jako nazwy użytkownika w protokole EAP-GTC.


Wprowadź nazwę użytkownika protokołu PEAP w polu Nazwa użytkownika, aby użyć innej nazwy użytkownika oraz rozpocząć proces uwierzytelniania przy użyciu protokołu EAP-GTC.


Wybiera token jako hasło. Pamiętaj, że podczas uwierzytelniania opcja Token wykorzystuje do wprowadzenia jednorazowego hasła sprzętowe urządzenie tokenu lub program Secure Computing SofToken (wersja 1.3 lub nowsza).


Wybiera hasło statyczne.


Kliknij przycisk Ustawienia, aby określić konkretny serwer lub domenę oraz nazwę logowania. Pozostaw puste pole z nazwą serwera, jeśli klient ma zaakceptować certyfikat z każdego serwera z certyfikatem podpisanym przez urząd znajdujący się na liście rozwijanej Urząd certyfikacji sieciowej. (zalecane). LUB: Wprowadź nazwę domeny serwera, z którego klient zaakceptuje certyfikat.


Edytuj hasło statyczne.


Kliknij przycisk OK, aby zapisać zmiany wprowadzone w oknie konfiguracji protokołu EAP-GTC.


Kliknij przycisk Anuluj, aby anulować zmiany wprowadzone w oknie konfiguracji protokołu EAP-GTC.


W przypadku trybu infrastruktury (z punktem dostępu) wprowadź adres MAC punktu dostępu, aby ustawić ten punkt dostępu jako pierwszy preferowany, z którym klient ma podjąć próbę skojarzenia.


W przypadku trybu infrastruktury (z punktem dostępu) wprowadź adres MAC punktu dostępu, aby ustawić ten punkt dostępu jako drugi preferowany, z którym klient ma podjąć próbę skojarzenia.


W przypadku trybu infrastruktury (z punktem dostępu) wprowadź adres MAC punktu dostępu, aby ustawić ten punkt dostępu jako trzeci preferowany, z którym klient ma podjąć próbę skojarzenia.


W przypadku trybu infrastruktury (z punktem dostępu) wprowadź adres MAC punktu dostępu, aby ustawić ten punkt dostępu jako czwarty preferowany, z którym klient ma podjąć próbę skojarzenia.


Kliknij przycisk OK, aby zapisać zmiany wprowadzone w oknie Preferowane punkty dostępu.


Kliknij przycisk Anuluj, aby anulować zmiany wprowadzone w oknie Preferowane punkty dostępu.


Zaznacz opcję Użyj nazwy użytkownika systemu Windows, aby jako nazwy użytkownika uwierzytelniania użyć nazwy użytkownika systemu Windows.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 64 bity. Dla kluczy 64-bitowych wprowadź 10 cyfr w przypadku zapisu szesnastkowego lub 5 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 64 bity. Dla kluczy 64-bitowych wprowadź 10 cyfr w przypadku zapisu szesnastkowego lub 5 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 64 bity. Dla kluczy 64-bitowych wprowadź 10 cyfr w przypadku zapisu szesnastkowego lub 5 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 64 bity. Dla kluczy 64-bitowych wprowadź 10 cyfr w przypadku zapisu szesnastkowego lub 5 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 128 bity. Dla kluczy 128-bitowych wprowadź 26 cyfr w przypadku zapisu szesnastkowego lub 13 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 128 bity. Dla kluczy 128-bitowych wprowadź 26 cyfr w przypadku zapisu szesnastkowego lub 13 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 128 bity. Dla kluczy 128-bitowych wprowadź 26 cyfr w przypadku zapisu szesnastkowego lub 13 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 128 bity. Dla kluczy 128-bitowych wprowadź 26 cyfr w przypadku zapisu szesnastkowego lub 13 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 152 bity. Dla kluczy 152-bitowych wprowadź 32 cyfr w przypadku zapisu szesnastkowego lub 16 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 152 bity. Dla kluczy 152-bitowych wprowadź 32 cyfr w przypadku zapisu szesnastkowego lub 16 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 152 bity. Dla kluczy 152-bitowych wprowadź 32 cyfr w przypadku zapisu szesnastkowego lub 16 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Użyj przycisku radiowego, aby ustawić długość wstępnie udostępnionego klucza na 152 bity. Dla kluczy 152-bitowych wprowadź 32 cyfr w przypadku zapisu szesnastkowego lub 16 znaków ASCII. Ta długość musi odpowiadać długości klucza punktu dostępu.


Określ nazwę użytkownika protokołu LEAP/EAP-FAST, która zostanie zapisana i będzie stosowana.


Określ hasło protokołu LEAP/EAP-FAST, które zostanie zapisane i będzie stosowane.


Użyj okna Ustawienia nazwy użytkownika i hasła LEAP/EAP-FAST, aby skonfigurować parametry logowania LEAP.


Kliknij przycisk OK, aby zapisać zmiany wprowadzone w oknie ustawień protokołu LEAP/EAP-FAST.


Kliknij przycisk Anuluj, aby anulować zmiany wprowadzone w oknie ustawień protokołu LEAP/EAP-FAST.


Ustaw dla trybu używanego przez kartę sieci bezprzewodowej do uwierzytelnienia punktu dostępu opcję Automatyczny. W trybie Automatyczny karta sieciowa dokonuje uwierzytelniania przy użyciu trybu udostępnionego, ale w przypadku niepowodzenia zostaje przełączona w tryb uwierzytelniania otwartego.


Ustaw dla trybu używanego przez kartę sieci bezprzewodowej do uwierzytelnienia punktu dostępu opcję Otwarty. Tryb Otwarty umożliwia przeprowadzenie próby uwierzytelniania przez kartę sieciową bez względu na ustawienia klucza WEP. Karta zostanie skojarzona z punktem dostępu tylko, jeśli klucze WEP zarówno karty sieciowej, jak i punktu dostępu pasują do siebie.


Ustaw dla trybu używanego przez kartę sieci bezprzewodowej do uwierzytelnienia punktu dostępu opcję Udostępniony. Tryb Udostępniony umożliwia jedynie skojarzenia z tymi punktami dostępu, które mają taki sam klucz WEP.


Umożliwia wybór wartości poziomu mocy transmisji dla standardu 80211b/g w mW. Bieżąca moc transmisji może być ograniczona przepisami lub ograniczeniami sprzętowymi.


Wybiera wartość poziomu mocy transmisji dla protokołu 802.11a w mW. Bieżąca moc transmisji może być ograniczona przepisami lub ograniczeniami sprzętowymi.


Umożliwia wybór poziomu mocy transmisji dla standardu 80211b/g lub 802.11a w mW. Bieżąca moc transmisji może być ograniczona przepisami lub ograniczeniami sprzętowymi.


Wyświetla dostępne poziomy energii 802.11a.


Wyświetla siłę sygnału.


W polu listy Zarządzanie profilami wyświetlane są już utworzone profile. Aktywny profil jest oznaczony przy użyciu ikony.


Umożliwia zastosowanie zabezpieczenia WPA (Wi-Fi Protected Access). Wybierz przycisk radiowy zabezpieczeń, a następnie wybierz z menu rozwijanego typ EAP. Kliknij przycisk Konfiguruj, aby dokonać konfiguracji.


Umożliwia zastosowanie zabezpieczeń przy użyciu hasła WPA (Wi-Fi Protected Access). Wybierz przycisk radiowy zabezpieczeń, a następnie kliknij przycisk Konfiguruj, aby dokonać konfiguracji.


Uruchamia wykorzystanie zabezpieczeń 802.1x. Wybierz przycisk radiowy zabezpieczeń, a następnie wybierz z menu rozwijanego typ EAP. Kliknij przycisk Konfiguruj, aby dokonać konfiguracji.


Umożliwia zastosowanie wstępnie udostępnionych kluczy zdefiniowanych zarówno dla punktu dostępu, jak i stacji. Wybierz przycisk radiowy zabezpieczeń, a następnie kliknij przycisk Konfiguruj, aby dokonać konfiguracji.


Brak zabezpieczeń (nie zalecane).


Wybierz przycisk radiowy odpowiadający typowi zabezpieczeń, który ma zostać użyty, a następnie naciśnij przycisk Konfiguruj, aby ustawić typ zabezpieczeń.


Wybierz z listy rozwijanej typ EAP zabezpieczenia WPA (Wi-Fi Protected Access). Kliknij przycisk Konfiguruj, aby dokonać konfiguracji.


Wybierz z listy rozwijanej typ zabezpieczeń 802.1X EAP. Kliknij przycisk Konfiguruj, aby dokonać konfiguracji.


Pozostaw puste pole z nazwą serwera, jeśli klient ma zaakceptować certyfikat z każdego serwera z certyfikatem podpisanym przez urząd znajdujący się na liście rozwijanej Urząd certyfikacji sieciowej. (zalecane), lub wprowadź nazwę domeny serwera, z którego klient zaakceptuje certyfikat.


Zmień nazwę logowania, jeśli jest to konieczne.


Przycisk Informacje o karcie sieciowej umożliwia dostęp do ogólnych informacji na temat karty interfejsu sieciowego (karty sieci bezprzewodowej) oraz specyfikacji interfejsu sterownika sieciowego (NDIS).


Wyświetla poziomy energii dostępne w protokole 802.11b/g.


Pokazuje kraj, w którym aktualnie działa urządzenie.


Użyj pola wyboru, aby umożliwić pracę karty w trybie Super AG.


Użyj pola wyboru, aby umożliwić pracę karty w trybie eXtended Range (XR).


Użyj pola wyboru, aby umożliwić pracę karty w trybie QoS (WMM).


Użyj pola wyboru, aby jako nazwa użytkownika zabezpieczeń była wykorzystywana nazwa komputera.


Użyj pola wyboru, aby jako nazwa użytkownika zabezpieczeń była wykorzystywana nazwa użytkownika systemu Windows.


Użyj pola wyboru, aby wprowadzić informacje o użytkowniku.


Wprowadź w tym polu nazwę użytkownika, aby użyć innej nazwy użytkownika i rozpocząć proces uwierzytelniania.


Wprowadź w tym polu hasło, aby użyć innego hasła i rozpocząć proces uwierzytelniania.


Wprowadź w tym polu ponownie hasło, aby potwierdzić inne hasło i rozpocząć proces uwierzytelniania.


Kliknij, aby wprowadzić nazwę nowej domeny stanowiącej źródło certyfikatu, który zaakceptuje klient.


Wprowadź nazwę nowej domeny stanowiącej źródło certyfikatu, który zaakceptuje klient.


Wprowadź nazwę logowania do nowej domeny stanowiącej źródło certyfikatu, który zaakceptuje klient.


Kliknij przycisk OK, aby potwierdzić zmianę nazwy domeny i nazwy logowania do domeny.


Kliknij przycisk Anuluj, aby anulować zmianę nazwy domeny i nazwy logowania do domeny.


Kliknij, aby wprowadzić nazwę nowej domeny stanowiącej źródło certyfikatu, który zaakceptuje klient.


Wprowadź w tym polu hasło, aby użyć innego hasła i rozpocząć proces uwierzytelniania.


Wprowadź w tym polu ponownie hasło, aby potwierdzić inne hasło i rozpocząć proces uwierzytelniania.


Użyj pola wyboru, aby zezwolić na stosowanie automatycznych poświadczeń dostępu chronionego.


Wybierz z listy rozwijanej odpowiedni urząd poświadczeń dostępu chronionego.


Kliknij przycisk Wybierz więcej, aby zaimportować więcej chronionych profili poświadczeń dostępu chronionego.


Kliknij przycisk Importuj, aby przejrzeć i zaimportować nowe poświadczenie PAC EAP-FAST.


Zaznacz dowolne poświadczenie PAC EAP-FAST i kliknij przycisk Usuń, aby usunąć profil EAP-FAST.


Lista magazynu poświadczeń PAC zawiera dostępne poświadczenia PAC EAP-FAST. Za pośrednictwem tego okna można importować i usuwać poświadczenia PAC EAP-FAST.


Kliknij przycisk radiowy Publiczne, aby wyświetlić tylko publiczne poświadczenia PAC EAP-FAST.


Kliknij przycisk radiowy Prywatne, aby wyświetlić tylko prywatne poświadczenia PAC EAP-FAST.


Kliknij przycisk OK, aby zaakceptować wszystkie zmiany dokonane w tym oknie.


Kliknij przycisk Anuluj, aby zamknąć okno bez akceptowania jakichkolwiek zmian.


Wybierz opcję, aby system automatycznie monitował o podanie nazwy użytkownika i hasła.


Użyj pola wyboru, aby ustawić dany profil jako profil systemowy. Profil systemowy jest dostępny dla wszystkich użytkowników.. Może również zostać wykorzystany jako szablon do tworzenia innych profili.


Uzyj nazwy uzytkownika i hasla do uwierzytelniania.


Wybierz certyfikat dla potrzeb uwierzytelniania.


Uzyj certyfikatu do uwierzytelniania.


Wlacz mozliwosc uzycia przez karte sieci bezprzewodowej pasma bezpieczenstwa publicznego (Public Safety Band) 4,9 GHz.


Informacje, które mozna dodac do listy skanowania.


Informacje wyswietlane na liscie skanowania.


Wyswietl te informacje na liscie skanowania.


Usun te informacje z listy skanowania.


Przenies wybrana kolumne w góre na liscie skanowania.


Przenies wybrana kolumne w dól na liscie skanowania.


Automatycznie wznów zawieszona sesje [tylko w przypadku chwilowej utraty polaczenia, a nie uzycia funkcji zawies/wznów].


Czas, po uplywie którego proces logowania systemu Windows wlacza zasady grupy.


Automatycznie wznów zawieszona sesje [tylko w przypadku chwilowej utraty polaczenia, a nie uzycia funkcji zawies/wznów].


Jesli pole wyboru jest zaznaczone, nie mozna zmieniac ustawien w tym profilu. Skontaktuj sie z administratorem systemu.


Uzyj funkcji Atheros Super A/G, która wykorzystuje rózne metody w celu zwiekszenia przepustowosci polaczenia bezprzewodowego.


Wybierz jeden lub kilka urzedów poswiadczen dostepu chronionego (PAC).


Zaznacz te opcje, aby automatycznie wybierac poswiadczenia PAC nalezace do tej samej grupy.


Zezwalaj na stosowanie automatycznych poswiadczen dostepu chronionego (PAC).


Wybierz z listy rozwijanej typ zabezpieczen 802.1X EAP do dostarczania poswiadczen PAC. Kliknij przycisk Konfiguruj, aby dokonac konfiguracji.


Zaznacz te opcje, aby stosowac takie samo uwierzytelnianie EAP-FAST podczas automatycznego dostarczania poswiadczen PAC.


Zaznacz te opcje, aby przy logowaniu sie do domeny uzywac poswiadczen PAC komputera.


Wymuszaj usuniecie skojarzenia karty sieci bezprzewodowej po wylogowaniu.


Automatycznie wznów zawieszona sesje (tylko w przypadku chwilowej utraty polaczenia, a nie uzycia funkcji zawies/wznów).


Zaznacz te opcje, aby uwierzytelniac serwer.


Okresl urzad certyfikacji, który ma byc uzywany.


Aby zalogowac sie, uzyj tymczasowej nazwy uzytkownika i hasla. Moze zostac wyswietlony monit o podanie nazwy uzytkownika i hasla w systemie Windows.


Jako nazwy uzytkownika przy uwierzytelnianiu uzyj nazwy uzytkownika systemu Windows na tym komputerze.


System automatycznie monituje o podanie nazwy uzytkownika i hasla.


Zaloguj sie i uruchom recznie proces uwierzytelniania.


Podaj nazwe uzytkownika, haslo oraz domene uwierzytelniania do zapisania i stosowania.


Wprowadz nazwe uzytkownika dla zabezpieczen dynamicznych.


Wprowadz haslo dla zabezpieczen dynamicznych.


Wprowadz ponownie haslo.


Wprowadz nazwe domeny.


Przekaz do serwera RADIUS domene logowania systemu Windows oraz nazwe uzytkownika. (ustawienie domyslne)


Zaznacz te opcje, aby uwierzytelniac serwer.


Zaznacz te opcje, aby uwierzytelniac serwer.


Kliknij ten przycisk, aby skonfigurowac wybrana metode uwierzytelniania EAP-FAST


Kliknij ten przycisk, aby skonfigurowac wybrana metode uwierzytelniania dostarczania poswiadczen PAC


Kliknij ten przycisk, aby zarzadzac poswiadczeniami PAC i organizowac je


Kliknij ten przycisk, aby okreslic serwer lub domene i nazwe logowania.


Kliknij ten przycisk, aby zamknac okno dialogowe po zapisaniu ustawien nazwy uzytkownika i hasla.


Kliknij ten przycisk, aby zamknac okno dialogowe bez zapisywania ustawien nazwy uzytkownika i hasla.


Kliknij ten przycisk, aby zamknac okno dialogowe po zapisaniu ustawien protokolu EAP-FAST.


Kliknij ten przycisk, aby zamknac okno dialogowe bez zapisywania ustawien protokolu EAP-FAST.


Wprowadz informacje dotyczace poswiadczen dostepu chronionego.


Wprowadz informacje dotyczace nazwy uzytkownika i hasla.


Kliknij ten przycisk, aby utworzyc nowa grupe.


Kliknij ten przycisk, aby zamknac okno.


Zarzadzaj poswiadczeniami PAC i organizuje je przy uzyciu menu podrecznego lub ponizszych przycisków polecen.


Wprowadz nazwe pliku poswiadczen PAC wraz ze sciezka.


Kliknij przycisk, aby przejsc do katalogu z zadanym plikiem poswiadczen PAC. Kliknij przycisk Importuj, aby importowac wybrany plik.


Wybierz te opcje, aby importowac poswiadczenia PAC do magazynu prywatnego


Wybierz tę opcję, aby importować poświadczenia PAC do magazynu globalnego.


Kliknij ten przycisk, aby rozpocząć importowanie wybranego poświadczenia PAC.


Kliknij ten przycisk, aby zamknąć okno dialogowe.


Wyświetla nazwę urzędu poświadczeń PAC


Wyświetla identyfikator urzędu poświadczeń PAC


Wyświetla nazwę poświadczenia PAC


Wyświetla typ poświadczenia PAC. Może to być poświadczenie PAC tunelu, poświadczenie PAC komputera lub poświadczenie PAC użytkownika


Wyświetla datę wygaśnięcia poświadczenia PAC


Kliknij ten przycisk, aby zamknąć okno dialogowe.


Wyświetla typ magazynu poświadczenia PAC. Może to być świeże poświadczenie PAC, prywatne poświadczenie PAC lub publiczne poświadczenie PAC


Po zalogowaniu użytkownika zawsze uwierzytelniaj ponownie przy użyciu certyfikatu użytkownika.


Wyświetla pasma łączności bezprzewodowej obsługiwane przez kartę.


Pozwala na modyfikację danych wybranego profilu konfiguracji.


Naciśnij, aby usunąć wybrany profil konfiguracji.


Umożliwia ograniczenie czasu poszukiwania kontrolera domeny i wprowadzenie czasu w sekundach do odpowiedniego pola kombi.


Wprowadź czas w sekundach (do 300), po których powinien upłynąć limit czasu uwierzytelniania przy próbie znalezienia kontrolera domeny.


Zezwalaj na użycie przez kartę sieci bezprzewodowej trybu bezprzewodowego 5 GHz i 300 Mb/s.


Zezwalaj na użycie przez kartę sieci bezprzewodowej trybu bezprzewodowego 2 GHz i 300 Mb/s.


Automatycznie wyłącza interfejs WLAN, gdy jest podłączona sieć LAN oraz włącza interfejs WLAN, gdy sieć LAN jest odłączona.


Jeśli to pole wyboru jest zaznaczone, nie można zmienić poziomu mocy transmisji. Skontaktuj się z administratorem systemu.


Te przyciski radiowe umożliwiają wybranie programu narzędziowego sterującego pracą sieci bezprzewodowej.


Wybierz tę opcję, aby pracą sieci bezprzewodowej sterował system Windows.


Wybierz tę opcję, aby pracą sieci bezprzewodowej sterował program ACU.


Wybierz tę opcję, aby pracą sieci bezprzewodowej sterował program innej firmy.


Wybierz poziom roamingu, aby określić jego agresywność.


Wyświetla dodatkowy kanał używany w trybie 40 MHz.


Wyświetla dodatkową częstotliwość używaną w trybie 40 MHz.


Wyświetla stan oszczędzania energii MIMO 802.11n.


Wyświetla bieżącą szerokość kanału.


Podczas uruchamiania sieci ad hoc określa tryb bezprzewodowy o parametrach 5 GHz i 300 Mb/s.


Podczas uruchamiania sieci ad hoc określa tryb bezprzewodowy o parametrach 2,4 GHz i 300 Mb/s.


Aby uruchomić tryb kanału diagnostycznego, wybierz profil z listy.


Pokazuje status i postęp uruchomionych testów.


Uruchamia tryb kanału diagnostycznego. Zatrzymuje tryb kanału diagnostycznego, jeśli został uruchomiony.


Zapisz status i postęp. Przejdź do odpowiedniego katalogu, aby zapisać status w pliku.


Zatrzymuje tryb kanału diagnostycznego (jeśli jest uruchomiony) i zamyka okno.


Wybierz kartę SIM (ang. subscriber identity module — moduł tożsamości użytkownika), która ma zostać użyta.


Wprowadź kod PIN używany w celu uzyskania dostępu do karty SIM.


Ponownie wprowadź kod PIN używany w celu uzyskania dostępu do karty SIM.


Wybierz z listy rozwijanej typ zabezpieczeń WPA/WPA2 EAP. Kliknij przycisk Konfiguruj, aby dokonać konfiguracji.


Odśwież listę kart SIM wprowadzonych do systemu.


Wybierz tę opcję, aby użyć numeru IMSI karty SIM jako nazwy logowania.