Copyright: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved
Citation: Copyright © 2003, Atheros Communications, Inc. All Rights Reserved


Mevcut kablosuz bağlantısı frekansını ve maksimum hızı görüntüler.


Seçilmiş olan yapılandırma profili adını görüntüler.


İstasyonun kablosuz ağa bağlı olup olmadığını görüntüler.


Mevcut sürücü bağlantısı için iletim hızını görüntüler.


Mevcut sürücü bağlantısı için alım hızını görüntüler.


Ağın çalışma modunu görüntüler. Mod Altyapı ise, bir erişim noktasına bağlanıyordur. Mod ad hoc ise, başka bir istemci bilgisayara bağlanıyordur.


Sürücünün kullandığı güvenlik modunu görüntüler (WEP, AES, CKIP veya hiçbiri).


TCP/IP iletişim kuralının bu kablosuz kart için kullandığı Internet İletişim Kuralı adresini görüntüler.


Yapılandırılmış profillerin listesini görüntüler. Başka bir profile geçmek için Profil listesinde adı, sonra da Etkinleştir'i tıklayın.


Seçilen yapılandırma profiliyle ilgili ayrıntıları görüntüler.


Seçilen yapılandırma profili için birinci ağ adını (SSID1) görüntüler.


Seçilen yapılandırma profili için ikinci ağ adını (SSID2) görüntüler.


Seçilen yapılandırma profili için üçüncü ağ adını (SSID3) görüntüler.


Seçilen yapılandırma profili için ağ bağlantısı türünü görüntüler.


Seçilen yapılandırma profili için kablosuz kartı adresini görüntüler.


Seçilen yapılandırma profilinde güvenlik modunun ayarlı olduğunu görüntüler.


Seçilen yapılandırma profili için varsayılan anahtarı görüntüler.


Seçilen yapılandırma profili için mevcut güç tasarrufu modunu görüntüler.


Yeni bir yapılandırma profili oluşturun ve bu profilin genel, güvenlik ve gelişmiş bilgilerini ekleyin.


Seçilmiş olan yapılandırma profiliyle ilgili bilgiler.


Seçilmiş olan yapılandırma profilini silin.


Değişikleri seçilmiş olan yapılandırma profiline uygulayın.


Kablosuz kartının adını görüntüler. Bu, işletim sistemi tarafından kablosuz kartına atanan addır.


Kablosuz kartının MAC adresini görüntüler.


Kablosuz kartının sürücü adını ve yolunu görüntüler.


Kablosuz kartı sürücüsünün sürümünü görüntüler.


Kablosuz kartı sürücüsünün oluşturulma tarihini görüntüler.


Seçilen kablosuz yerel ağ için ağ adını (SSID) görüntüler.


Kablosuz kartının bağlı olduğu AP'nin MAC adresini (BSSID) görüntüler.


Kablosuz kartının çalışma durumunu görüntüler.


İstasyon için kullanılan kanalı ve frekansı görüntüler.


Kullanılabilir erişim noktalarını ve ad hoc ağları görüntüler; ağ adları, güvenlik, sinyal gücü, kablosuz modu, kanal numarası ve frekans bilgilerini gösterir. Ağa bağlanmak için (önceden oluşturulmuş bir yapılandırma profili varsa) veya ağ adı için bir yapılandırma profili oluşturmak için kullanılabilir ağı çift tıklayın.


İletilen çoklu gönderim, yayın, tekli gönderim çerçevelerinin sayısı ve iletilen toplam bayt sayısıyla ilgili ölçümleri verir.


İletilen çoklu gönderim çerçevelerinin sayısını görüntüler. Çoklu gönderim çerçevesi birden çok alıcıya gönderilir.


İletilen yayın çerçevelerinin sayısını görüntüler. Yayın çerçevesi ağ üzerindeki tüm ana bilgisayarlara gönderilir.


İletilen tekli gönderim çerçevelerinin sayısını görüntüler. Tekli gönderim çerçevesi tek bir alıcıya gönderilen çerçevedir.


Tüm çerçevelerdeki iletilen toplam bayt sayısını görüntüler.


Alınan çoklu gönderim, yayın, tekli gönderim çerçevelerinin sayısı ve alınan toplam bayt sayısıyla ilgili ölçümleri verir.


Alınan çoklu gönderim çerçevelerinin sayısını görüntüler. Çoklu gönderim çerçevesi birden çok alıcıya gönderilir.


Alınan yayın çerçevelerinin sayısını görüntüler. Yayın çerçevesi ağ üzerindeki tüm ana bilgisayarlara gönderilir.


Alınan tekli gönderim çerçevelerinin sayısını görüntüler. Tekli gönderim çerçevesi tek bir alıcıya gönderilen çerçevedir.


Tüm çerçevelerdeki alınan toplam bayt sayısını görüntüler.


Kablosuz kartı için  çalışma süresini görüntüler.


Tüm istatistikleri sıfırlayın.


Gelişmiş istatistikleri görüntüleyin.


Sürücü bilgilerini görüntüleyin.


Radyo işlevini etkinleştirin veya devreden çıkarın.


Bilgisayarın sistem tepsisindeki tepsi simgesini gösterin veya gizleyin. Tepsi simgesi renk koduyla sinyal gücünü gösterir. Ayrıca çalışma frekansını ve bağlantınızla ilgili diğer bilgileri gösterir.


Yerinde İnceleme uygulamasına erişin. Bu uygulama bir erişim noktasına olan bağlantınızın sinyal gücünü ve kalitesini grafikle görüntüler. Ağın etrafında gezinerek bu bilgileri ilave erişim noktası gereksinimlerinizi belirlemekte kullanabilirsiniz.


Bu yapılandırma profilinin adını belirleyin.


Bu yapılandırma profili için ağ adlarını (SSID) belirleyin. Herhangi bir AP'ye bağlantı için tüm SSID'leri boş bırakın.


Bu yapılandırma profili için birinci SSID'yi belirleyin. Herhangi bir AP'ye bağlantı için tüm SSID'leri boş bırakın.


Bu yapılandırma profili için ikinci SSID'yi belirleyin. Herhangi bir AP'ye bağlantı için tüm SSID'leri boş bırakın.


Bu yapılandırma profili için üçüncü SSID'yi belirleyin. Herhangi bir AP'ye bağlantı için tüm SSID'leri boş bırakın.


Bu yapılandırma profili için ağ türünü belirleyin.


Bu yapılandırma profili için güç tasarrufu modunu belirleyin.


Şifreleme türünü seçin.


Şifrelemeyi kapatın.


Dinamik güvenliği etkinleştirmek için Dinamik Güvenlik'i tıklayın, açılır menüden istediğiniz güvenliği seçin ve Yapılandır'ı tıklayarak kullanıcı tarafından tanımlanan bilgileri girin.


Önceden paylaşılan anahtarları belirleyin.


Anahtar girişi yöntemini görüntüler.


Anahtarı girmek için onaltılık karakterleri (0-9, A-F) kullanın.


Anahtarı girmek için ASCII metin karakterlerini (boşluk hariç tüm klavye karakterleri) kullanın.


Bunu varsayılan şifreleme anahtarı yapın.


Bunu varsayılan şifreleme anahtarı yapın.


Bunu varsayılan şifreleme anahtarı yapın.


Bunu varsayılan şifreleme anahtarı yapın.


Bunu varsayılan şifreleme anahtarı yapın.


Kullanıcı şifreleme anahtarı için değeri girin.


Birinci şifreleme anahtarı için değeri girin.


İkinci şifreleme anahtarı için değeri girin.


Üçüncü şifreleme anahtarı için değeri girin.


Dördüncü şifreleme anahtarı için değeri girin.


Kullanıcı şifreleme anahtarının uzunluğunu açılır menüden seçin.


Birinci şifreleme anahtarının uzunluğunu açılır menüden seçin.


İkinci şifreleme anahtarının uzunluğunu açılır menüden seçin.


Üçüncü şifreleme anahtarının uzunluğunu açılır menüden seçin.


Dördüncü şifreleme anahtarının uzunluğunu açılır menüden seçin.


Hafif Genişletilebilir Kimlik Denetimi İletişim Kuralı'nı (LEAP) etkinleştirin.


LEAP/EAP-FAST kullanıcı adı ve parolasını belirleyin. Ad en fazla 64 karakter uzunluğunda olabilir.


LEAP/EAP-FAST parolasını belirler. Parola en fazla 64 karakter uzunluğunda olabilir.


Kablosuz MAC adresini girin. Bu adres kablosuz kartının global MAC adresini geçersiz kılar.


Kablosuz kartının adresini onaltılık olarak girin.


Erişim noktalarının ve ad hoc ağların konumunu belirlemekte kullanılan kablosuz kartının tarama yöntemini seçmenize izin verir.


Erişim noktalarını pasif tarayın. Pasif tarama kablosuz kartının salt dinleme modunda olduğunu gösterir.


Erişim noktalarını otomatik tarayın. Sürücü kullanılacak tarama türünü (aktif veya pasif) belirlemek için ülke kodunu kullanır.


İletim gücünün düzeyini açılır menüyü kullanarak belirleyin. Yasal etki alanı veya donanım kısıtlamaları nedeniyle gerçek iletim gücü sınırlanabilir.


Kablosuz kartı için kablosuz modunu seçin.


Geçerli adla bir ad hoc ağ bulunamadığında, ad hoc ağın başlayacağı kablosuz modunu seçin.


Kablosuz kartının 5 GHz ve 54 Mbps kablosuz modunu kullanmasına izin verin.


Kablosuz kartının 5 GHz kablosuz modunu kullanmasına izin verin.


Kablosuz kartının 2,4 GHz ve 11 Mbps kablosuz modunu kullanmasına izin verin.


Ad hoc ağ başlatırken kablosuz modunu 5 GHz ve 54 Mbps olarak belirleyin.


Ad hoc ağ başlatırken kablosuz modunu 5 GHz olarak belirleyin.


Ad hoc ağ başlatırken kablosuz modunu 2,4 GHz ve 11 Mbps olarak belirleyin.


İletim gücü düzeyini milivat (mW) cinsinden görüntüler.


İstasyonun bağlı olduğu veya bağlanmaya çalıştığı ağın adını (SSID) görüntüler.


Bu yapılandırma profilinin Hizmet Kalitesi ağına katılım için etkin olup olmadığını görüntüler.


Mevcut bağlantının gürültü düzeyini dBm cinsinden görüntüler.


Bu yapılandırma profili için güç tasarrufu modunun durumunu görüntüler.


Mevcut bağlantı için frekansı görüntüler.


İletişim kutusunu kapatın.


İletim istatistiklerini verir.


Kablosuz kartı tarafından iletilen bikın sayısını görüntüler.


Kablosuz kartı tarafından doğru iletilen çerçevelerin sayısını görüntüler.


İstasyon tarafından alınan çerçeveler başarısız olduğu için yeniden denenen çerçevelerin sayısını görüntüler.


Alıcı istasyon tarafından hiçbir şekilde başarılı olarak alınmadığı için düşürülen çerçevelerin sayısını gösterir.


Kablosuz kartı tarafından iletilen gönderme isteği (RTS) çerçevelerinin sayısını görüntüler.


Alım istatistiklerini verir.


Kablosuz kartı tarafından alınan bikın sayısını görüntüler.


Kablosuz kartı tarafından doğru alınan çerçevelerin sayısını görüntüler.


Kablosuz kartı tarafından hatalı alınan çerçevelerin sayısını görüntüler.


Kablosuz kartı tarafından alınan ancak şifresi çözülemeyen çerçevelerin sayısını görüntüler.


Aynı çerçeve zaten alınmış olduğu için kablosuz kartı tarafından reddedilen çerçevelerin sayısını belirtir.


Kablosuz kartı tarafından alınan gönderme onaylı (CTS) çerçevelerinin sayısını belirtir.


Kablosuz kartı tarafından alınan başarısız AP kimlik denetimlerinin sayısını görüntüler.


Kablosuz kartı tarafından alınan AP ilişkilendirme retlerin sayısını görüntüler.


iletişim kutusunu kapatın.


tüm istatistikleri sıfırlayın.


Kablosuz kartının çalıştığı ülkeyi seçin.


Dünya genelinde dolaşım özelliğinin ilgili yasal etki alanı içindeki kullanılabilir tüm kanalları pasif taramasını etkinleştirin.


Ülke kodu değişikliklerini etkinleştirin.


Ülke Kodu seçicisini sonlandırın ve kapatın.


Sinyal gücünü yüzde olarak veya dBm cinsinden görüntüler.


Sinyal gücünü yüzde olarak gösterin.


Sinyal gücünü desibel cinsinden gösterin.


İstatistik verilerini Yenileme Aralığı (Bağıl) veya toplam çalışma süresi (Kümülatif) tabanlı görüntüler.


İstatistikleri Yenileme Aralığı tabanlı toplayın.


İstatistikleri toplayın.


Bağıl istatistikleri toplamak için aralığı saniye cinsinden görüntüler.


Ekran ayarları iletişim kutusunda yapılan değişiklikleri etkinleştirin.


Ekran Ayarları iletişim kutusunu sonlandırın ve kapatın.


Bir yapılandırma profili için ağ adlarını ve yapılandırma adını yapılandırmak için Genel sekmesini kullanın.


Radyoyu etkinleştirmek veya devreden çıkarmak, Ülke Kodu Seçicisi'ni açmak ve/veya tepsi simgesini etkinleştirmek/devreden çıkarmak için araçlar düğmelerini kullanın.


Yeni bir yapılandırma eklemek, bir yapılandırmayı değiştirmek, bir yapılandırmayı kaldırmak veya farklı bir yapılandırma profiline değiştirmek için Profil Yönetimi sekmesini kullanın.


Tanı sekmesi sürücü istatistiklerini görüntüler.


802.11b ve 802.11g ağları için Sadece Uzun veya Uzun ve Kısa başlangıç modunu seçin. Sadece Uzun modu eski kablosuz kartlarıyla geriye dönük uyumluluk için kullanılır.


Statik güvenlik şifreleme anahtarları eklemek için bu sayfayı kullanın.


Kullanılabilir erişim noktaları ve ad hoc ağlar için tarayın ve listeyi yenileyin.


Yapılandırma profili için gelişmiş yapılandırmaları ayarlamak için Gelişmiş sekmesini kullanın.


Bir iletişim kutusu açın ve önceden paylaşılan anahtarları girin.


Şifreleme türünü ayarlamak ve dinamik güvenliği yapılandırmak için Güvenlik sekmesini kullanın.


Kablosuz kartının Kısa ve Uzun başlangıç modları arasında seçim yapabilmesini etkinleştirin.


Başlangıç modunu Salt Uzun yapın. Bu mod eski kablosuz kartlarıyla geriye dönük uyumluluk için kullanılır.


Varsayılan anahtarı seçin, sonra da anahtar alanını doldurun ve açılır menüden bir uzunluk seçin.


Sürücüyle ilgili mevcut bilgileri görüntüler.


Mevcut bağlantı bilgilerini ve kullanılabilir erişim noktaları ve ad hoc ağların listesini görüntülemek için kablosuz yerel ağ durumu sekmesini kullanın. Bu listeden yeni bir bağlantıya geçin.


Kablosuz kartı için gelişmiş iletim ve alım istatistiklerini görüntüler.


Bağlantıyla ilgili gelişmiş bilgilerini görüntüler.


Bağlantıyla ilgili gelişmiş bilgileri görüntüleyin.


Kablosuz kartının ayarlandığı ülkeyi değiştirmek için Ülke Kodu Seçicisi'ni kullanın.


Mevcut Durum sekmesi bağlantıyla ilgili bilgileri görüntüler.


Hakkında Kutusu bu uygulamanın hazırlanma tarihini ve sürüm numarasını görüntüler.


Ayarlar Kutusu ekranla ve kümülatif veya aralık modunda bilgi toplama aralığıyla ilgili değişiklikler yapmanıza izin verir. Aralık modu her öçlüm aralığının başında istatistikleri sıfırlar. Bilgi toplama aralığı saniye cinsinden gösterilir. Yeni bir değer girerek veya sağdaki yukarı/aşağı okları kullanarak aralığı değiştirin. Aralığın kısaltılması kullanılan işlemci süresini arttırır. Bağıl sinyal gücünü desibel (dB) cinsinden veya yüzde olarak görüntüler.


Vurgulu AP'ye veya ad hoc ağa geçin. Ayrıca bunun yerine SSID'yi çift tıklayabilirsiniz. Bu SSID için bir profil yoksa, seçilen SSID doldurulmuş halde yeni bir profil açılır. Profili etkinleştirmek için profil ayarlarını tamamlayın ve Tamam'a basın.


Seçilen profile geçmek için Etkinleştir düğmesine basın. Ayrıca bunun yerine profil adını çift tıklayabilirsiniz.


Seçilmiş olan kanalı görüntüler.


Kablosuz kartının 2,4 GHz ve 54 Mbps kablosuz modunu kullanmasına izin verin.


Ad hoc ağ başlatırken kablosuz modunu 2,4 GHz ve 54 Mbps olarak belirleyin.


Ad hoc ağın başlatılacağı kanalı seçin.


LEAP/EAP-FAST parolasını girin.


Girilen LEAP/EAP-FAST parolasını onaylayın.


LEAP/EAP-FAST girişlerini etkinleştirin.


Kullanıcı Bilgilerini Tanımla iletişim kutusunu temizleyin ve kapatın.


Kullanılabilir erişim noktaları ve ad hoc ağların listesini görüntüleyin.


LEAP/EAP-FAST kullanıcı adını girin.


Profil Yönetimi iletişim kutusunda yapılan değişiklikleri etkinleştirin.


Değişiklikleri iptal edin ve Profil Yönetimi iletişim kutusunu kapatın.


Sıfır Yapılandırma'yı devre dışı bırakın


Sıfır Yapılandırma'yı etkin bırakın.


Bu iletişim kutusunu bir daha gösterme.


Kurulum sırasında ACU seçilmişti. Sıfır Yapılandırma da etkinleştirildi. ACU ve Sıfır Yapılandırma'dan hangisi kullanacağınızı seçin.


Kullanıcı Bilgilerini Tanımla iletişim kutusunu temizleyin ve kapatın.


Bu yapılandırma profili için ağ adlarını (SSID) belirleyin.


Güvenlik seçeneklerini belirlemek için aşağıdaki radyo düğmeleri kullanın.


Belirlenen güvenlik seçeneğiyle ilgili kullanıcı bilgilerini girmek için Yapılandır düğmesini kullanın.


Kablosuz Korumalı Erişim bilgilerini girmek için WPA onay kutusunu etkinleştirin ve Yapılandır'ı tıklayın.


İstediğiniz dinamik güvenliği açılır menüden belirleyin.


WPA anahtar parolasını etkinleştirin.


 Değişiklikleri iptal edin ve iletişim kutusunu kapatın.


WPA güvenliği için parolayı girin. Minimum parola uzunluğu sekiz karakterdir.


Dinamik güvenlik moduyla ilgili bilgileri girmek için bu iletişimi kutusunu kullanın.


Dinamik güvenlik için kullanıcı adı ve parolayı ilgili veri girişi alanlarına girin.


Dinamik güvenlik için kullanıcı adını ilgili veri girişi alanına girin.


Dinamik güvenlik için kullanıcı adını girin.


Dinamik güvenlik için parolayı ilgili veri girişi alanına girin.


Dinamik güvenlik için parolayı girin.


Dinamik güvenlik için parolayı ilgili veri girişi alanına yeniden girin.


Dinamik güvenlik için parolayı yeniden girin.


İstediğiniz dinamik sertifikayı açılır menüden seçin.


Kullanılacak sertifika yetkilisini bu alandan belirleyin.


Herhangi bir sertifika yetkilisi kullanın.


Kullanılacak sertifika yetkilisini açılır menüden belirleyin.


Kullanılacak sertifika yetkilisini belirleyin.


RADIUS sunucusu için sunucu/etki alanı adını girin.


RADIUS sunucusu için oturum açma adını girin.


Sertifika Tanımla iletişim kutusunda yapılan değişiklikleri uygulayın.


Değişiklikleri iptal edin ve Sertifika Tanımla iletişim kutusunu kapatın.


Kullanılacak sertifika yetkilisini bu alandan belirleyin.


Herhangi bir sertifika yetkilisi kullanın.


Kullanılacak sertifika yetkilisini açılır menüden belirleyin.


Kullanılacak sertifika yetkilisini belirleyin.


Güvenlik sunucusu için sunucu/etki alanı adını girin.


Güvenlik sunucusu için oturum açma adını girin.


Güvenlik sunucusu için bilgileri Kullanıcı Bilgilerini Tanımla iletişim kutusuna girin.


Sertifika Tanımla iletişim kutusunda yapılan değişiklikleri uygulayın.


Değişiklikleri iptal edin ve Sertifika Tanımla iletişim kutusunu kapatın.


WPA anahtar parolasını girmek için bu iletişim kutusunu kullanın.


TLS dinamik güvenliğiyle ilgili bilgileri girmek için bu iletişimi kutusunu kullanın.


Yapılandırma profilini içe aktarın. Profili içe aktarmak için profilin bulunduğu dizine gidin, profili vurgulayın, sonra da Aç'ı tıklayın.


Yapılandırma profilini dışa aktarın. Profili dışa aktarmak için profilin kaydedileceği dizine gidin, sonra da Kaydet'i tıklayın.


Yapılandırma profillerinin Profil Yönetimi penceresinde belireceği sırayı ayarlayın. Otomatik Profil Seçimi Yönetimi penceresinde, Yukarı Taşı veya Aşağı Taşı'yı tıklayın, sonra da Tamam'ı tıklayın.


Otomatik profil seçimi etkinleştirildiğinde, ağa bağlanmak için en yüksek önceliğe ve bulunan ağların biriyle aynı SSID'ye sahip olan profil kullanılır. Bağlantı başarısız olursa, istemci bağdaştırıcısı SSID ile eşleşen sonraki en yüksek önceliğe sahip profili dener ve işlem bu şekilde devam eder.


Sorun Giderme Yardımcı Programı, bağdaştırıcı erişim noktası (altyapı) modundayken kablosuz bağdaştırıcı yapılandırması ve ilişkilendirme sorunlarını tanımlayan ve çözen, isteğe bağlı bir yardımcı programdır. Bu yardımcı program sadece Mini PCI çözümlerinde kullanılabilir.


Sunucu tabanlı kimlik denetimi yöntemini belirtir.


Sunucu tabanlı kimlik denetimi yöntemini belirtir.


Veri şifreleme için kullanılan güvenlik modunu belirtir.


Kimlik denetimi türünü belirtir. Otomatik modunda, bağdaştırıcı kimlik denetimini Paylaşılan modunu kullanarak yapmayı dener ancak bu başarısız olursa açık kimlik denetimine geçer. Açık modunda, bağdaştırıcı kimlik denetimini WEP ayarlarından bağımsız dener. (Sadece bağdaştırıcı ve erişim noktasındaki WEP anahtarları eşleştiği takdirde erişim noktasıyla ilişkilenir.) Paylaşılan modu bağdaştırıcının sadece aynı WEP anahtarına sahip erişim noktalarıyla ilişkilenmesine izin verir.


MIC'in etkin olup olmadığını belirtir. MIC şifrelenen veri paketlerine yönelik bit çevirme saldırılarını engeller.


İlişkili erişim noktasının adını görüntüler.


İlişkili erişim noktasının IP adresini görüntüler.


İlişkili erişim noktasının MAC adresini görüntüler.


Mevcut sinyal gücünü dBm cinsinden veya yüzde olarak görüntüler.


Mevcut gürültü düzeyini (sinyal kalitesini) dBm cinsinden veya yüzde olarak görüntüler.


İstemci bağdaştırıcısının ne süredir güç aldığını gösterir (saat:dakika:saniye biçiminde). Bağdaştırıcı 24 saatten uzun süredir çalışıyorsa, bu süre ekranda gün:saat:dakika:saniye biçiminde görüntülenir.


802.11b başlangıç biçimini görüntüler. Başlangıç biçimini Gelişmiş sekmesinde yapılandırın.


Mevcut alma hızını Mbps cinsinden gösterir.


Mevcut iletim hızını Mbps cinsinden gösterir.


Bağlanılmış olan kanalı gösterir.


İstasyonun kullandığı frekansı görüntüler.


İletilmiş bildirim gerektirmeyen çerçevelerinin sayısını görüntüler.


İletilmiş bildirim alınan çerçevelerinin sayısını görüntüler.


Alınan döngüsel artıklık denetimi hatalarının sayısını görüntüler.


Alınan erişim noktası hatalı eşleşmelerinin sayısını görüntüler.


Alınan veri hızı hatalı eşleşmelerinin sayısını görüntüler.


İletilen gönderme isteği çerçevelerinin sayısını görüntüler.


İletilen gönderme onaylı çerçevelerin sayısını görüntüler.


İletilen gönderme onaysız çerçevelerin sayısını görüntüler.


İletilen yeniden denenmiş gönderme isteği çerçevelerinin sayısını görüntüler.


İletilen yeniden denenmiş veri çerçevelerinin sayısını görüntüler.


Alınan kimlik denetimi zaman aşımlarının sayısını görüntüler.


Alınan ilişkilendirme zaman aşımlarının sayısını görüntüler.


Alınan standart MIC kimlik denetimlerinin sayısını görüntüler.


Alınan standart MIC hatalarının sayısını görüntüler.


Alınan CKIP MIC kimlik denetimlerinin sayısını görüntüler.


Alınan CKIP MIC hatalarının sayısını görüntüler.


Alınan CTS çerçevelerinin sayısını görüntüler.


İstemci bilgisayarın adını görüntüler.


Kablosuz bağdaştırıcısının seri numarası görüntüler.


Sinyal gücünü görüntüler.


Otomatik profil seçimi yönetimi için kullanılabilir profilleri görüntüler.


Bir profili otomatik profil seçimine dahil edin. Profil Yönetimi sekmesinde Profilleri Sırala'yı tıklayın. Oluşturulan tüm profillerin Kullanılabilir Profiller kutusunda listelendiği Otomatik Profil Seçimi Yönetimi penceresi belirir. Otomatik profil seçimine eklemek istediğiniz profilleri vurgulayın, sonra da Ekle'yi tıklayın. Profiller Otomatik Seçilen Profiller kutusunda belirir.


Bu alan otomatik seçilen profilleri görüntüler.


Kullanılabilir bir profili veya otomatik seçilen bir profili vurgulayın, sonra da profili listenin üst sıralarına taşımak için Yukarı Taşı'yı tıklayın.


Kullanılabilir bir profili veya otomatik seçilen bir profili vurgulayın, sonra da profili listenin alt sıralarına taşımak için Aşağı Taşı'yı tıklayın.


Kullanılabilir bir profili veya otomatik seçilen bir profili vurgulayın, sonra da profili listeden silmek için Kaldır'ı tıklayın.


Otomatik Profil Seçimi Yönetimi penceresinde yapılan değişiklikleri kabul edin.


Otomatik Profil Seçimi Yönetimi penceresinde yapılan tüm değişiklikleri iptal edin.


802.11a için iletim gücü düzeyini milivat (mW) cinsinden seçer. Yasal etki alanı veya donanım kısıtlamaları nedeniyle gerçek iletim gücü sınırlanabilir.


Kablosuz bağdaştırıcısının erişim noktası kimlik denetimi için kullanacağı modu seçin: Otomatik, bağdaştırıcının kimlik denetimini Paylaşılan modunu kullanarak denemesini ancak bu başarısız olursa açık kimlik denetimine geçmesini sağlar. Açık, bağdaştırıcı kimlik denetimini WEP ayarlarından bağımsız denemesini sağlar. Sadece hem bağdaştırıcıdaki hem de erişim noktasındaki WEP anahtarları eşleştiği takdirde erişim noktasıyla ilişkilenir. Paylaşılan ise bağdaştırıcının sadece aynı WEP anahtarına sahip erişim noktalarıyla ilişkilenmesine izin verir.


Altyapı (erişim noktası) ağlarında, istemci bağdaştırıcısının ilişkilenme girişiminde bulunacağı en fazla dört erişim noktasını belirleyin.


İstemci bilgisayarı tanımlar.


Kablosuz bağdaştırıcısının ilişkilenmekte olduğu erişim noktasının WEP ayarı İsteğe Bağlı ise ve istemcinin WEP özelliği etkinse, ilişkilendirmeye izin vermek için Güvenlik sekmesinde Karma Hücrelerle İlişkilendirmeye İzin Ver'i işaretleyin.


Oturum açmak için geçici kullanıcı adı ve parola kullanın. Windows kullanıcı adınız ve parolanız istenebilir.


Kimlik denetimi kullanıcı adınız olarak bu bilgisayardaki Windows kullanıcı adınızı kullanın.


Oturum açın ve kimlik denetimi işlemini elle başlatın.


Kaydedilecek ve kullanılacak kimlik denetimi kullanıcı adını, parolayı ve etki alanını belirleyin.


Kaydedilecek ve kullanılacak kimlik denetimi kullanıcı adını belirleyin.


Kaydedilecek ve kullanılacak kimlik denetimi parolasını belirleyin.


Kaydedilecek ve kullanılacak kimlik denetimi parolasını onaylayın.


Kaydedilecek ve kullanılacak belirli etki alanı adını seçin.


RADIUS sunucusuna Windows oturum açma etki alanı ve kullanıcı adını verin. (Bu varsayılan ayardır).


Kablosuz bağdaştırıcısını oturum kapandığında ilişkilendirmeyi kesmeye zorlayın.


Kimlik denetiminin başarısız olduğunun kabul edilmesi ve bir hata mesajı gönderilmesi için beklenecek sürenin uzunluğu (en az 30, en fazla 500 saniye) belirleyin. Varsayılan ayar 90 saniyedir.


Ayarlar penceresinde yapılan değişiklikleri kaydedin.


Ayarlar penceresinde yapılan değişiklikleri iptal edin.


Uygun ağ sertifikası yetkilisini açılır listeden seçin.


EAP-GTC kullanıcı adı olarak bu bilgisayardaki Windows kullanıcı adınızı kullanın.


Ayrı bir kullanıcı adı kullanmak ve EAP-GTC kimlik denetimini başlatmak için PEAP kullanıcı adını girin.


Jeton parolasını seçin. Jeton, kimlik denetimi sırasında bir kullanımlık parolayı almak ve girmek için jeton donanımını veya Secure Computing SofToken programını (sürüm 1.3 veya üstü) kullanır.


Statik bir parola seçer.


Belirli bir sunucu ve etki alanı ve oturum açma adını belirleyin. Ağ Sertifikası Yetkilisi listesindeki yetkili tarafından imzalanmış sertifikaya sahip tüm sunuculardan sertifika kabul etmek için sunucu adı alanını boş bırakın (önerilir). Bunun yerine istemcinin sertifika kabul edeceği sunucunun etki alanı adını girebilirsiniz.


Statik parolayı düzenleyin.


EAP-GTC yapılandırma penceresinde yapılan değişiklikleri kaydedin.


EAP-GTC yapılandırma penceresinde yapılan değişiklikleri iptal edin.


İstemcinin ilişkilenmeyi deneyeceği ilk erişim noktasının MAC adresini girin.


İstemcinin ilişkilenmeyi deneyeceği ikinci erişim noktasının MAC adresini girin.


İstemcinin ilişkilenmeyi deneyeceği üçüncü erişim noktasının MAC adresini girin.


İstemcinin ilişkilenmeyi deneyeceği dördüncü erişim noktasının MAC adresini girin.


Tercih Edilen Erişim Noktaları penceresinde yapılan değişiklikleri kaydedin.


Tercih Edilen Erişim Noktaları penceresinde yapılan değişiklikleri iptal edin.


Güvenlik kullanıcı adınız olarak Windows kullanıcı adınızı kullanın.


Önceden paylaşılan anahtarın uzunluğunu 64 bite ayarlayın. 64-bit anahtarlarda, onaltılık için 10 basamak, ASCII için 5 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 64 bite ayarlayın. 64-bit anahtarlarda, onaltılık için 10 basamak, ASCII için 5 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 64 bite ayarlayın. 64-bit anahtarlarda, onaltılık için 10 basamak, ASCII için 5 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 64 bite ayarlayın. 64-bit anahtarlarda, onaltılık için 10 basamak, ASCII için 5 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 128 bite ayarlayın. 128-bit anahtarlarda, onaltılık için 26 basamak, ASCII için 13 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 128 bite ayarlayın. 128-bit anahtarlarda, onaltılık için 26 basamak, ASCII için 13 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 128 bite ayarlayın. 128-bit anahtarlarda, onaltılık için 26 basamak, ASCII için 13 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 128 bite ayarlayın. 128-bit anahtarlarda, onaltılık için 26 basamak, ASCII için 13 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 152 bite ayarlayın. 152-bit anahtarlarda, onaltılık için 32 basamak, ASCII için 16 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 152 bite ayarlayın. 152-bit anahtarlarda, onaltılık için 32 basamak, ASCII için 16 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 152 bite ayarlayın. 152-bit anahtarlarda, onaltılık için 32 basamak, ASCII için 16 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Önceden paylaşılan anahtarın uzunluğunu 152 bite ayarlayın. 152-bit anahtarlarda, onaltılık için 32 basamak, ASCII için 16 karakter girin. Bu uzunluğun erişim noktasının anahtar uzunluğuyla aynı olması gerekir.


Kaydedilecek ve kullanılacak LEAP/EAP-FAST kullanıcı adını belirleyin.


Kaydedilecek ve kullanılacak LEAP/EAP-FAST parolasını belirleyin.


LEAP oturum açma ayarlarını yapmak için EAP-FAST kullanıcı adı ve parola ayarları penceresini kullanın.


LEAP/EAP-FAST ayarları penceresinde yapılan değişiklikleri kaydedin.


LEAP/EAP-FAST ayarları penceresinde yapılan değişiklikleri iptal edin.


Otomatik modunda, kablosuz bağdaştırıcısı kimlik denetimini Paylaşılan modunu kullanarak yapmayı dener ancak Paylaşılan modu başarısız olursa açık kimlik denetimine geçer.


Açık modunda, kablosuz bağdaştırıcısı kimlik denetimini WEP ayarlarından bağımsız dener. Sadece hem bağdaştırıcıdaki hem de erişim noktasındaki WEP anahtarları eşleştiği takdirde erişim noktasıyla ilişkilenir.


Paylaşılan modunda, kablosuz bağdaştırıcısı sadece aynı WEP anahtarına sahip erişim noktalarıyla ilişkilenir.


802.11b/g için iletim gücü düzeyini milivat (mW) cinsinden seçin. Yasal etki alanı veya donanım kısıtlamaları nedeniyle gerçek iletim gücü sınırlanabilir.


802.11a için iletim gücü düzeyini milivat (mW) cinsinden seçin. Yasal etki alanı veya donanım kısıtlamaları nedeniyle gerçek iletim gücü sınırlanabilir.


802.11b/g veya 802.11a için iletim gücü düzeyini milivat (mW) cinsinden seçin. Yasal etki alanı veya donanım kısıtlamaları nedeniyle gerçek iletim gücü sınırlanabilir.


802.11a kullanılabilir güç düzeylerini görüntüler.


Sinyal gücünü görüntüler.


Önceden oluşturulmuş profilleri görüntüler. Etkin profil bir simgeyle belirtilir.


Wi-Fi Korumalı Erişim (WPA) güvenliği kullanımını etkinleştirir. Sonra, açılır menüden EAP türünü seçin ve ayarlamak için Yapılandır'ı tıklayın.


Wi-Fi Korumalı Erişim (WPA) anahtar parolası güvenliği kullanımını etkinleştirir. Sonra, ayarlamak için Yapılandır'ı tıklayın.


802.1x güvenliği kullanımını etkinleştirir. Sonra, açılır menüden EAP türünü seçin ve ayarlamak için Yapılandır'ı tıklayın.


Hem erişim noktasında hem de istasyonda tanımlanan önceden paylaşılan anahtarların kullanımını etkinleştirir. Sonra, ayarlamak için Yapılandır'ı tıklayın.


Güvenlik yoktur (önerilmez).


Kullanılacak güvenlik türünü seçin, sonra da güvenlik türünü ayarlamak için Yapılandır'ı tıklayın.


Açılır listeden Wi-Fi Korumalı Erişim (WPA) güvenliği EAP türünü seçin. Ayarlamak için Yapılandır'ı tıklayın.


Açılır listeden 802.1X güvenliği EAP türünü seçin. Ayarlamak için Yapılandır'ı tıklayın.


Ağ Sertifikası Yetkilisi listesindeki yetkili tarafından imzalanmış sertifikaya sahip tüm sunuculardan sertifika kabul etmek için sunucu adı alanını boş bırakın (önerilir). Bunun yerine sertifika kabul edeceğiniz sunucunun etki alanı adını girebilirsiniz.


Oturum açma adını gereken şekilde değiştirin.


Bağdaştırıcı Bilgileri düğmesi ağ arabirim kartı (kablosuz ağ bağdaştırıcısı) ve ağ sürücüsü arabirim şartnamesi (NDIS) sürücüsüyle ilgili genel bilgileri verir.


802.11b/g kullanılabilir güç düzeylerini görüntüler.


Çalışılmakta olan ülkeyi gösterir.


Kablosuz kartının Super A/G modunu kullanmasına izin verin.


Kablosuz kartının eXtended Range (XR) modunu kullanmasına izin verin.


Kablosuz kartının ağ trafiği türlerini önceliklendirerek hizmet kalitesini (QoS) maksimize etmesine izin verin.


Güvenlik kullanıcı adınız olarak bilgisayar adını kullanın.


Güvenlik kullanıcı adınız olarak Windows kullanıcı adınızı kullanın.


Kullanıcı bilgilerinizi belirleyin.


Kimlik denetimini başlatmak için kullanıcı adını girin.


Kimlik denetimini başlatmak için parolayı girin.


Onaylamak için parolayı yeniden girin.


İstemcinin sertifika kabul edeceği yeni etki adı alanını girin.


İstemcinin sertifika kabul edeceği yeni etki adı alanını girin.


İstemcinin sertifika kabul edeceği yeni bir adı alanı için bir oturum açma adını girin.


Etki alanı adı ve oturum açma adı değişiklikleri yapın.


Etki alanı adı ve oturum açma adı değişikliklerimi iptal edin.


İstemcinin sertifika kabul edeceği yeni etki adı alanını girin.


Kimlik denetimini başlatmak için parolayı girin.


Onaylamak için parolayı yeniden girin.


Otomatik Korumalı Erişim Kimlik Bilgileri'ne (PAC) izin verin.


Korumalı Erişim Kimlik Bilgileri (PAC) yetkilisi seçin.


Daha fazla Korumalı Erişim Kimlik Bilgileri (PAC) profilini içe aktarın.


Yeni EAP-FAST Korumalı Erişim Kimlik Bilgileri (PAC) bulun ve içe aktarın.


EAP-FAST profilini silmek için EAP-FAST Korumalı Erişim Kimlik Bilgileri'ni (PAC) vurgulayın ve Sil'i tıklayın.


Korumalı Erişim Kimlik Bilgileri (PAC) deposu listesi kullanılabilir EAP-FAST PAC'ları görüntüler. EAP-FAST PAC'ları içe aktarmak veya silmek için bu pencereyi kullanın.


Sadece genel EAP-FAST Korumalı Erişim Kimlik Bilgileri'ni (PAC) görüntüleyin.


Sadece genel EAP-FAST Korumalı Erişim Kimlik Bilgileri'ni (PAC) görüntüleyin.


Bu penceredeki tüm değişiklikleri kabul edin.


Değişiklikleri kabul etmeden bu pencereyi kapatın.


Sistemin kullanıcı adı ve parolayı otomatik istemesini sağlayın.


Profile tüm kullanıcıların erişebilmesini sağlayın. Ayrıca başka profiller oluştururken şablon olarak kullanılabilir.


Kullanılabilir kullanıcı kimliği modülü (SIM) kartları görüntüler. Kullanılabilir herhangi bir SIM kartı kullanmak için Tüm SIM Kartlar'ı seçin.


Kullanıcı kimliği modülü (SIM) karta erişmek için PIN numarasını girin.


SIM karta erişmek için PIN numarasını yeniden girin.


Oturum açma adını girin.


SIM kart listesi kullanılabilir kullanıcı kimliği modülü (SIM) kartları görüntüler. Kullanılabilir herhangi bir SIM kartı kullanmak için Tüm SIM Kartlar'ı seçin.


Kullanıcı kimliği modülü (SIM) karta erişmek için PIN numarasını girin.


SIM karta erişmek için PIN numarasını yeniden girin.


Kimlik denetimi için kullanıcı adı ve parolayı kullanın.


Kimlik denetimi için kullanılacak sertifikayı seçin.


Kimlik denetimi için sertifika kullanın.


Kablosuz kartının 4,9 GHz Genel Güvenlik Bandı'nı kullanmasına izin verin.


Tarama listesine ekleyebileceğiniz bilgiler.


Tarama listesinde görüntülenen bilgiler.


Bu bilgileri tarama listesinde görüntüleyin.


Bu bilgileri tarama listesinden kaldırın.


Seçilen sütunu tarama listesine yukarı taşıyın.


Seçilen sütunu tarama listesine aşağı taşıyın.


Askıya alınan oturumları otomatik sürdürün [sadece geçici bağlantı kaybında, askıya al/sürdür komutlarında değil].


Windows oturum açma işleminin grup ilkesini başlatması için geçmesi gereken süre.


Askıya alınan oturumları otomatik sürdürün [sadece geçici bağlantı kaybında, askıya al/sürdür komutlarında değil].


Bu kutu işaretlenirse, bu profilde değişiklik yapamazsınız. Sistem yöneticinizle görüşün.


Kablosuz performansını arttırmak için birçok teknikten faydalanan Atheros Super A/G özelliğini kullanın.


Açılır listeden 802.1X güvenliği EAP türünü seçin. Ayarlamak için Yapılandır'ı tıklayın.


Bir veya daha fazla Korumalı Erişim Kimlik Bilgileri (PAC) yetkilisi seçin.


Aynı grubun PAC'larını otomatik seçmek için bunu işaretleyin.


Otomatik Korumalı Erişim Kimlik Bilgileri'ne (PAC) izin verin.


Açılır listeden PAC sağlaması için 802.1X güvenliği EAP türünü seçin. Ayarlamak için Yapılandır'ı tıklayın.


Otomatik PAC Sağlaması sırasında aynı EAP-FAST Kimlik Denetimi'ni kullanmak için bunu işaretleyin.


Etki alanı oturum açma işlemi için Bilgisayar PAC'ını kullanmak için bunu işaretleyin.


Kablosuz bağdaştırıcısını oturum kapandığında ilişkilendirmeyi kesmeye zorlayın.


Askıya alınan oturumları otomatik sürdürün [sadece geçici bağlantı kaybında, askıya al/sürdür komutlarında değil].


Sununu kimlik denetimi yapmak için bunu işaretleyin.


Kullanılacak sertifika yetkilisini belirleyin.


Oturum açmak için geçici kullanıcı adı ve parola kullanın. Windows kullanıcı adınız ve parolanız istenebilir.


Kimlik denetimi kullanıcı adınız olarak bu bilgisayardaki Windows kullanıcı adınızı kullanın.


Sistemin kullanıcı adı ve parolayı otomatik istemesini sağlayın.


Oturum açın ve kimlik denetimi işlemini elle başlatın.


Kaydedilecek ve kullanılacak kimlik denetimi kullanıcı adını, parolayı ve etki alanını belirleyin.


Dinamik güvenlik için kullanıcı adını girin.


Dinamik güvenlik için parolayı girin.


Parolayı yeniden girin.


Etki alanı adını girin.


RADIUS sunucusuna Windows oturum açma etki alanı ve kullanıcı adını verin. (Bu varsayılan ayardır).


Sununu kimlik denetimi yapmak için bunu işaretleyin.


Sununu kimlik denetimi yapmak için bunu işaretleyin.


Seçilen EAP-FAST Kimlik Denetimi yönetimini yapılandırmak için bu düğmeyi tıklayın.


Seçilen PAC Sağlama Kimlik Denetimi yönetimini yapılandırmak için bu düğmeyi tıklayın.


PAC'ları yönetmek ve organize etmek için bu düğmeyi tıklayın.


Sunucu veya etki alanı ve oturum açma adını belirlemek için bu düğmeyi tıklayın.


Kullanıcı adı ve parola ayarlarını kaydettikten sonra iletişim kutusunu kapatmak için bu düğmeyi tıklayın.


Kullanıcı adı ve parola ayarlarını kaydetmeden iletişim kutusunu kapatmak için bu düğmeyi tıklayın.


EAP-FAST ayarlarını kaydettikten sonra iletişim kutusunu kapatmak için bu düğmeyi tıklayın.


EAP-FAST ayarlarını kaydetmeden iletişim kutusunu kapatmak için bu düğmeyi tıklayın.


Korumalı Erişim Kimlik Bilgileri (PAC) bilgilerini girin.


Kullanıcı adı ve parola bilgilerini girin.


Yeni bir grup oluşturmak için bu düğmeyi tıklayın.


Bu pencereyi kapatmak için bu düğmeyi tıklayın.


PAC'ları açılır menüyü veya aşağıdaki komut düğmelerini kullanarak yönetin ve organize edin.


PAC dosya adını yoluyla birlikte girin.


İstediğiniz PAC dosyasının dizinine gitmek için bu düğmeyi tıklayın. Seçilen dosyayı içe aktarmak için İçe Aktar düğmesini tıklayın.


PAC'ı özel PAC deposuna aktarmak bu seçeneği seçin.


PAC'ı global PAC deposuna aktarmak bu seçeneği seçin.


Seçilen PAC'ı içe aktarmayı başlatmak için bu düğmeyi tıklayın.


Bu iletişim kutusunu kapatmak için bu düğmeyi tıklayın.


PAC Yetkilisi Adı'nı görüntüler.


PAC Yetkilisi kimliğini görüntüler.


PAC Adı'nı görüntüler.


PAC Türü'nü görüntüler. PAC Türü, Tünel PAC, Bilgisayar PAC veya Kullanıcı PAC olabilir.


PAC Zaman Aşımı'nı görüntüler.


İletişim kutusunu kapatmak için düğmeyi tıklayın.


PAC Deposu Türü'nü görüntüler. PAC Deposu Türü, Taze PAC, Özel PAC veya Genel PAC olabilir.


Kullanıcı oturum açtığında daima kullanıcının sertifikasını kullanarak yeniden kimlik denetimi yapın.


Kartın desteklediğini kablosuz bantları gösterir.


Seçilen yapılandırma profili bilgilerini değiştirir.


Seçilen yapılandırma profilini kaldırmak için basın.


Etki alanı denetleyicisini bulmak için harcanacak süreyi sınırlar ve saniye cinsinsen süreyi ilgili açılır kutuya girer.


Etki alanı denetleyicisi aranırken kimlik denetimi işleminin zaman aşımına uğrayacağı süreyi saniye cinsinden (300 saniyeye kadar) girin.


Kablosuz kartının 5 GHz ve 300 Mbps kablosuz modunu kullanmasına izin verin.


Kablosuz kartının 2 GHz ve 300 Mbps kablosuz modunu kullanmasına izin verin.


Yerel ağ bağlantısı olduğunda kablosuz yerel ağı otomatik devre dışı bırakır veya yerel ağ devre dışı bırakıldığında kablosuz yerel ağı etkinleştirir.


Bu kutu işaretlenirse, iletim gücü düzeyleri değiştirilemez. Sistem yöneticinizle görüşün.


Kablosuz ağı kontrol edecek yardımcı programı seçmek için bu radyo düğmelerini kullanın.


Kablosuz ağı Windows'un kontrol etmesi için bunu seçin.


Kablosuz ağı ACU'nun kontrol etmesi için bunu seçin.


Kablosuz ağı üçüncü taraf aracının kontrol etmesi için bunu seçin.


Dolaşım ısrarına uygun dolaşım düzeyini seçin.


40 MHz modunda kullanılan ilave kanalı görüntüler.


40 MHz modunda kullanılan ilave frekansı görüntüler.


802.11n MIMO güç tasarrufu durumunu görüntüler.


Geçerli kanal genişliğini görüntüler.


Ad hoc ağ başlatırken kablosuz modunu 5 GHz ve 300 Mbps olarak belirler.


Ad hoc ağ başlatırken kablosuz modunu 2,4 GHz ve 300 Mbps olarak belirler.


Tanı kanalı modunu başlatmak için listeden profili seçin.


İstenen sınamaların durumunu ve ilerlemesini gösterir.


Tanı kanalı modunu başlatır. Başlamışsa, tanı kanalı modunu durdurur.


Durumu ve ilerlemeyi kaydedin. Durumu dosyaya kaydetmek için dizine gözatın.


Tanı modunu durdurur (başlamışsa) ve pencereyi kapatır.


Kullanılacak kullanıcı kimliği modülü (SIM) kartı seçin.


Kullanıcı kimliği modülü (SIM) karta erişmekte kullanılan PIN numarasını girin.


SIM karta erişmekte kullanılan PIN numarasını yeniden girin.


Açılır listeden WPA/WPA2 güvenliği EAP türünü seçin. Ayarlamak için Yapılandır'ı tıklayın.


Sisteme takılı SIM kartların listesini yenileyin.


Oturum açma adı olarak SIM kartın IMSI numarasını kullanmak için bu seçeneği seçin